Copyright: Copyright (c) 2011 Innovative Technology Inc.


NMS List of Contents 2010-12-31

Innovative Technology Inc.
5B - 1420 Youville Drive
Ottawa, Ontario  K1C 7B3
phone: (613) 841-0050  fax: (613) 841-5876
http://www.innovative.ca
Latest updated sections are in blue.   MasterFormat 1995 numbers are in grey.

PROCUREMENT AND CONTRACTING REQUIREMENTS GROUP

Division 00 - PROCUREMENT AND CONTRACTING REQUIREMENTS

SPECIFICATIONS GROUP

GENERAL REQUIREMENTS SUBGROUP

Division 01 - GENERAL REQUIREMENTS ** 3 Sections Updated

FACILITY CONSTRUCTION SUBGROUP

Division 02 - EXISTING CONDITIONS ** 2 Sections Updated

Division 03 - CONCRETE

Division 04 - MASONRY ** 1 Section Updated

Division 05 - METALS

Division 06 - WOOD, PLASTICS AND COMPOSITES ** 2 Sections Updated

Division 07 - THERMAL AND MOISTURE PROTECTION

Division 08 - OPENINGS ** 8 Sections Updated

Division 09 - FINISHES ** 8 Sections Updated

Division 10 - SPECIALTIES

Division 11 - EQUIPMENT

Division 12 - FURNISHINGS

Division 13 - SPECIAL CONSTRUCTION

Division 14 - CONVEYING EQUIPMENT

FACILITY SERVICES SUBGROUP

Division 21 - FIRE SUPPRESSION

Division 22 - PLUMBING

Division 23 - HEATING, VENTILATING AND AIR CONDITIONING ** 3 Sections Updated

Division 25 - INTEGRATED AUTOMATION

Division 26 - ELECTRICAL ** 7 Sections Updated

Division 27 - COMMUNICATIONS ** 1 Section Updated

Division 28 - ELECTRONIC SAFETY AND SECURITY ** 8 Sections Updated

SITE AND INFRASTRUCTURE SUBGROUP

Division 31 - EARTHWORK ** 2 Sections Updated

Division 32 - EXTERIOR IMPROVEMENTS ** 4 Sections Updated

Division 33 - UTILITIES ** 1 Section Updated

Division 34VAR - TRANSPORTATION - VARIOUS ** 1 Section Updated

Division 34ENG - TRANSPORTATION - ENGINEERING ** 11 Sections Updated

Division 35 - WATERWAY AND MARINE ** 3 Sections Updated

PROCESS EQUIPMENT SUBGROUP

Division 42-44 - PROCESS HEATING, COOLING AND DRYING EQUIPMENT; POLLUTION CONTROL EQUIPMENT

PACKAGES

PERFORMANCE-BASED - ARCHITECTURAL Package ** 1 Section Updated

PERFORMANCE-BASED - ENGINEERING Package

ARCHITECTURAL Package

LANDSCAPE ARCHITECTURAL Package ** 9 Sections Updated

STRUCTURAL ENGINEERING Package ** 4 Sections Updated

HEAVY CIVIL ENGINEERING Package ** 3 Sections Updated

INTERIOR DESIGN Package ** 17 Sections Updated

CONSERVATION Package ** 2 Sections Updated

AIR TRANSPORTATION Package ** 4 Sections Updated

MECHANICAL Package ** 2 Sections Updated

ELECTRICAL Package

BUILDING SERVICES Package ** 2 Sections Updated


Division 00-01 - GENERAL REQUIREMENTS

Number    MF'95  Title

00 01 07       00000  SEALS PAGE

00 01 10       00000  TABLE OF CONTENTS

00 11 21       00205  REQUEST FOR PROPOSAL - DESIGN-BUILD

00 21 13       00200  INSTRUCTIONS TO BIDDERS

01 11 00       01110  SUMMARY OF WORK

01 12 00       01120  MULTIPLE CONTRACT SUMMARY

01 14 00       01140  WORK RESTRICTIONS

01 21 00       01210  ALLOWANCES

01 23 10       01200  ALTERNATIVES

01 29 00       01290  PAYMENT PROCEDURES

01 29 83       01293  PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

01 31 19       00000  PROJECT MEETINGS

01 32 16.06  00000  CONSTRUCTION PROGRESS SCHEDULE - CRITICAL PATH METHOD (CPM)

01 32 16.07  00000  CONSTRUCTION PROGRESS SCHEDULE - BAR (GANTT) CHART

01 33 00       01330  SUBMITTAL PROCEDURES

01 35 00.06  00000  SPECIAL PROCEDURES FOR TRAFFIC CONTROL

01 35 13.13  00000  SPECIAL PROCEDURES FOR AIRPORT FACILITIES

01 35 13.43  00000  SPECIAL PROJECT PROCEDURES FOR CONTAMINATED SITES

01 35 21       NEW  LEED REQUIREMENTS

01 35 29.06  00000  HEALTH AND SAFETY REQUIREMENTS

01 35 29.14  00000  HEALTH AND SAFETY FOR CONTAMINATED SITES

01 35 35       01352  DND FIRE SAFETY REQUIREMENTS

01 35 43       01561  ENVIRONMENTAL PROCEDURES

01 35 73       01356  PROCEDURES FOR DECONSTRUCTION OF STRUCTURES

01 41 00       01410  REGULATORY REQUIREMENTS

01 45 00       01450  QUALITY CONTROL

01 47 13       01361  SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN

01 47 15       01362  SUSTAINABLE REQUIREMENTS: CONSTRUCTION

01 47 17       01363  SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

01 47 19       01364  SUSTAINABLE REQUIREMENTS: OPERATION

01 51 00       01510  TEMPORARY UTILITIES

01 52 00       01520  CONSTRUCTION FACILITIES

01 56 00       01560  TEMPORARY BARRIERS AND ENCLOSURES

01 61 00       01610  COMMON PRODUCT REQUIREMENTS

01 71 00       01720  EXAMINATION AND PREPARATION

01 73 00       00000  EXECUTION

01 74 11       01740  CLEANING

01 74 21       01355  CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

01 77 00       01770  CLOSEOUT PROCEDURES

01 78 00       01780  CLOSEOUT SUBMITTALS

01 79 00       01820  DEMONSTRATION AND TRAINING

01 91 13       00000  GENERAL COMMISSIONING (CX) REQUIREMENTS

01 91 31       00000  COMMISSIONING (CX) PLAN

01 91 33       00000  COMMISSIONING FORMS

01 91 41       00000  COMMISSIONING: TRAINING

01 91 51       00000  BUILDING MANAGEMENT MANUAL (BMM)


Division 02 - EXISTING CONDITIONS

Number    MF'95  Title

02 27 13       00000  THERMOGRAPHIC ASSESSMENT - BUILDING ENVELOPE

02 27 16       00000  THERMOGRAPHIC ASSESSMENT - ROOF

02 27 19       00000  THERMOGRAPHIC ASSESSMENT - MECHANICAL EQUIPMENT

02 27 23       00000  THERMOGRAPHIC ASSESSMENT - ELECTRICAL SYSTEMS

02 41 13       02225  Selective Site Demolition

02 41 13.14  00000  Asphalt Paving Removal

02 41 16       02222  STRUCTURE DEMOLITION

02 41 16.01  00000  STRUCTURE DEMOLITION - SHORT FORM

02 41 20       15803  DE-COMMISSIONING AND REMOVAL OF GENERAL PURPOSE (GP) FUME HOODS

02 41 21       02227  DECONSTRUCTION OF STRUCTURES

02 41 99       00000  DEMOLITION FOR MINOR WORKS

02 42 13       01359  CARPET RECLAMATION

02 43 13.05  00000  HISTORIC - STRUCTURE RELOCATION

02 50 13       01358  MANAGEMENT OF TOXIC WASTE

02 61 00.01  00000  SOIL REMEDIATION

02 65 00       02115  UNDERGROUND STORAGE TANK REMOVAL

02 81 01       00000  HAZARDOUS MATERIALS

02 82 00.01  00000  ASBESTOS ABATEMENT - MINIMUM PRECAUTIONS

02 82 00.02  00000  ASBESTOS ABATEMENT - INTERMEDIATE PRECAUTIONS

02 82 00.03  00000  ASBESTOS ABATEMENT - MAXIMUM PRECAUTIONS

02 83 10       00000  LEAD - BASE PAINT ABATEMENT - MINIMUM PRECAUTIONS

02 83 11       00000  LEAD - BASE PAINT ABATEMENT - INTERMEDIATE PRECAUTIONS

02 83 12       00000  LEAD - BASE PAINT ABATEMENT - MAXIMUM PRECAUTIONS

02 84 00       13285  POLYCHLORINATE BIPHENYL REMEDIATION

02 85 00.01  00000  MOULD REMEDIATION - MINIMUM PRECAUTIONS

02 85 00.02  00000  MOULD REMEDIATION - MEDIUM PRECAUTIONS

02 85 00.03  00000  MOULD REMEDIATION - MAXIMUM PRECAUTIONS


Division 03 - CONCRETE

Number    MF'95  Title

03 10 00       03100  CONCRETE FORMING AND ACCESSORIES

03 11 19       03131  Insulated Concrete Forms

03 20 00       03200  CONCRETE REINFORCING

03 30 00       03300  CAST-IN-PLACE CONCRETE

03 30 00.01  00000  CAST-IN-PLACE CONCRETE SHORT FORM

03 30 51       03301  CONCRETE FOR BRIDGE DECKS

03 35 00       03362  CONCRETE FINISHING

03 35 05       03361  CONCRETE FLOOR HARDENING

03 37 13       03371  SHOTCRETE

03 37 26       03306  Underwater Placed Concrete

03 41 00       03410  PRECAST STRUCTURAL CONCRETE

03 41 36       03420  PRECAST STRUCTURAL POST-TENSIONED CONCRETE

03 45 00       03450  Precast Architectural Concrete

03 48 00       03481  Precast Concrete Specialties


Division 04 - MASONRY

Number    MF'95  Title

04 03 06       04511  HISTORIC - CLEANING HISTORIC MASONRY

04 03 07       04921  HISTORIC - MASONRY REPOINTING

04 03 08       04065  HISTORIC - MORTARING

04 03 09       00000  HISTORIC - GROUTING

04 03 31       04911  HISTORIC - REPLACING BRICK

04 03 32       01455  HISTORIC - TESTING AND SAMPLING BRICK UNITS

04 03 41       04923  HISTORIC - REPAIRING STONE

04 03 42       04922  HISTORIC - REPLACING STONE

04 03 43       04924  HISTORIC - DISMANTLING STONE MASONRY

04 04 99       00000  MASONRY FOR MINOR WORKS

04 05 00       04051  COMMON WORK RESULTS FOR MASONRY

04 05 12       04060  MASONRY MORTAR AND GROUT

04 05 19       04080  MASONRY ANCHORAGE AND REINFORCING

04 05 23       04090  MASONRY ACCESSORIES

04 21 13       04211  BRICK MASONRY

04 21 19       04212  CLAY TILE MASONRY

04 22 00       04220  CONCRETE UNIT MASONRY

04 23 00       04270  GLASS UNIT MASONRY

04 43 13       04411  MARBLE VENEER CLADDING

04 43 16       04412  GRANITE VENEER CLADDING

04 43 19       04420  COLLECTED STONE VENEER CLADDING

04 43 23       04430  QUARRIED STONE VENEER CLADDING

04 43 26       04435  DIMENSION STONE VENEER CLADDING

04 71 13       04231  CALCIUM SILICATE MANUFACTURED BRICK MASONRY

04 71 14       04230  CALCIUM SILICATE MANUFACTURED UNIT MASONRY

04 73 13       04233  CALCIUM SILICATE MANUFACTURED STONE MASONRY


Division 05 - METALS

Number    MF'95  Title

05 12 23       05121  STRUCTURAL STEEL FOR BUILDINGS

05 12 33       05122  STRUCTURAL STEEL FOR BRIDGES

05 14 11       00000  STRUCTURAL ALUMINUM FOR BUILDINGS

05 21 00       05210  STEEL JOIST FRAMING

05 31 00       05310  STEEL DECKING

05 41 00       05411  STRUCTURAL METAL STUD FRAMING

05 50 00       05500  METAL FABRICATIONS

05 51 29       05510  METAL STAIRS AND LADDERS

05 52 16       00000  HANDRAILS AT ROOF AREAS


Division 06 - WOOD, PLASTICS AND COMPOSITES

Number    MF'95  Title

06 03 12       06131  Historic - Period Horizontal Log Work

06 03 13       06155  Historic - Carvel Planking

06 03 15       06911  HISTORIC - SPLICING OF WOOD COMPONENTS

06 03 16       06912  HISTORIC - STORAGE AND PROTECTION OF WOOD

06 03 18       06914  Historic - Replacement of Curved Wood Members: Steam Bending

06 03 74       06071  HISTORIC - LONG-TERM TREATMENT OF WOOD

06 03 75       06072  HISTORIC - ERADICATION OF INSECTS IN WOOD

06 03 76       06073  Historic Structures - Antiseptic Treatment for Wood

06 05 73       06070  WOOD TREATMENT

06 08 99       00000  ROUGH CARPENTRY FOR MINOR WORKS

06 10 00       06100  ROUGH CARPENTRY

06 10 00.01  00000  ROUGH CARPENTRY - SHORT FORM

06 14 00       06140  TREATED WOOD FOUNDATIONS

06 15 00       06150  WOOD DECKING

06 17 53       06171  SHOP - FABRICATED WOOD TRUSSES

06 18 00       00000  GLUED-LAMINATED CONSTRUCTION

06 20 00       06200  FINISH CARPENTRY

06 40 00       06400  ARCHITECTURAL WOODWORK

06 47 00       06666  PLASTIC LAMINATE FINISHING


Division 07 - THERMAL AND MOISTURE PROTECTION

Number    MF'95  Title

07 03 13       07315  Historic - Slate Shingle Roofing

07 03 31       07305  HISTORIC - CONCRETE ROOFING

07 03 32       07314  HISTORIC - WOOD SHINGLES AND SHAKES ROOFING

07 03 33       07331  HISTORIC - SOD ROOFING

07 03 34       07332  Historic - Canvas Roofing

07 03 35       07415  HISTORIC - TIN-PLATE AND TERNEPLATE ROOFING

07 03 36       07471  Historic - Board Roofing

07 03 91       07921  Historic - Caulking Vessels

07 11 13       07120  BITUMINOUS DAMPPROOFING

07 12 13       00000  BUILT-UP ASPHALT WATERPROOFING

07 13 52       00000  MODIFIED BITUMINOUS SHEET WATERPROOFING

07 16 19       07161  METAL OXIDE WATERPROOFING

07 17 13       07170  Bentonite Panel Waterproofing

07 18 00       07180  TRAFFIC COATINGS

07 19 00       07190  Water Repellents

07 21 13       07212  BOARD INSULATION

07 21 16       07213  BLANKET INSULATION

07 21 23       07211  LOOSE FILL INSULATION

07 21 29.01  00000  SPRAYED INSULATION - CELLULOSE

07 21 29.02  00000  SPRAYED INSULATION - MINERAL FIBRE

07 21 29.03  00000  SPRAYED INSULATION - POLYURETHANE FOAM

07 24 00       07240  EXTERIOR INSULATION AND FINISH SYSTEMS

07 24 10.01  00000  EXTERIOR INSULATION AND FINISH SYSTEMS - PANELIZED

07 24 10.03  00000  EXTERIOR FINISH - DIRECT APPLIED

07 26 00       07160  VAPOUR RETARDERS

07 27 00.01  00000  AIR BARRIERS - DESCRIPTIVE OR PROPRIETARY

07 27 00.02  00000  AIR BARRIERS - PERFORMANCE

07 31 13       07311  ASPHALT SHINGLES

07 31 29       07313  WOOD SHINGLES AND SHAKES

07 42 43       07481  COMPOSITE WALL PANELS

07 42 43.01  00000  COMPOSITE METAL BUILDING PANELS

07 44 56       07450  Mineral Fiber Reinforced Cementitious Panels

07 46 13       07465  PREFORMED METAL SIDING

07 46 23       07461  WOOD SIDING

07 46 33       07464  PLASTIC SIDING

07 51 00       00000  BUILT-UP BITUMINOUS ROOFING

07 52 00       07550  MODIFIED BITUMINOUS MEMBRANE ROOFING

07 53 23       00000  ETHYLENE PROPYLENE DIENE MONOMER ROOFING

07 54 19       07541  POLYVINYL-CHLORIDE ROOFING

07 55 56.14  00000  Hot Fluid Applied Rubberized Asphalt Roofing

07 55 63       NEW  VEGETATED PROTECTED MEMBRANE ROOFING

07 61 00       07610  SHEET METAL ROOFING

07 62 00       07620  SHEET METAL FLASHING AND TRIM

07 72 33       07724  ROOF HATCHES

07 72 69       00000  ROOF ANCHORS AND SAFETY RESTRAINTS

07 81 00       07811  APPLIED FIREPROOFING

07 84 00       07840  FIRE STOPPING

07 92 00       00000  Joint Sealants

07 95 13       05810  EXPANSION JOINT COVER ASSEMBLIES

07 95 23       07712  PREFABRICATED ROOF EXPANSION JOINTS


Division 08 - OPENINGS

Number    MF'95  Title

08 03 11       08215  HISTORIC - PERIOD WOOD DOORS

08 11 00       00000  METAL DOORS AND FRAMES

08 11 16       08120  ALUMINUM DOORS AND FRAMES

08 11 19       08130  STAINLESS STEEL DOORS AND FRAMES

08 11 69       08181  METAL STORM DOORS AND FRAMES

08 13 73       08341  SLIDING METAL DOORS

08 14 16       08210  Flush Wood Doors

08 14 80       08260  SLIDING WOOD AND PLASTIC DOORS

08 31 00.01  00000  ACCESS DOORS - MECHANICAL

08 33 13       08333  COILING COUNTER DOORS

08 33 23.01  00000  OVERHEAD COILING DOORS AND GRILLES

08 33 36       08332  SIDE COILING GRILLES

08 34 58.01  00000  VAULT DOORS AND FRAMES

08 34 83       08342  HINGED SAFETY GLASS DOORS

08 35 13.01  00000  PANEL FOLDING DOORS

08 35 13.13  00000  ACCORDION FOLDING DOORS

08 36 13.01  00000  SECTIONAL WOOD DOORS

08 36 13.02  00000  SECTIONAL METAL DOORS

08 36 13.03  00000  SECTIONAL PLASTIC DOORS

08 36 19       08371  MULTI-LEAF VERTICAL LIFT DOORS

08 36 19.01  00000  VERTICAL LIFT WOOD DOORS

08 36 19.02  00000  MULTI-LEAF VERTICAL LIFT METAL DOORS

08 38 16       08355  FLEXIBLE TRAFFIC DOORS

08 42 29       08460  AUTOMATIC ENTRANCES

08 44 13       08920  GLAZED ALUMINUM CURTAIN WALLS

08 44 26.13  00000  STRUCTURAL SEALANT GLAZED ASSEMBLIES

08 50 00       08500  WINDOWS

08 62 10       08600  PLASTIC SKYLIGHTS

08 70 05       00000  CABINET AND MISCELLANEOUS HARDWARE

08 71 00       00000  DOOR HARDWARE

08 80 50       08800  GLAZING

08 87 53       12497  SECURITY FILMS

08 90 00       10200  LOUVRES AND VENTS


Division 09 - FINISHES

Number    MF'95  Title

09 03 51       09212  HISTORIC - PLASTER

09 03 61       09991  Historic - Repainting Exterior Surfaces

09 03 62       09992  Historic - Repainting Interior Surfaces

09 21 16       09250  GYPSUM BOARD ASSEMBLIES

09 21 99       00000  PARTITIONS FOR MINOR WORKS

09 22 14       09205  FURRING AND LATHING

09 22 16       09110  Non-structural Metal Framing

09 23 00       09210  GYPSUM PLASTERING

09 30 13       09310  CERAMIC TILING

09 30 15       09330  QUARRY AND PAVER TILING

09 51 13       09510  ACOUSTICAL PANEL CEILINGS

09 51 99       00000  ACOUSTICAL CEILINGS FOR MINOR WORKS

09 53 00.01  00000  ACOUSTICAL SUSPENSION

09 54 23       09546  LINEAR METAL CEILINGS

09 58 00       09547  INTEGRATED CEILING ASSEMBLIES

09 63 40       09380  STONE FLOORING

09 64 23       09642  WOOD PARQUET FLOORING

09 64 29       09641  WOOD STRIP AND PLANK FLOORING

09 64 53       09643  RESILIENT WOOD FLOORING ASSEMBLIES

09 65 16       09652  RESILIENT SHEET FLOORING

09 65 19       09651  RESILIENT TILE FLOORING

09 65 99       00000  RESILIENT FLOORING FOR MINOR WORKS

09 66 13       09410  PORTLAND CEMENT TERRAZZO FLOORING

09 66 16       09420  TERRAZZO FLOOR TILING

09 66 23       09440  RESINOUS MATRIX TERRAZZO FLOORING

09 68 13       00000  TILE CARPETING

09 68 16       00000  SHEET CARPETING

09 69 00       10270  ACCESS FLOORING

09 72 16       09721  VINYL-COATED FABRIC WALL COVERINGS

09 80 00       00000  ACOUSTIC TREATMENT

09 91 13       09912  EXTERIOR PAINTING

09 91 13.01  00000  EXTERIOR RE-PAINTING

09 91 23       09911  INTERIOR PAINTING

09 91 23.01  00000  INTERIOR RE-PAINTING

09 91 99       00000  PAINTING FOR MINOR WORKS

09 96 53       09962  ELASTOMERIC COATINGS

09 96 59       09961  HIGH-BUILD GLAZED COATINGS

09 96 66       09963  AGGREGATE WALL COATINGS

09 97 19       09971  PAINTING EXTERIOR METAL SURFACES


Division 10 - SPECIALTIES

Number    MF'95  Title

10 11 13       10110  CHALKBOARDS

10 11 23       10120  TACKBOARDS

10 14 00       00000  SIGNAGE

10 14 53       02891  TRAFFIC SIGNAGE

10 21 13.13  00000  METAL TOILET COMPARTMENTS

10 21 13.19  00000  PLASTIC TOILET COMPARTMENTS

10 21 16       10185  SHOWER AND DRESSING COMPARTMENTS

10 22 13       10605  WIRE MESH PARTITIONS

10 22 19       00000  POST AND PANEL DEMOUNTABLE PARTITIONS

10 22 19.01  00000  STUD TYPE DEMOUNTABLE PARTITIONS

10 22 26.13  00000  ACCORDION FOLDING PARTITIONS

10 22 26.33  00000  FOLDING PANEL PARTITIONS

10 26 00.01  00000  WALL AND CORNER GUARDS

10 28 10       10800  TOILET AND BATH ACCESSORIES

10 44 16.19  00000  FIRE EXTINGUISHERS AND SAFETY BLANKETS

10 51 13       10505  METAL LOCKERS

10 56 13       10675  METAL STORAGE SHELVING

10 56 26.13  00000  MANUAL MOBILE STORAGE SHELVING

10 56 26.23  00000  MOTORIZED MOBILE STORAGE SHELVING

10 75 00       10350  FLAGPOLES


Division 11 - EQUIPMENT

Number    MF'95  Title

11 12 00       11150  PARKING CONTROL EQUIPMENT

11 13 13       11163  LOADING DOCK BUMPERS

11 13 16       11164  LOADING DOCK SEALS AND SHELTERS

11 13 19.13  00000  LOADING DOCK LEVELERS

11 13 30       11162  ELEVATING DOCKS

11 24 19       11011  VACUUM CLEANING SYSTEMS

11 40 10       11410  FOOD SERVICE STOCK EQUIPMENT

11 40 20       11411  FOOD SERVICE CUSTOM EQUIPMENT

11 41 10       11405  Walk-in Freezers and Coolers

11 51 23.13  00000  METAL LIBRARY SHELVING

11 82 19       11171  PACKAGED INCINERATORS

11 82 26       11172  Waste Compactors And Destructors


Division 12 - FURNISHINGS

Number    MF'95  Title

12 21 13       12492  HORIZONTAL LOUVRE BLINDS

12 21 16       12491  VERTICAL LOUVRE BLINDS

12 35 53.13  00000  STEEL LABORATORY CASEWORK

12 35 53.19  00000  WOOD LABORATORY CASEWORK

12 50 00       12500  FURNITURE

12 92 16       00000  INTERIOR PLANTINGS


Division 13 - SPECIAL CONSTRUCTION

Number    MF'95  Title

13 34 19       13126  METAL BUILDING SYSTEMS

13 34 23       13127  PREFABRICATED BUILDINGS


Division 14 - CONVEYING EQUIPMENT

Number    MF'95  Title

14 12 00       14120  ELECTRIC DUMBWAITERS

14 20 03       00000  FREIGHT ELEVATORS

14 20 06       00000  PASSENGER ELEVATORS

14 31 00       14301  ESCALATORS

14 32 00       14302  MOVING WALKS

14 42 00       14421  WHEELCHAIR LIFTS

14 43 19       14331  SUSPENDED POWERED PLATFORMS

14 43 21       14430  PLATFORM LIFTS - HYDRAULIC


Division 21 - FIRE SUPPRESSION

Number    MF'95  Title

21 05 01       15010  COMMON WORK RESULTS FOR MECHANICAL

21 05 05       00000  COMMON WORK RESULTS FOR FIRE SUPPRESSION

21 12 01       15301  STANDPIPE AND HOSE ASSEMBLY

21 13 13       13930  WET PIPE SPRINKLER SYSTEMS

21 13 16       13935  DRY PIPE SPRINKLER SYSTEMS

21 21 00.01  00000  CARBON DIOXIDE EXTINGUISHING SYSTEMS - TOTAL FLOODING

21 21 00.02  00000  CARBON DIOXIDE EXTINGUISHING SYSTEMS - LOCAL APPLICATION

21 22 00       13965  CLEAN AGENT FIRE EXTINGUISHING SYSTEMS

21 23 00       13966  WET CHEMICAL FIRE EXTINGUISHING SYSTEMS

21 24 00       13971  Dry Chemical Fire Extinguishing Systems

21 30 00       13920  FIRE PUMPS


Division 22 - PLUMBING

Number    MF'95  Title

22 05 00       00000  COMMON WORK RESULTS FOR PLUMBING

22 10 10       15440  PLUMBING PUMPS

22 11 16       00000  DOMESTIC WATER PIPING

22 13 17       15151  DRAINAGE WASTE AND VENT PIPING - CAST IRON AND COPPER

22 13 18       15152  DRAINAGE WASTE AND VENT PIPING - PLASTIC

22 15 00       15211  GENERAL SERVICE COMPRESSED AIR SYSTEMS

22 30 05       15480  DOMESTIC WATER HEATERS

22 31 13       15461  RESIDENTIAL DOMESTIC WATER SOFTENERS

22 31 16       11250  COMMERCIAL DOMESTIC WATER SOFTENING

22 42 01       15401  PLUMBING SPECIALTIES AND ACCESSORIES

22 42 03       15412  COMMERCIAL WASHROOM FIXTURES

22 42 16       00000  COMMERCIAL LAVATORIES AND SINKS

22 42 20       15413  COMMERCIAL SHOWERS AND BATHTUBS

22 47 00       15414  DRINKING FOUNTAINS AND WATER COOLERS


Division 23 - HEATING, VENTILATING AND AIR CONDITIONING

Number    MF'95  Title

23 01 31       00000  AIR DUCT CLEANING FOR HVAC SYSTEMS

23 05 00       00000  COMMON WORK RESULTS FOR HVAC

23 05 01       15054  USE OF HVAC SYSTEMS DURING CONSTRUCTION

23 05 05       15101  INSTALLATION OF PIPEWORK

23 05 13       15053  COMMON MOTOR REQUIREMENTS FOR HVAC EQUIPMENT

23 05 16       15125  EXPANSION FITTINGS AND LOOPS FOR HVAC PIPING

23 05 17       15051  PIPE WELDING

23 05 19       15121  METERS AND GAUGES FOR HVAC PIPING

23 05 19.01  00000  THERMOMETERS AND PRESSURE GAUGES - PIPING SYSTEMS

23 05 23.01  00000  VALVES - BRONZE

23 05 23.02  00000  VALVES - CAST IRON

23 05 23.03  00000  VALVES - CAST STEEL

23 05 23.04  00000  VALVES - LUBRICATED PLUG

23 05 23.05  00000  BUTTERFLY VALVES

23 05 29       15061  HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT

23 05 33       15705  HEAT TRACING FOR HVAC PIPING AND TANKS

23 05 48       15072  VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT

23 05 49.01  00000  SEISMIC RESTRAINT SYSTEMS (SRS) - TYPE P2 BUILDINGS

23 05 53.01  00000  MECHANICAL IDENTIFICATION

23 05 93       15950  TESTING, ADJUSTING AND BALANCING FOR HVAC

23 05 94       15814  PRESSURE TESTING OF DUCTED AIR SYSTEMS

23 07 13       15082  DUCT INSULATION

23 07 14       00000  THERMAL INSULATION FOR EQUIPMENT

23 07 15       00000  THERMAL INSULATION FOR PIPING

23 08 01       15970  PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS

23 08 02       15095  CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS

23 09 33       15916  ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

23 09 43       15920  PNEUMATIC CONTROL SYSTEM FOR HVAC

23 10 01       15201  SERVICE GARAGE SYSTEMS

23 11 13       15191  FACILITY FUEL-OIL PIPING

23 11 23       15192  FACILITY NATURAL GAS PIPING

23 11 26       15193  FACILITY LIQUID-PETROLEUM GAS PIPING

23 20 13       15189  HIGH PRESSURE PIPING SYSTEMS INSIDE BUILDINGS AND CHC PLANTS

23 21 13.01  00000  HYDRONIC SYSTEMS: COPPER

23 21 13.02  00000  HYDRONIC SYSTEMS: STEEL

23 21 13.03  00000  PRESS JOINT PIPING SYSTEMS HYDRONIC SYSTEMS

23 21 14       15181  HYDRONIC SPECIALTIES

23 21 23       15131  HYDRONIC PUMPS

23 22 13       15185  STEAM AND CONDENSATE HEATING PIPING

23 22 14       15186  STEAM SPECIALTIES

23 22 23       15132  STEAM CONDENSATE PUMPS

23 23 00       15187  REFRIGERANT PIPING

23 25 00       15188  HVAC WATER TREATMENT SYSTEMS

23 31 13.01  00000  METAL DUCTS - LOW PRESSURE TO 500 PA

23 31 13.02  00000  METAL DUCTS - HIGH PRESSURE TO 2500 PA

23 32 48       15825  ACOUSTICAL AIR PLENUMS

23 33 00       15820  AIR DUCT ACCESSORIES

23 33 14       15821  DAMPERS - BALANCING

23 33 15       15822  DAMPERS - OPERATING

23 33 16       15823  DAMPERS - FIRE AND SMOKE

23 33 46       15813  FLEXIBLE DUCTS

23 33 53       15084  DUCT LINERS

23 34 00       15831  HVAC FANS

23 34 24       15832  DOMESTIC FANS

23 34 25       15833  PACKAGED ROOF AND WALL EXHAUSTERS

23 35 16       15808  ENGINE EXHAUST SYSTEMS

23 36 00       15840  AIR TERMINAL UNITS

23 37 13       15852  DIFFUSERS, REGISTERS AND GRILLES

23 37 20       15851  LOUVRES, INTAKES AND VENTS

23 38 13       15807  COMMERCIAL KITCHEN HOODS

23 38 17       15805  PERCHLORIC ACID FUME HOOD AND EXHAUST SYSTEM - STAINLESS STEEL

23 38 18       15806  PERCHLORIC ACID FUME HOOD AND EXHAUST SYSTEM - PLASTIC

23 44 00       15861  HVAC AIR FILTRATION

23 51 00       15551  BREECHING, CHIMNEYS AND STACKS

23 52 00       15510  HEATING BOILERS

23 54 13       15532  ELECTRIC-RESISTANCE FURNACES

23 54 16       15531  FUEL-FIRED FURNACES

23 55 01       15824  DUCT HEATERS

23 56 13.01  00000  HEATING SOLAR FLAT PLATE COLLECTORS

23 57 00       15710  HEAT EXCHANGERS FOR HVAC

23 64 13       15623  ABSORPTION WATER CHILLERS

23 64 16       15622  CENTRIFUGAL WATER CHILLERS

23 64 19       15621  RECIPROCATING WATER CHILLERS

23 64 26       15624  ROTARY-SCREW WATER CHILLERS

23 65 10       15661  CONDENSERS, COOLERS AND COOLING TOWERS

23 65 16       15641  NATURAL DRAFT COOLING TOWERS

23 72 00       15781  AIR-TO-AIR ENERGY RECOVERY EQUIPMENT

23 73 10       15721  AIR HANDLING - BUILT-UP

23 73 11       15722  AIR HANDLING UNITS - PACKAGED

23 74 00       15732  PACKAGED OUTDOOR HVAC EQUIPMENT

23 81 23       15731  Computer Room Air Conditioning

23 81 40       15740  Air and Water Source Unitary Heat Pumps

23 82 19       15701  FAN COIL UNITS

23 82 20       15702  FORCED AIR HEATERS

23 82 21       15703  INCREMENTAL HEATING AND COOLING UNITS

23 82 23       15767  Unit Ventilators

23 82 33.01  00000  Residential Convectors

23 82 33.02  00000  Commercial Convectors

23 82 33.03  00000  CABINET CONVECTOR HEATERS

23 82 36       15762  FINNED TUBE RADIATION HEATERS

23 82 39       15765  UNIT HEATERS

23 82 39.01  00000  UNIT HEATERS - ELECTRIC

23 82 39.02  00000  LIQUID HEATERS

23 83 00       15761  RADIANT HEATING UNITS

23 83 00.01  00000  Radiant Heaters - Electric Infrared

23 83 13       15704  RADIANT HEATING ELECTRIC CABLES

23 83 13.01  00000  RADIANT HEATING ELECTRIC CABLES - SNOW MELTING

23 83 13.02  00000  RADIANT HEATING ELECTRIC CABLES - FLOOR WARMING

23 84 13       15751  HUMIDIFIERS


Division 25 - INTEGRATED AUTOMATION

Number    MF'95  Title

25 01 11       13832  EMCS: START-UP, VERIFICATION AND COMMISSIONING

25 01 12       13835  EMCS: TRAINING

25 05 01       13830  EMCS: GENERAL REQUIREMENTS

25 05 02       13831  EMCS: SUBMITTALS AND REVIEW PROCESS

25 05 03       13834  EMCS: PROJECT RECORD DOCUMENTS

25 05 54       13836  EMCS: IDENTIFICATION

25 08 20       13833  EMCS: Warranty and Maintenance

25 10 01       13840  EMCS: LOCAL AREA NETWORK (LAN)

25 10 02       13841  EMCS: OPERATOR WORK STATION (OWS)

25 30 01       13842  EMCS: BUILDING CONTROLLERS

25 30 02       13844  EMCS: FIELD CONTROL DEVICES

25 90 01       13846  EMCS: SITE REQUIREMENTS, APPLICATIONS AND SYSTEMS SEQUENCES OF OPERATION


Division 26 - ELECTRICAL

Number    MF'95  Title

26 05 00       16010  COMMON WORK RESULTS FOR ELECTRICAL

26 05 14       16121  POWER CABLE AND OVERHEAD CONDUCTORS (1001 V)

26 05 20       16151  WIRE AND BOX CONNECTORS 0-1000 V

26 05 21       16122  WIRES AND CABLES (0-1000 V)

26 05 22       16153  CONNECTORS AND TERMINATIONS

26 05 27       16061  GROUNDING - PRIMARY

26 05 28       16062  GROUNDING - SECONDARY

26 05 29       16071  Hangers and Supports for Electrical Systems

26 05 31       16131  SPLITTERS, JUNCTION, PULL BOXES AND CABINETS

26 05 32       16132  OUTLET BOXES, CONDUIT BOXES AND FITTINGS

26 05 33       16152  Raceway and Boxes for Electrical Systems

26 05 33.01  00000  SURFACE AND LIGHTING FIXTURE RACEWAYS

26 05 34       16133  CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS

26 05 36       16135  CABLE TRAYS FOR ELECTRICAL SYSTEMS

26 05 37       16136  WIREWAYS AND AUXILIARY GUTTERS

26 05 38       16137  CELLULAR METAL FLOOR RACEWAY FITTINGS

26 05 39       16113  Underfloor Raceways for Electrical Systems

26 05 43.01  00000  INSTALLATION OF CABLES IN TRENCHES AND IN DUCTS

26 05 80       16221  FRACTIONAL HORSEPOWER MOTORS

26 05 81       16222  MOTORS: 0.746 TO 149 KW

26 06 31       16234  DIESEL ELECTRIC GENERATING UNITS APPENDIX A - TECHNICAL DATA FORM

26 09 23.01  00000  METERING AND SWITCHBOARD INSTRUMENTS

26 09 23.02  00000  LIGHTING CONTROL DEVICES - PHOTOELECTRIC

26 09 23.03  00000  LIGHTING CONTROL DEVICES - INCANDESCENT DIMMING

26 09 23.04  00000  LIGHTING CONTROL DEVICES - FLUORESCENT DIMMING

26 09 24       13811  LIGHTING CONTROL DEVICES - LOW VOLTAGE

26 09 43       16127  Network Lighting Controls

26 11 00.01  00000  OUTDOOR SUBSTATION TO 15 KV

26 11 13.01  00000  UNIT SUBSTATION TO 15 KV

26 12 13       16274  LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS

26 12 16       16275  Dry Type, Medium Voltage Transformers

26 12 16.01  00000  DRY TYPE TRANSFORMERS UP TO 600 V PRIMARY

26 12 16.13  00000  PAD-MOUNTED, TRANSFORMERS FOR AIRFIELD VISUAL AIDS

26 12 19       16276  PAD MOUNTED, LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS

26 12 21       16273  TRANSFORMER VAULT EQUIPMENT TO 15 KV

26 13 01       16325  ISOLATING SWITCHES TO 15 KV

26 13 17       16327  FULL LOAD INTERRUPTER SWITCHES TO 15 KV

26 13 18       16341  PRIMARY SWITCHGEAR ASSEMBLY TO 15 KV

26 18 14       16326  FUSE CUTOUTS AND FUSE LINKS - OUTDOOR

26 18 26       16322  Medium Voltage Reclosers

26 18 39.01  00000  MOTOR CONTROLLERS - 2000 TO 5000 V (NON-HAZARDOUS)

26 18 41       16323  INTERLOCK SYSTEMS

26 22 19       16461  Control and Signal Transformers

26 23 00       16431  Low Voltage Switchgear

26 24 01       16401  SERVICE EQUIPMENT

26 24 02       16402  SERVICE ENTRANCE BOARD

26 24 13       16321  SWITCHBOARDS

26 24 13.01  00000  GENERATOR SWITCHBOARD TO 600 V

26 24 13.02  00000  GENERATOR SWITCHBOARD OVER 600 V

26 24 16.01  00000  PANELBOARDS BREAKER TYPE

26 24 16.02  00000  PANELBOARDS SWITCH AND FUSE TYPE

26 24 19       16225  MOTOR CONTROL CENTRES

26 25 00       16451  Enclosed Bus Assemblies

26 27 10       16126  MODULAR WIRING SYSTEM

26 27 16       16161  ELECTRICAL CABINETS AND ENCLOSURES

26 27 19       16139  MULTI-OUTLET ASSEMBLIES

26 27 23       16138  INDOOR SERVICE POLES

26 27 26       16141  WIRING DEVICES

26 27 73       13071  DOOR CHIMES

26 28 13.01  00000  FUSES - LOW VOLTAGE

26 28 13.02  00000  OUTDOOR LOAD BREAK SWITCHES AND FUSES

26 28 16.01  00000  AIR CIRCUIT BREAKERS

26 28 16.02  00000  MOULDED CASE CIRCUIT BREAKERS

26 28 18       16492  GROUND FAULT EQUIPMENT PROTECTION

26 28 20       16493  GROUND FAULT CIRCUIT INTERRUPTERS - CLASS "A"

26 28 22       16413  LOAD BREAK SWITCHES

26 28 23       16414  DISCONNECT SWITCHES - FUSED AND NON-FUSED

26 29 01       16421  CONTACTORS

26 29 02       16422  FIRE PUMP CONTROL

26 29 03       16423  CONTROL DEVICES

26 29 10       16223  MOTOR STARTERS TO 600 V

26 32 13.01  00000  POWER GENERATION DIESEL

26 32 13.02  00000  POWER GENERATION TO 30 KW

26 32 13.03  00000  INSTALLATION OF ELECTRIC POWER GENERATING EQUIPMENT

26 32 13.04  00000  DIESEL ELECTRIC GENERATING UNITS (LIQUID COOLED)

26 32 13.05  00000  DIESEL ELECTRIC GENERATING UNITS (AIR COOLED)

26 32 13.07  00000  DIESEL ELECTRIC GENERATING UNITS APPENDIX B FACTORY TEST

26 33 16       16241  BATTERY RACKS

26 33 43       16262  BATTERY CHARGERS

26 33 53       16261  UNINTERRUPTIBLE POWER SYSTEMS STATIC

26 33 54       16302  HOSPITAL OPERATING ROOMS ISOLATED POWER SUPPLY

26 35 33       16281  POWER FACTOR CORRECTION EQUIPMENT

26 36 23       16301  AUTOMATIC TRANSFER SWITCHES

26 41 00.01  00000  PRIMARY LIGHTNING ARRESTERS

26 41 00.02  00000  SECONDARY LIGHTNING ARRESTERS

26 41 13       13100  LIGHTNING PROTECTION FOR STRUCTURES

26 42 00       13110  CATHODIC PROTECTION

26 42 00.01  00000  TELETHERMICS - CATHODIC PROTECTION

26 50 00       16505  LIGHTING

26 52 00       00000  EMERGENCY LIGHTING

26 52 00.01  00000  LIGHTING - CENTRAL EMERGENCY SYSTEM

26 53 00       16531  EXIT SIGNS

26 55 36.01  00000  M.I. WHITE FLASHING OBSTRUCTION LIGHT

26 55 36.13  00000  	MEDIUM INTENSITY (M.I.) RED FLASHING OBSTRUCTION LIGHT

26 55 36.19  00000  LOW-INTENSITY (L.I.) RED OBSTRUCTION LIGHTING

26 56 19       16550  Roadway Lighting


Division 27 - COMMUNICATIONS

Number    MF'95  Title

27 05 13       16123  Communications Services

27 05 26       00000  GROUNDING AND BONDING FOR COMMUNICATIONS SYSTEMS

27 05 28       16702  Pathways for Communications Systems

27 10 05       00000  STRUCTURED CABLING FOR COMMUNICATIONS SYSTEMS

27 11 20       16211  TERMINALS AND CONNECTORS FOR COMMUNICATIONS CONDUCTORS - ENTRANCE FACILITY

27 31 00       16720  Voice Communications Switching and Routing Equipment

27 51 16       16724  Public Address and Mass Notification Systems

27 51 23       16723  Intercommunications and Program Systems

27 52 24       16722  Nurses Call Systems

27 53 13       13801  CLOCK SYSTEMS

27 53 20       16851  MASTER TV ANTENNA


Division 28 - ELECTRONIC SAFETY AND SECURITY

Number    MF'95  Title

28 13 00       13706  ACCESS CONTROL

28 13 19       13701  ACCESS CONTROL SYSTEMS INFRASTRUCTURE

28 13 27       13702  SECURITY DOOR SUPERVISION

28 13 28       13703  BUILDING ENTRANCE CONTROL SYSTEM

28 16 00       13705  INTRUSION DETECTION

28 23 00       13704  VIDEO SURVEILLANCE

28 31 00       00000  FIRE DETECTION AND ALARM

28 31 00.01  00000  MULTIPLEX FIRE ALARM SYSTEM

28 31 00.02  00000  MULTIPLEX FIRE ALARM AND VOICE COMMUNICATION SYSTEMS


Division 31 - EARTHWORK

Number    MF'95  Title

31 00 00.01  00000  EARTHWORK - SHORT FORM

31 00 99       00000  EARTHWORK FOR MINOR WORKS

31 04 31       02250  HISTORIC - SUBGRADE SHORING AND BRACING

31 05 10       02702  CORRECTED MAXIMUM DRY DENSITY FOR FILL

31 05 16       00000  Aggregate Materials

31 09 16.01  00000  PILE DRIVING TEMPLATES

31 09 16.28  00000  PILE TESTS

31 11 00       02231  CLEARING AND GRUBBING

31 14 13       02233  SOIL STRIPPING AND STOCKPILING

31 22 13       02311  Rough Grading

31 22 14       02312  AIRFIELD GRADING

31 22 16.13  00000  ROADWAY SUBGRADE RESHAPING

31 23 16.26  00000  ROCK REMOVAL

31 23 33.01  00000  EXCAVATING, TRENCHING AND BACKFILLING

31 24 13       02317  ROADWAY EMBANKMENTS

31 31 19.13  00000  CHEMICAL VEGETATION CONTROL

31 32 13.19  00000  LIME SOIL STABILIZATION

31 32 19.01  00000  GEOTEXTILES

31 32 19.02  00000  GEOMEMBRANES

31 32 19.13  00000  GEOGRID SOIL STABILIZATION

31 36 00       02372  Gabions

31 36 19       02373  GABION MATTRESSES

31 37 00       02371  Rip-Rap

31 53 13.01  00000  TIMBER CRIBWORK

31 61 13       02451  PILE FOUNDATIONS, GENERAL REQUIREMENTS

31 62 13.19  00000  PRECAST CONCRETE PILES

31 62 16.13  00000  STEEL SHEET PILES

31 62 16.14  00000  STEEL SHEET PILE CELLS

31 62 16.16  00000  STEEL H PILES

31 62 16.19  00000  UNFILLED TUBULAR STEEL PILES

31 62 19       02457  TIMBER PILES

31 63 19       02476  Bored And Socketed Piles

31 63 19.13  00000  ROCK SOCKETS FOR PILES

31 63 23       02465  BORED CONCRETE PILES

31 63 24       02454  COMPACTED EXPANDED-BASE CONCRETE PILES

31 63 26.16  00000  CONCRETE CAISONS FOR MARINE CONSTRUCTION


Division 32 - EXTERIOR IMPROVEMENTS

Number    MF'95  Title

32 01 11.01  00000  Pavement Cleaning and Marking Removal

32 01 11.02  00000  PAVEMENT CRACK CLEANING AND FILLING

32 01 13.01  00000  FLEXIBLE PAVING SURFACE TREATMENT - SINGLE APPLICATION

32 01 13.02  00000  FLEXIBLE PAVING SURFACE TREATMENT - MULTIPLE APPLICATION

32 01 16.01  00000  Flexible Paving Surface Grooving

32 01 16.13  00000  RESHAPING ASPHALT PAVEMENT

32 01 18       02982  ROUTING AND SEALING PAVEMENT CRACKS

32 01 90.33  00000  TREE AND SHRUB PRESERVATION

32 11 16.01  00000  Granular Sub-base

32 11 17       02748  RESHAPING GRANULAR ROADBED

32 11 23       02721  Aggregate Base Courses

32 11 33       00000  CEMENT-TREATED BASE COURSES

32 12 10       02703  MARSHALL IMMERSION TEST FOR BITUMEN

32 12 13.16  00000  ASPHALT TACK COATS

32 12 13.23  00000  ASPHALT PRIME COATS

32 12 16       02741  Asphalt Paving

32 12 16.01  00000  Asphalt Paving - Short Form

32 12 16.02  00000  Asphalt Paving for Building Sites

32 12 16.16  00000  Road-Mix Asphalt Paving Wearing Courses

32 12 36.14  00000  Asphalt Seal Coat

32 12 36.16  00000  Coal Tar Seal Coats

32 13 13       02752  CONCRETE PAVING

32 13 13.01  00000  CONCRETE PAVING FOR BUILDING SITE

32 13 13.17  00000  ROLLER COMPACTED CONCRETE PAVEMENTS

32 14 10       02785  Unit Paving on Sand Bed

32 14 13       02751  PRECAST CONCRETE UNIT PAVING

32 15 40       02731  CRUSHED STONE SURFACING

32 15 60       02362  ROADWAY DUST CONTROL

32 16 15       02770  CONCRETE WALKS, CURBS AND GUTTERS

32 17 23       02761  PAVEMENT MARKINGS

32 21 00.01  00000  Well Pumps

32 31 13       02821  CHAIN LINK FENCES AND GATES

32 31 26       02822  WIRE FENCES AND GATES

32 32 13.13  00000  Packaged Sewage Lift, Wet Well Type

32 32 26       02832  METAL CRIB RETAINING WALLS

32 32 34       02831  REINFORCE SOIL RETAINING WALLS

32 37 00       02870  Exterior Site Furnishings

32 91 19.13  00000  TOPSOIL PLACEMENT AND GRADING

32 91 19.14  00000  TOPSOIL PLACEMENT FOR VEGETATED ROOFS

32 92 19.13  00000  MECHANICAL SEEDING

32 92 19.16  00000  HYDRAULIC SEEDING

32 92 23       02933  SODDING

32 93 10       02906  TREES, SHRUBS AND GROUND COVER PLANTING

32 93 43.01  00000  TREE PRUNING


Division 33 - UTILITIES

Number    MF'95  Title

33 05 13       00000  MANHOLES AND CATCH BASIN STRUCTURES

33 05 13.03  00000  TELETHERMICS PRE-FABRICATED STEEL MANHOLES

33 07 13       00000  TELETHERMICS - THERMAL INSULATION

33 07 16       00000  FACTORY PRE-INSULATED PIPING SYSTEMS FOR UTILITY APPLICATIONS

33 11 16       02511  Site Water Utility Distribution Piping

33 11 16.01  00000  Incoming Site Water Utility Distribution Piping

33 21 00       00000  Water Supply Wells

33 31 13       02530  Public Sanitary Utility Sewerage Piping

33 34 00       02531  Sanitary Utility Sewerage Force Mains

33 36 00       02541  Utility Septic Tanks

33 36 33       02542  Utility Drainage Field

33 41 00       02630  Storm Utility Drainage Piping

33 42 13       02641  PIPE CULVERTS

33 46 13.01  00000  FOUNDATION AND UNDERSLAB DRAINAGE

33 46 16       00000  Subdrainage Piping

33 46 16.01  00000  SUB-DRAIN BACKFILL SEALING WITH ASPHALT

33 47 23       02661  SANITARY SEWAGE LAGOONS

33 56 13       13202  Aboveground Fuel Storage Tanks

33 56 16       13201  Underground Fuel Storage Tanks

33 65 13       02551  TELETHERMICS - DISTRIBUTION PIPING - STEEL

33 65 16       02552  TELETHERMICS - DISTRIBUTION PIPING - PVC - FRP

33 65 26       02556  TELETHERMICS - INSULATED AND PLASTIC JACKETTED SYSTEMS

33 65 29       02557  TELETHERMICS - DIRECTLY BURIED, LOOSE FILL INSULATED, SYSTEMS

33 65 33       02554  TELETHERMICS - DRYABLE DRAINABLE, TESTABLE CONDUIT SYSTEMS

33 65 43       02558  TELETHERMICS - STEEL TUNNEL SYSTEMS

33 65 46       02560  TELETHERMICS - SHALLOW INVERTED TRENCH (SIT) SYSTEMS

33 65 73       02581  CONCRETE ENCASED DUCT BANKS AND MANHOLES

33 65 76       02582  DIRECT BURIED UNDERGROUND CABLE DUCTS

33 71 16.01  00000  ELECTRICAL POLE LINES AND HARDWARE

33 71 73.01  00000  OVERHEAD ELECTRICAL SERVICE

33 71 73.02  00000  UNDERGROUND ELECTRICAL SERVICE


Division 34VAR - TRANSPORTATION - VARIOUS

Number    MF'95  Title

34 71 13.01  00000  Vehicle Concrete Barriers

34 71 13.21  00000  Vehicle Guide Posts

34 71 13.22  00000  Vehicle Post Delineators

34 71 13.25  00000  Vehicle W-Beam Guide Rail

34 71 13.27  00000  Vehicle Cable Guide Rail

34 71 13.28  00000  Vehicle Box Beam Guide Rail

34 72 16       02705  RAILWAY SIDING

34 77 13       14731  PASSENGER LOADING BRIDGES


Division 34ENG - TRANSPORTATION - ENGINEERING

Number    MF'95  Title

34 43 05       00000  COMMON WORK RESULTS FOR AIRFIELD LIGHTING

34 43 10       16521  AIRFIELD ILLUMINATED GUIDANCE SIGNS

34 43 13.13  00000  AIRFIELD RUNWAY IDENTIFICATION LIGHTS

34 43 13.16  00000  AIRFIELD RUNWAY AND TAXIWAY INSET LIGHTING

34 43 13.19  00000  AIRFIELD ELEVATED EDGE LIGHTING

34 43 13.23  00000  AIRFIELD RUNWAY GUARD LIGHTS

34 43 16.23  00000  AIRFIELD SHORT-APPROACH LIGHTING SYSTEM

34 43 16.26  00000  AIRFIELD OMNI-DIRECTIONAL APPROACH LIGHTING SYSTEM

34 43 16.29  00000  AIRFIELD LOW INTENSITY APPROACH LIGHTING EQUIPMENT

34 43 16.34  00000  AIRFIELD HIGH VARIABLE INTENSITY APPROACH LIGHTING EQUIPMENT

34 43 16.36  00000  AIRFIELD PRECISION-APPROACH PATH INDICATOR EQUIPMENT

34 43 16.39  00000  AIRFIELD ALUMINUM APPROACH TOWERS

34 43 23.16  00000  AIRFIELD WIND CONES

34 43 23.19  00000  ROTATING BEACONS

34 43 23.43  00000  AIRFIELD APRON FLOODLIGHTING

34 43 26.13  00000  AIRFIELD LIGHTING CONTROL EQUIPMENT

34 43 26.16  00000  AIRFIELD LIGHTING PLC CONTROL EQUIPMENT

34 43 26.23  00000  AIRFIELD LIGHTING REGULATOR ASSEMBLY

34 43 32       16525  FLOODLIGHTING-EXTERIOR

34 73 16.13  00000  AIRCRAFT STATIC GROUNDING


Division 35 - WATERWAY AND MARINE

Number    MF'95  Title

35 20 23       02325  DREDGING

35 31 19       02393  REVETMENTS

35 31 23.13  00000  RUBBLE MOUND BREAKWATER

35 42 19       02379  Preservation of Water Courses

35 42 60       02326  Waterway Channel Maintenance

35 51 23       02392  PONTOONS

35 59 13.19  00000  RUBBER MARINE FENDERS

35 59 29       02391  MOORING DEVICES


Division 42-44 - PROCESS HEATING, COOLING AND DRYING EQUIPMENT; POLLUTION CONTROL EQUIPMENT

Number    MF'95  Title

42 20 00       15601  PROCESS COOLING EQUIPMENT

44 41 13       11201  COMMERCIAL WATER TREATMENT PLANTS


PERFORMANCE-BASED - ARCHITECTURAL Package

Numbr  MF*2004  Title

A1010       01 82 60  STANDARD FOUNDATIONS

A1030       01 82 65  SLABS ON GRADE (PERFORMANCE)

A2010       01 82 50  BASEMENT EXCAVATION

A2020       01 82 70  BASEMENT WALLS

B1010       01 83 50  FLOOR CONSTRUCTION

B1020       01 83 55  ROOF CONSTRUCTION

B2010       01 83 60  EXTERIOR WALLS

B2020       01 83 65  EXTERIOR WINDOWS

B2030       01 83 70  EXTERIOR DOORS

B3010       01 83 80  ROOF COVERINGS

B3020       01 83 85  ROOF OPENINGS

C1010       01 84 50  INTERIOR PARTITIONS (PERFORMANCE)

C2012       01 84 55  INTERIOR STAIRWAYS

C3012       01 84 83  EPOXY WALL COATINGS

C3015       01 84 80  INTERIOR CEILING FINISHES

C3025       01 84 75  INTERIOR SOFT FLOOR FINISHES

C3026       01 84 70  INTERIOR HARD FLOOR FINISHES

C3027       01 84 71  EPOXY FLOOR COATINGS

C3040       01 84 85  PAINTING

D1012       01 85 70  FREIGHT ELEVATORS

D1013       01 85 50  PASSENGER ELEVATORS

D2010       01 86 42  PLUMBING FIXTURES

E2010       01 87 50  FIXED FURNISHINGS

E2020       01 87 55  MOVABLE FURNISHINGS

G1010       01 89 50  SITE CLEARING

G1020       01 89 55  SITE DEMOLITION AND RELOCATIONS

G1030       01 89 60  SITE EARTHWORK

G2010       01 89 70  ROADWAYS

G2020       01 89 76  PARKING LOT

G2030       01 89 78  PEDESTRIAN PAVING

G2040       01 89 65  SITE DEVELOPMENT

G2050       01 89 80  LANDSCAPING


PERFORMANCE-BASED - ENGINEERING Package

Numbr  MF*2004  Title

D1000       01 81 16  ENVIRONMENTAL DESIGN REQUIREMENTS

D1012       01 85 70  FREIGHT ELEVATORS

D1013       01 85 50  PASSENGER ELEVATORS

D2010       01 86 42  PLUMBING FIXTURES

D2020       01 86 40  DOMESTIC WATER DISTRIBUTION

D2030       01 86 44  SANITARY WASTE

D2040       01 86 46  RAIN WATER DRAINAGE

D2050       01 86 48  OTHER PLUMBING SYSTEMS

D3000       01 86 50  DESIGN REQUIREMENTS - HVAC

D3010       01 86 51  ENERGY SUPPLY

D3020       01 86 53  HEAT GENERATION

D3030       01 86 54  REFRIGERATION

D3040       01 86 55  HVAC DISTRIBUTION

D3050       01 86 56  TERMINAL AND PACKAGED UNITS

D3060       01 86 70  CONTROLS AND INSTRUMENTATION

D3070       01 86 59  OTHER HVAC SYSTEMS AND EQUIPMENT

D3080       01 86 75  TESTING, ADJUSTING AND BALANCING

D4010       01 86 60  SPRINKLERS

D4020       01 86 61  STANDPIPE AND HOSE NETWORKS

D4030       01 86 65  FIRE PROTECTION SPECIALTIES

D4040       01 86 69  OTHER FIRE SUPPRESSION SYSTEMS

D5000       01 86 80  COMMON REQUIREMENTS - ELECTRICAL

D5010       01 86 82  ELECTRICAL SERVICE AND DISTRIBUTION

D5020       01 86 84  LIGHTING, POWER, AND BRANCH WIRING

D5030       01 86 86  COMMUNICATIONS AND SECURITY

D5050       01 86 88  ELECTRICAL CONTROLS AND INSTRUMENTATION


ARCHITECTURAL Package

Number    MF'95  Title

                            ADD DIVISION 00-13

                            ADD DIVISION PBARC - PERFORMANCE-BASED - ARCHITECTURAL

                            ADD DIVISION 14 - CONVEYING EQUIPMENT

                            ADD DIVISION 31 - EARTHWORK

                            ADD DIVISION 32 - EXTERIOR IMPROVEMENTS

                            ADD DIVISION 33 - UTILITIES


LANDSCAPE ARCHITECTURAL Package

Number    MF'95  Title

02 61 00.01  00000  SOIL REMEDIATION

02 65 00       02115  UNDERGROUND STORAGE TANK REMOVAL

02 81 01       00000  HAZARDOUS MATERIALS

02 84 00       13285  POLYCHLORINATE BIPHENYL REMEDIATION

03 10 00       03100  CONCRETE FORMING AND ACCESSORIES

03 11 19       03131  Insulated Concrete Forms

03 20 00       03200  CONCRETE REINFORCING

03 30 00       03300  CAST-IN-PLACE CONCRETE

03 30 00.01  00000  CAST-IN-PLACE CONCRETE SHORT FORM

03 35 00       03362  CONCRETE FINISHING

03 35 05       03361  CONCRETE FLOOR HARDENING

03 37 13       03371  SHOTCRETE

03 45 00       03450  Precast Architectural Concrete

03 48 00       03481  Precast Concrete Specialties

05 41 00       05411  STRUCTURAL METAL STUD FRAMING

06 05 73       06070  WOOD TREATMENT

06 10 00       06100  ROUGH CARPENTRY

06 10 00.01  00000  ROUGH CARPENTRY - SHORT FORM

06 15 00       06150  WOOD DECKING

07 12 13       00000  BUILT-UP ASPHALT WATERPROOFING

07 13 52       00000  MODIFIED BITUMINOUS SHEET WATERPROOFING

07 55 63       NEW  VEGETATED PROTECTED MEMBRANE ROOFING

08 87 53       12497  SECURITY FILMS

09 91 13       09912  EXTERIOR PAINTING

09 91 13.01  00000  EXTERIOR RE-PAINTING

09 91 99       00000  PAINTING FOR MINOR WORKS

09 97 19       09971  PAINTING EXTERIOR METAL SURFACES

10 75 00       10350  FLAGPOLES

12 92 16       00000  INTERIOR PLANTINGS

13 34 23       13127  PREFABRICATED BUILDINGS

31 00 00.01  00000  EARTHWORK - SHORT FORM

31 00 99       00000  EARTHWORK FOR MINOR WORKS

31 11 00       02231  CLEARING AND GRUBBING

31 14 13       02233  SOIL STRIPPING AND STOCKPILING

31 22 13       02311  Rough Grading

31 23 16.26  00000  ROCK REMOVAL

31 23 33.01  00000  EXCAVATING, TRENCHING AND BACKFILLING

31 31 19.13  00000  CHEMICAL VEGETATION CONTROL

31 32 19.01  00000  GEOTEXTILES

31 32 19.02  00000  GEOMEMBRANES

31 32 19.13  00000  GEOGRID SOIL STABILIZATION

32 01 11.01  00000  Pavement Cleaning and Marking Removal

32 01 11.02  00000  PAVEMENT CRACK CLEANING AND FILLING

32 01 13.01  00000  FLEXIBLE PAVING SURFACE TREATMENT - SINGLE APPLICATION

32 01 13.02  00000  FLEXIBLE PAVING SURFACE TREATMENT - MULTIPLE APPLICATION

32 01 16.01  00000  Flexible Paving Surface Grooving

32 01 16.13  00000  RESHAPING ASPHALT PAVEMENT

32 01 18       02982  ROUTING AND SEALING PAVEMENT CRACKS

32 01 90.33  00000  TREE AND SHRUB PRESERVATION

32 11 16.01  00000  Granular Sub-base

32 11 17       02748  RESHAPING GRANULAR ROADBED

32 11 23       02721  Aggregate Base Courses

32 11 33       00000  CEMENT-TREATED BASE COURSES

32 12 10       02703  MARSHALL IMMERSION TEST FOR BITUMEN

32 12 13.16  00000  ASPHALT TACK COATS

32 12 13.23  00000  ASPHALT PRIME COATS

32 12 16       02741  Asphalt Paving

32 12 16.01  00000  Asphalt Paving - Short Form

32 12 16.02  00000  Asphalt Paving for Building Sites

32 12 16.16  00000  Road-Mix Asphalt Paving Wearing Courses

32 12 36.14  00000  Asphalt Seal Coat

32 12 36.16  00000  Coal Tar Seal Coats

32 13 13       02752  CONCRETE PAVING

32 13 13.01  00000  CONCRETE PAVING FOR BUILDING SITE

32 13 13.17  00000  ROLLER COMPACTED CONCRETE PAVEMENTS

32 14 10       02785  Unit Paving on Sand Bed

32 14 13       02751  PRECAST CONCRETE UNIT PAVING

32 15 40       02731  CRUSHED STONE SURFACING

32 15 60       02362  ROADWAY DUST CONTROL

32 16 15       02770  CONCRETE WALKS, CURBS AND GUTTERS

32 17 23       02761  PAVEMENT MARKINGS

32 31 13       02821  CHAIN LINK FENCES AND GATES

32 31 26       02822  WIRE FENCES AND GATES

32 32 34       02831  REINFORCE SOIL RETAINING WALLS

32 37 00       02870  Exterior Site Furnishings

32 91 19.13  00000  TOPSOIL PLACEMENT AND GRADING

32 91 19.14  00000  TOPSOIL PLACEMENT FOR VEGETATED ROOFS

32 92 19.13  00000  MECHANICAL SEEDING

32 92 19.16  00000  HYDRAULIC SEEDING

32 92 23       02933  SODDING

32 93 10       02906  TREES, SHRUBS AND GROUND COVER PLANTING

32 93 43.01  00000  TREE PRUNING

33 05 13       00000  MANHOLES AND CATCH BASIN STRUCTURES

33 31 13       02530  Public Sanitary Utility Sewerage Piping

33 34 00       02531  Sanitary Utility Sewerage Force Mains

33 41 00       02630  Storm Utility Drainage Piping

33 42 13       02641  PIPE CULVERTS

33 46 16       00000  Subdrainage Piping

34 71 13.21  00000  Vehicle Guide Posts

35 31 19       02393  REVETMENTS

35 42 19       02379  Preservation of Water Courses

G1010       01 89 50  SITE CLEARING

G1030       01 89 60  SITE EARTHWORK

G2030       01 89 78  PEDESTRIAN PAVING

G2040       01 89 65  SITE DEVELOPMENT

G2050       01 89 80  LANDSCAPING


STRUCTURAL ENGINEERING Package

Number    MF'95  Title

02 41 13       02225  Selective Site Demolition

02 41 16       02222  STRUCTURE DEMOLITION

02 41 16.01  00000  STRUCTURE DEMOLITION - SHORT FORM

02 41 99       00000  DEMOLITION FOR MINOR WORKS

02 81 01       00000  HAZARDOUS MATERIALS

03 10 00       03100  CONCRETE FORMING AND ACCESSORIES

03 11 19       03131  Insulated Concrete Forms

03 20 00       03200  CONCRETE REINFORCING

03 30 00       03300  CAST-IN-PLACE CONCRETE

03 30 00.01  00000  CAST-IN-PLACE CONCRETE SHORT FORM

03 30 51       03301  CONCRETE FOR BRIDGE DECKS

03 35 00       03362  CONCRETE FINISHING

03 35 05       03361  CONCRETE FLOOR HARDENING

03 41 00       03410  PRECAST STRUCTURAL CONCRETE

03 41 36       03420  PRECAST STRUCTURAL POST-TENSIONED CONCRETE

03 45 00       03450  Precast Architectural Concrete

04 05 19       04080  MASONRY ANCHORAGE AND REINFORCING

05 12 23       05121  STRUCTURAL STEEL FOR BUILDINGS

05 12 33       05122  STRUCTURAL STEEL FOR BRIDGES

05 14 11       00000  STRUCTURAL ALUMINUM FOR BUILDINGS

05 21 00       05210  STEEL JOIST FRAMING

05 31 00       05310  STEEL DECKING

05 41 00       05411  STRUCTURAL METAL STUD FRAMING

06 03 74       06071  HISTORIC - LONG-TERM TREATMENT OF WOOD

06 05 73       06070  WOOD TREATMENT

06 15 00       06150  WOOD DECKING

06 17 53       06171  SHOP - FABRICATED WOOD TRUSSES

06 18 00       00000  GLUED-LAMINATED CONSTRUCTION

09 97 19       09971  PAINTING EXTERIOR METAL SURFACES

13 34 23       13127  PREFABRICATED BUILDINGS

31 00 00.01  00000  EARTHWORK - SHORT FORM

31 09 16.01  00000  PILE DRIVING TEMPLATES

31 09 16.28  00000  PILE TESTS

31 22 13       02311  Rough Grading

31 23 16.26  00000  ROCK REMOVAL

31 23 33.01  00000  EXCAVATING, TRENCHING AND BACKFILLING

31 61 13       02451  PILE FOUNDATIONS, GENERAL REQUIREMENTS

31 62 13.19  00000  PRECAST CONCRETE PILES

31 62 16.13  00000  STEEL SHEET PILES

31 62 16.16  00000  STEEL H PILES

31 62 16.19  00000  UNFILLED TUBULAR STEEL PILES

31 62 19       02457  TIMBER PILES

31 63 19       02476  Bored And Socketed Piles

31 63 19.13  00000  ROCK SOCKETS FOR PILES

31 63 23       02465  BORED CONCRETE PILES

33 46 13.01  00000  FOUNDATION AND UNDERSLAB DRAINAGE

35 42 19       02379  Preservation of Water Courses

A1010       01 82 60  STANDARD FOUNDATIONS

A1030       01 82 65  SLABS ON GRADE (PERFORMANCE)

A2010       01 82 50  BASEMENT EXCAVATION

A2020       01 82 70  BASEMENT WALLS

B1010       01 83 50  FLOOR CONSTRUCTION

B1020       01 83 55  ROOF CONSTRUCTION

B2010       01 83 60  EXTERIOR WALLS

G1020       01 89 55  SITE DEMOLITION AND RELOCATIONS


HEAVY CIVIL ENGINEERING Package

Number    MF'95  Title

02 41 13       02225  Selective Site Demolition

02 41 13.14  00000  Asphalt Paving Removal

02 41 16       02222  STRUCTURE DEMOLITION

02 41 16.01  00000  STRUCTURE DEMOLITION - SHORT FORM

02 41 21       02227  DECONSTRUCTION OF STRUCTURES

02 41 99       00000  DEMOLITION FOR MINOR WORKS

02 61 00.01  00000  SOIL REMEDIATION

02 65 00       02115  UNDERGROUND STORAGE TANK REMOVAL

02 81 01       00000  HAZARDOUS MATERIALS

02 84 00       13285  POLYCHLORINATE BIPHENYL REMEDIATION

                            ADD DIVISION 03 - CONCRETE

05 12 23       05121  STRUCTURAL STEEL FOR BUILDINGS

05 12 33       05122  STRUCTURAL STEEL FOR BRIDGES

06 05 73       06070  WOOD TREATMENT

09 97 19       09971  PAINTING EXTERIOR METAL SURFACES

                            ADD DIVISION 11 - EQUIPMENT

26 42 00.01  00000  TELETHERMICS - CATHODIC PROTECTION

27 53 20       16851  MASTER TV ANTENNA

                            ADD DIVISION 31 - EARTHWORK

                            ADD DIVISION 32 - EXTERIOR IMPROVEMENTS

                            ADD DIVISION 33 - UTILITIES

                            ADD DIVISION 34VAR - TRANSPORTATION - VARIOUS

                            ADD DIVISION 35 - WATERWAY AND MARINE

44 41 13       11201  COMMERCIAL WATER TREATMENT PLANTS

A1010       01 82 60  STANDARD FOUNDATIONS

A1030       01 82 65  SLABS ON GRADE (PERFORMANCE)

A2010       01 82 50  BASEMENT EXCAVATION

A2020       01 82 70  BASEMENT WALLS

G1010       01 89 50  SITE CLEARING

G1020       01 89 55  SITE DEMOLITION AND RELOCATIONS

G1030       01 89 60  SITE EARTHWORK

G2010       01 89 70  ROADWAYS

G2020       01 89 76  PARKING LOT

G2030       01 89 78  PEDESTRIAN PAVING


INTERIOR DESIGN Package

Number    MF'95  Title

02 42 13       01359  CARPET RECLAMATION

02 81 01       00000  HAZARDOUS MATERIALS

02 83 10       00000  LEAD - BASE PAINT ABATEMENT - MINIMUM PRECAUTIONS

02 83 11       00000  LEAD - BASE PAINT ABATEMENT - INTERMEDIATE PRECAUTIONS

02 83 12       00000  LEAD - BASE PAINT ABATEMENT - MAXIMUM PRECAUTIONS

03 10 00       03100  CONCRETE FORMING AND ACCESSORIES

03 11 19       03131  Insulated Concrete Forms

03 20 00       03200  CONCRETE REINFORCING

03 30 00       03300  CAST-IN-PLACE CONCRETE

03 30 00.01  00000  CAST-IN-PLACE CONCRETE SHORT FORM

03 35 00       03362  CONCRETE FINISHING

03 35 05       03361  CONCRETE FLOOR HARDENING

03 45 00       03450  Precast Architectural Concrete

04 04 99       00000  MASONRY FOR MINOR WORKS

04 05 12       04060  MASONRY MORTAR AND GROUT

04 05 19       04080  MASONRY ANCHORAGE AND REINFORCING

04 05 23       04090  MASONRY ACCESSORIES

04 21 13       04211  BRICK MASONRY

04 21 19       04212  CLAY TILE MASONRY

04 22 00       04220  CONCRETE UNIT MASONRY

04 23 00       04270  GLASS UNIT MASONRY

04 43 13       04411  MARBLE VENEER CLADDING

04 43 16       04412  GRANITE VENEER CLADDING

04 43 19       04420  COLLECTED STONE VENEER CLADDING

04 43 23       04430  QUARRIED STONE VENEER CLADDING

04 43 26       04435  DIMENSION STONE VENEER CLADDING

04 71 13       04231  CALCIUM SILICATE MANUFACTURED BRICK MASONRY

04 71 14       04230  CALCIUM SILICATE MANUFACTURED UNIT MASONRY

04 73 13       04233  CALCIUM SILICATE MANUFACTURED STONE MASONRY

05 31 00       05310  STEEL DECKING

05 50 00       05500  METAL FABRICATIONS

05 51 29       05510  METAL STAIRS AND LADDERS

06 08 99       00000  ROUGH CARPENTRY FOR MINOR WORKS

06 10 00       06100  ROUGH CARPENTRY

06 10 00.01  00000  ROUGH CARPENTRY - SHORT FORM

06 20 00       06200  FINISH CARPENTRY

06 40 00       06400  ARCHITECTURAL WOODWORK

06 47 00       06666  PLASTIC LAMINATE FINISHING

07 16 19       07161  METAL OXIDE WATERPROOFING

07 17 13       07170  Bentonite Panel Waterproofing

07 19 00       07190  Water Repellents

07 21 13       07212  BOARD INSULATION

07 21 16       07213  BLANKET INSULATION

07 21 23       07211  LOOSE FILL INSULATION

07 21 29.01  00000  SPRAYED INSULATION - CELLULOSE

07 21 29.02  00000  SPRAYED INSULATION - MINERAL FIBRE

07 21 29.03  00000  SPRAYED INSULATION - POLYURETHANE FOAM

07 26 00       07160  VAPOUR RETARDERS

07 46 13       07465  PREFORMED METAL SIDING

07 46 23       07461  WOOD SIDING

07 46 33       07464  PLASTIC SIDING

07 72 33       07724  ROOF HATCHES

07 72 69       00000  ROOF ANCHORS AND SAFETY RESTRAINTS

07 81 00       07811  APPLIED FIREPROOFING

07 84 00       07840  FIRE STOPPING

07 92 00       00000  Joint Sealants

07 95 13       05810  EXPANSION JOINT COVER ASSEMBLIES

07 95 23       07712  PREFABRICATED ROOF EXPANSION JOINTS

08 11 00       00000  METAL DOORS AND FRAMES

08 11 16       08120  ALUMINUM DOORS AND FRAMES

08 11 19       08130  STAINLESS STEEL DOORS AND FRAMES

08 11 69       08181  METAL STORM DOORS AND FRAMES

08 13 73       08341  SLIDING METAL DOORS

08 14 16       08210  Flush Wood Doors

08 14 80       08260  SLIDING WOOD AND PLASTIC DOORS

08 33 13       08333  COILING COUNTER DOORS

08 33 23.01  00000  OVERHEAD COILING DOORS AND GRILLES

08 33 36       08332  SIDE COILING GRILLES

08 34 58.01  00000  VAULT DOORS AND FRAMES

08 34 83       08342  HINGED SAFETY GLASS DOORS

08 35 13.01  00000  PANEL FOLDING DOORS

08 35 13.13  00000  ACCORDION FOLDING DOORS

08 36 13.01  00000  SECTIONAL WOOD DOORS

08 36 13.02  00000  SECTIONAL METAL DOORS

08 36 13.03  00000  SECTIONAL PLASTIC DOORS

08 36 19       08371  MULTI-LEAF VERTICAL LIFT DOORS

08 36 19.01  00000  VERTICAL LIFT WOOD DOORS

08 36 19.02  00000  MULTI-LEAF VERTICAL LIFT METAL DOORS

08 38 16       08355  FLEXIBLE TRAFFIC DOORS

08 42 29       08460  AUTOMATIC ENTRANCES

08 62 10       08600  PLASTIC SKYLIGHTS

08 70 05       00000  CABINET AND MISCELLANEOUS HARDWARE

08 71 00       00000  DOOR HARDWARE

08 80 50       08800  GLAZING

09 21 16       09250  GYPSUM BOARD ASSEMBLIES

09 21 99       00000  PARTITIONS FOR MINOR WORKS

09 22 14       09205  FURRING AND LATHING

09 22 16       09110  Non-structural Metal Framing

09 23 00       09210  GYPSUM PLASTERING

09 30 13       09310  CERAMIC TILING

09 30 15       09330  QUARRY AND PAVER TILING

09 51 13       09510  ACOUSTICAL PANEL CEILINGS

09 51 99       00000  ACOUSTICAL CEILINGS FOR MINOR WORKS

09 53 00.01  00000  ACOUSTICAL SUSPENSION

09 54 23       09546  LINEAR METAL CEILINGS

09 58 00       09547  INTEGRATED CEILING ASSEMBLIES

09 63 40       09380  STONE FLOORING

09 64 23       09642  WOOD PARQUET FLOORING

09 64 29       09641  WOOD STRIP AND PLANK FLOORING

09 64 53       09643  RESILIENT WOOD FLOORING ASSEMBLIES

09 65 16       09652  RESILIENT SHEET FLOORING

09 65 19       09651  RESILIENT TILE FLOORING

09 65 99       00000  RESILIENT FLOORING FOR MINOR WORKS

09 66 13       09410  PORTLAND CEMENT TERRAZZO FLOORING

09 66 16       09420  TERRAZZO FLOOR TILING

09 66 23       09440  RESINOUS MATRIX TERRAZZO FLOORING

09 68 13       00000  TILE CARPETING

09 68 16       00000  SHEET CARPETING

09 69 00       10270  ACCESS FLOORING

09 72 16       09721  VINYL-COATED FABRIC WALL COVERINGS

09 80 00       00000  ACOUSTIC TREATMENT

09 91 13       09912  EXTERIOR PAINTING

09 91 13.01  00000  EXTERIOR RE-PAINTING

09 91 23       09911  INTERIOR PAINTING

09 91 23.01  00000  INTERIOR RE-PAINTING

09 91 99       00000  PAINTING FOR MINOR WORKS

09 96 53       09962  ELASTOMERIC COATINGS

09 96 59       09961  HIGH-BUILD GLAZED COATINGS

09 96 66       09963  AGGREGATE WALL COATINGS

10 11 13       10110  CHALKBOARDS

10 11 23       10120  TACKBOARDS

10 21 13.13  00000  METAL TOILET COMPARTMENTS

10 21 13.19  00000  PLASTIC TOILET COMPARTMENTS

10 21 16       10185  SHOWER AND DRESSING COMPARTMENTS

10 22 13       10605  WIRE MESH PARTITIONS

10 22 19       00000  POST AND PANEL DEMOUNTABLE PARTITIONS

10 22 19.01  00000  STUD TYPE DEMOUNTABLE PARTITIONS

10 22 26.13  00000  ACCORDION FOLDING PARTITIONS

10 22 26.33  00000  FOLDING PANEL PARTITIONS

10 26 00.01  00000  WALL AND CORNER GUARDS

10 28 10       10800  TOILET AND BATH ACCESSORIES

10 51 13       10505  METAL LOCKERS

10 56 13       10675  METAL STORAGE SHELVING

10 56 26.13  00000  MANUAL MOBILE STORAGE SHELVING

10 56 26.23  00000  MOTORIZED MOBILE STORAGE SHELVING

10 75 00       10350  FLAGPOLES

11 13 13       11163  LOADING DOCK BUMPERS

11 13 16       11164  LOADING DOCK SEALS AND SHELTERS

11 51 23.13  00000  METAL LIBRARY SHELVING

12 21 13       12492  HORIZONTAL LOUVRE BLINDS

12 21 16       12491  VERTICAL LOUVRE BLINDS

12 50 00       12500  FURNITURE

12 92 16       00000  INTERIOR PLANTINGS

14 12 00       14120  ELECTRIC DUMBWAITERS

14 31 00       14301  ESCALATORS

14 32 00       14302  MOVING WALKS

14 42 00       14421  WHEELCHAIR LIFTS

14 43 19       14331  SUSPENDED POWERED PLATFORMS

14 43 21       14430  PLATFORM LIFTS - HYDRAULIC

28 23 00       13704  VIDEO SURVEILLANCE


CONSERVATION Package

Number    MF'95  Title

02 43 13.05  00000  HISTORIC - STRUCTURE RELOCATION

02 81 01       00000  HAZARDOUS MATERIALS

04 03 06       04511  HISTORIC - CLEANING HISTORIC MASONRY

04 03 07       04921  HISTORIC - MASONRY REPOINTING

04 03 08       04065  HISTORIC - MORTARING

04 03 09       00000  HISTORIC - GROUTING

04 03 31       04911  HISTORIC - REPLACING BRICK

04 03 32       01455  HISTORIC - TESTING AND SAMPLING BRICK UNITS

04 03 41       04923  HISTORIC - REPAIRING STONE

04 03 42       04922  HISTORIC - REPLACING STONE

04 03 43       04924  HISTORIC - DISMANTLING STONE MASONRY

04 21 19       04212  CLAY TILE MASONRY

04 43 13       04411  MARBLE VENEER CLADDING

04 43 19       04420  COLLECTED STONE VENEER CLADDING

04 43 23       04430  QUARRIED STONE VENEER CLADDING

04 43 26       04435  DIMENSION STONE VENEER CLADDING

04 71 13       04231  CALCIUM SILICATE MANUFACTURED BRICK MASONRY

04 71 14       04230  CALCIUM SILICATE MANUFACTURED UNIT MASONRY

04 73 13       04233  CALCIUM SILICATE MANUFACTURED STONE MASONRY

06 03 12       06131  Historic - Period Horizontal Log Work

06 03 13       06155  Historic - Carvel Planking

06 03 15       06911  HISTORIC - SPLICING OF WOOD COMPONENTS

06 03 16       06912  HISTORIC - STORAGE AND PROTECTION OF WOOD

06 03 18       06914  Historic - Replacement of Curved Wood Members: Steam Bending

06 03 74       06071  HISTORIC - LONG-TERM TREATMENT OF WOOD

06 03 75       06072  HISTORIC - ERADICATION OF INSECTS IN WOOD

06 03 76       06073  Historic Structures - Antiseptic Treatment for Wood

06 05 73       06070  WOOD TREATMENT

06 08 99       00000  ROUGH CARPENTRY FOR MINOR WORKS

06 10 00       06100  ROUGH CARPENTRY

06 10 00.01  00000  ROUGH CARPENTRY - SHORT FORM

06 14 00       06140  TREATED WOOD FOUNDATIONS

06 15 00       06150  WOOD DECKING

07 03 13       07315  Historic - Slate Shingle Roofing

07 03 31       07305  HISTORIC - CONCRETE ROOFING

07 03 32       07314  HISTORIC - WOOD SHINGLES AND SHAKES ROOFING

07 03 33       07331  HISTORIC - SOD ROOFING

07 03 34       07332  Historic - Canvas Roofing

07 03 35       07415  HISTORIC - TIN-PLATE AND TERNEPLATE ROOFING

07 03 36       07471  Historic - Board Roofing

07 03 91       07921  Historic - Caulking Vessels

07 21 13       07212  BOARD INSULATION

07 21 16       07213  BLANKET INSULATION

07 61 00       07610  SHEET METAL ROOFING

08 03 11       08215  HISTORIC - PERIOD WOOD DOORS

09 03 51       09212  HISTORIC - PLASTER

09 03 61       09991  Historic - Repainting Exterior Surfaces

09 03 62       09992  Historic - Repainting Interior Surfaces

31 04 31       02250  HISTORIC - SUBGRADE SHORING AND BRACING


AIR TRANSPORTATION Package

Number    MF'95  Title

02 41 13.14  00000  Asphalt Paving Removal

02 81 01       00000  HAZARDOUS MATERIALS

10 14 00       00000  SIGNAGE

10 14 53       02891  TRAFFIC SIGNAGE

26 06 31       16234  DIESEL ELECTRIC GENERATING UNITS APPENDIX A - TECHNICAL DATA FORM

26 12 16.13  00000  PAD-MOUNTED, TRANSFORMERS FOR AIRFIELD VISUAL AIDS

26 32 13.03  00000  INSTALLATION OF ELECTRIC POWER GENERATING EQUIPMENT

26 32 13.04  00000  DIESEL ELECTRIC GENERATING UNITS (LIQUID COOLED)

26 32 13.05  00000  DIESEL ELECTRIC GENERATING UNITS (AIR COOLED)

26 32 13.07  00000  DIESEL ELECTRIC GENERATING UNITS APPENDIX B FACTORY TEST

26 55 36.01  00000  M.I. WHITE FLASHING OBSTRUCTION LIGHT

26 55 36.13  00000  	MEDIUM INTENSITY (M.I.) RED FLASHING OBSTRUCTION LIGHT

26 55 36.19  00000  LOW-INTENSITY (L.I.) RED OBSTRUCTION LIGHTING

32 01 16.01  00000  Flexible Paving Surface Grooving

                            ADD DIVISION 34ENG - TRANSPORTATION - ENGINEERING

34 77 13       14731  PASSENGER LOADING BRIDGES


MECHANICAL Package

Number    MF'95  Title

02 27 19       00000  THERMOGRAPHIC ASSESSMENT - MECHANICAL EQUIPMENT

02 65 00       02115  UNDERGROUND STORAGE TANK REMOVAL

02 81 01       00000  HAZARDOUS MATERIALS

08 31 00.01  00000  ACCESS DOORS - MECHANICAL

10 44 16.19  00000  FIRE EXTINGUISHERS AND SAFETY BLANKETS

11 24 19       11011  VACUUM CLEANING SYSTEMS

11 82 19       11171  PACKAGED INCINERATORS

14 12 00       14120  ELECTRIC DUMBWAITERS

14 31 00       14301  ESCALATORS

14 43 21       14430  PLATFORM LIFTS - HYDRAULIC

                            ADD DIVISION 21 - FIRE SUPPRESSION

                            ADD DIVISION 22 - PLUMBING

                            ADD DIVISION 23 - HEATING, VENTILATING AND AIR CONDITIONING

                            ADD DIVISION 25 - INTEGRATED AUTOMATION

26 27 19       16139  MULTI-OUTLET ASSEMBLIES

26 32 13.02  00000  POWER GENERATION TO 30 KW

26 32 13.05  00000  DIESEL ELECTRIC GENERATING UNITS (AIR COOLED)

26 42 00       13110  CATHODIC PROTECTION

26 42 00.01  00000  TELETHERMICS - CATHODIC PROTECTION

33 05 13.03  00000  TELETHERMICS PRE-FABRICATED STEEL MANHOLES

33 07 13       00000  TELETHERMICS - THERMAL INSULATION

33 56 13       13202  Aboveground Fuel Storage Tanks

33 56 16       13201  Underground Fuel Storage Tanks

33 65 13       02551  TELETHERMICS - DISTRIBUTION PIPING - STEEL

33 65 16       02552  TELETHERMICS - DISTRIBUTION PIPING - PVC - FRP

33 65 26       02556  TELETHERMICS - INSULATED AND PLASTIC JACKETTED SYSTEMS

33 65 29       02557  TELETHERMICS - DIRECTLY BURIED, LOOSE FILL INSULATED, SYSTEMS

33 65 33       02554  TELETHERMICS - DRYABLE DRAINABLE, TESTABLE CONDUIT SYSTEMS

33 65 43       02558  TELETHERMICS - STEEL TUNNEL SYSTEMS

33 65 46       02560  TELETHERMICS - SHALLOW INVERTED TRENCH (SIT) SYSTEMS

33 65 73       02581  CONCRETE ENCASED DUCT BANKS AND MANHOLES

42 20 00       15601  PROCESS COOLING EQUIPMENT

D1000       01 81 16  ENVIRONMENTAL DESIGN REQUIREMENTS

D2020       01 86 40  DOMESTIC WATER DISTRIBUTION

D2030       01 86 44  SANITARY WASTE

D2040       01 86 46  RAIN WATER DRAINAGE

D2050       01 86 48  OTHER PLUMBING SYSTEMS

D3000       01 86 50  DESIGN REQUIREMENTS - HVAC

D3010       01 86 51  ENERGY SUPPLY

D3020       01 86 53  HEAT GENERATION

D3030       01 86 54  REFRIGERATION

D3040       01 86 55  HVAC DISTRIBUTION

D3050       01 86 56  TERMINAL AND PACKAGED UNITS

D3060       01 86 70  CONTROLS AND INSTRUMENTATION

D3070       01 86 59  OTHER HVAC SYSTEMS AND EQUIPMENT

D3080       01 86 75  TESTING, ADJUSTING AND BALANCING

D4010       01 86 60  SPRINKLERS

D4020       01 86 61  STANDPIPE AND HOSE NETWORKS

D4030       01 86 65  FIRE PROTECTION SPECIALTIES

D4040       01 86 69  OTHER FIRE SUPPRESSION SYSTEMS


ELECTRICAL Package

Number    MF'95  Title

02 27 23       00000  THERMOGRAPHIC ASSESSMENT - ELECTRICAL SYSTEMS

02 81 01       00000  HAZARDOUS MATERIALS

14 42 00       14421  WHEELCHAIR LIFTS

14 43 19       14331  SUSPENDED POWERED PLATFORMS

23 82 21       15703  INCREMENTAL HEATING AND COOLING UNITS

23 82 39.01  00000  UNIT HEATERS - ELECTRIC

23 83 00.01  00000  Radiant Heaters - Electric Infrared

23 83 13       15704  RADIANT HEATING ELECTRIC CABLES

23 83 13.01  00000  RADIANT HEATING ELECTRIC CABLES - SNOW MELTING

23 83 13.02  00000  RADIANT HEATING ELECTRIC CABLES - FLOOR WARMING

                            ADD DIVISION 26 - ELECTRICAL

                            ADD DIVISION 27 - COMMUNICATIONS

                            ADD DIVISION 28 - ELECTRONIC SAFETY AND SECURITY

33 65 73       02581  CONCRETE ENCASED DUCT BANKS AND MANHOLES

33 65 76       02582  DIRECT BURIED UNDERGROUND CABLE DUCTS

33 71 16.01  00000  ELECTRICAL POLE LINES AND HARDWARE

33 71 73.01  00000  OVERHEAD ELECTRICAL SERVICE

33 71 73.02  00000  UNDERGROUND ELECTRICAL SERVICE

                            ADD DIVISION 34ENG - TRANSPORTATION - ENGINEERING

34 73 16.13  00000  AIRCRAFT STATIC GROUNDING

D1000       01 81 16  ENVIRONMENTAL DESIGN REQUIREMENTS

D5000       01 86 80  COMMON REQUIREMENTS - ELECTRICAL

D5010       01 86 82  ELECTRICAL SERVICE AND DISTRIBUTION

D5020       01 86 84  LIGHTING, POWER, AND BRANCH WIRING

D5030       01 86 86  COMMUNICATIONS AND SECURITY

D5050       01 86 88  ELECTRICAL CONTROLS AND INSTRUMENTATION


BUILDING SERVICES Package

Number    MF'95  Title

                            ADD DIVISION PBENG - PERFORMANCE-BASED - ENGINEERING

02 27 19       00000  THERMOGRAPHIC ASSESSMENT - MECHANICAL EQUIPMENT

02 27 23       00000  THERMOGRAPHIC ASSESSMENT - ELECTRICAL SYSTEMS

02 65 00       02115  UNDERGROUND STORAGE TANK REMOVAL

02 81 01       00000  HAZARDOUS MATERIALS

02 84 00       13285  POLYCHLORINATE BIPHENYL REMEDIATION

02 85 00.01  00000  MOULD REMEDIATION - MINIMUM PRECAUTIONS

02 85 00.02  00000  MOULD REMEDIATION - MEDIUM PRECAUTIONS

02 85 00.03  00000  MOULD REMEDIATION - MAXIMUM PRECAUTIONS

08 31 00.01  00000  ACCESS DOORS - MECHANICAL

10 44 16.19  00000  FIRE EXTINGUISHERS AND SAFETY BLANKETS

11 24 19       11011  VACUUM CLEANING SYSTEMS

11 82 19       11171  PACKAGED INCINERATORS

                            ADD DIVISION 14 - CONVEYING EQUIPMENT

                            ADD DIVISION 21 - FIRE SUPPRESSION

                            ADD DIVISION 22 - PLUMBING

                            ADD DIVISION 23 - HEATING, VENTILATING AND AIR CONDITIONING

                            ADD DIVISION 25 - INTEGRATED AUTOMATION

                            ADD DIVISION 26 - ELECTRICAL

                            ADD DIVISION 27 - COMMUNICATIONS

                            ADD DIVISION 28 - ELECTRONIC SAFETY AND SECURITY

33 05 13.03  00000  TELETHERMICS PRE-FABRICATED STEEL MANHOLES

33 07 13       00000  TELETHERMICS - THERMAL INSULATION

33 56 13       13202  Aboveground Fuel Storage Tanks

33 56 16       13201  Underground Fuel Storage Tanks

33 65 13       02551  TELETHERMICS - DISTRIBUTION PIPING - STEEL

33 65 16       02552  TELETHERMICS - DISTRIBUTION PIPING - PVC - FRP

33 65 26       02556  TELETHERMICS - INSULATED AND PLASTIC JACKETTED SYSTEMS

33 65 29       02557  TELETHERMICS - DIRECTLY BURIED, LOOSE FILL INSULATED, SYSTEMS

33 65 33       02554  TELETHERMICS - DRYABLE DRAINABLE, TESTABLE CONDUIT SYSTEMS

33 65 43       02558  TELETHERMICS - STEEL TUNNEL SYSTEMS

33 65 46       02560  TELETHERMICS - SHALLOW INVERTED TRENCH (SIT) SYSTEMS

33 65 73       02581  CONCRETE ENCASED DUCT BANKS AND MANHOLES

33 65 76       02582  DIRECT BURIED UNDERGROUND CABLE DUCTS

33 71 16.01  00000  ELECTRICAL POLE LINES AND HARDWARE

33 71 73.01  00000  OVERHEAD ELECTRICAL SERVICE

33 71 73.02  00000  UNDERGROUND ELECTRICAL SERVICE

                            ADD DIVISION 34ENG - TRANSPORTATION - ENGINEERING

34 73 16.13  00000  AIRCRAFT STATIC GROUNDING

42 20 00       15601  PROCESS COOLING EQUIPMENT

A1030       01 82 65  SLABS ON GRADE (PERFORMANCE)


00 01 07 SEALS PAGE

Date: 2007/12/31

Related sections:

Notes:

Use this page to affix Professional Seals of design professionals and others responsible for preparing construction documents when required by the Client or when mandated by Provincial, Territorial or Municipal authorities having jurisdiction. For projects in Ontario also list on this page the Building Code Designation Number (BCDN) and the name of the Consultant responsible for the Building Code review.


00 01 10 TABLE OF CONTENTS

Date: 2007/12/31

Related sections:

Notes:

Use this Section for the Table of Contents for the project.  The Table of Contents may include a List of Drawing Sheets as well as documents and specification sections.  However, the List of Drawings may also be included separately in Section 00 01 15 - List of Drawing Sheets.  If the Project Manual is split into multiple volumes, this section should be included in each volume.


00 11 21 REQUEST FOR PROPOSAL - DESIGN-BUILD

Date: 2006/06/30

Related sections:

011100 - SUMMARY OF WORK

Notes:

DESCRIPTION: This document is intended for describing requirements of a design-build proposal for design or construction or both - of a project.  A contract for design-build work can be formalized on a Government contract form or a CCA or CCDC form for Stipulated Price or Cost Plus or other negotiated contract form.  The Contract Documents that will be defined in the General Conditions, will probably be the accepted proposal.

As there are many differing forms of design-build arrangements, this document must be stylized to suit.  Confirm with the Owner/Engineer if any special or unusual bidding criteria should be considered.  Should significant revisions be contemplated to this performance layout of proposal text, ensure that words and terms conform to the CCDC Definitions or definitions of the contract form that will be used.  In the instance of owner purchased equipment preceding this Contract, include a copy of each purchase order at the end of this Instructions to Bidders as an attachment for information.  Terminology Note: the Federal Government use the term "Tender" and the private sector use the term "Bid" - this document offers both options.

This Section 00 11 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 00205 - Request for Proposal - Design-Build in accordance with MasterFormat 1995.


00 21 13 INSTRUCTIONS TO BIDDERS

Date: 2009/12/31

Related sections:

011100 - SUMMARY OF WORK
012310 - ALTERNATIVES

Notes:

This Document is intended for general construction work in  the private sector. Use CCDC forms for Stipulated Price, Cost Plus, or Unit Price contracts or other negotiated contract work for the private sector. Confirm with the Owner if any special bidding criteria should be added to this Document. Should significant revisions be contemplated to this proforma layout of text, ensure that words and terms conform to the CCDC Definitions.

This Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 11 00 SUMMARY OF WORK

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This section relies on provisions of CCDC General Conditions; when other general conditions are used, a re-edit of this section may be required. For multiple contract work, use Section 01 12 00.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

Do not use this Section for Public Works and Government Services Canada projects.

This Section 01 11 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01110 - Summary of Work in accordance with MasterFormat 1995.


01 12 00 MULTIPLE CONTRACT SUMMARY

Date: 2006/03/31

Related sections:

015100 - TEMPORARY UTILITIES
011200 - MULTIPLE CONTRACT SUMMARY
017411 - CLEANING
017100 - EXAMINATION AND PREPARATION
311100 - CLEARING AND GRUBBING
040500 - COMMON WORK RESULTS FOR MASONRY
040512 - MASONRY MORTAR AND GROUT
040519 - MASONRY ANCHORAGE AND REINFORCING
042200 - CONCRETE UNIT MASONRY
055000 - METAL FABRICATIONS
061000 - ROUGH CARPENTRY
071113 - BITUMINOUS DAMPPROOFING
210501 - COMMON WORK RESULTS FOR MECHANICAL
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
230713 - DUCT INSULATION
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC
235200 - HEATING BOILERS
236510 - CONDENSERS, COOLERS AND COOLING TOWERS
238219 - FAN COIL UNITS

Notes:

Multiple contracts may require a 'constructor' to be identified; for Province of Ontario refer to Occupational Health and Safety Act and Regulations for Construction Projects O.Reg.213/91 as amended by O.Reg.631/94.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

Do not use this Section for Public Works and Government Services Canada projects.

This Section 01 12 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01120 - Multiple Contract Summary in accordance with MasterFormat 1995.


01 14 00 WORK RESTRICTIONS

Date: 2010/12/31

Related sections:

Notes:

DESCRIPTION: This Section specifies administrative procedures associated with connecting to existing services and special scheduling requirements for the project.

For Stipulated Price (lump sum) contracts, this Section is written to complement the Federal Government's General Provisions and General Conditions as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 21 00 ALLOWANCES

Date: 2006/03/31

Related sections:

Notes:

Include cash and contingency allowances. Define work performed under a cash allowance in the respective technical specification Section; refer to specification Sections for product/installation requirements only.

For Stipulated Price (lump sum) contracts, this Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC. For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section is not intended for use on Federal Government projects.

This Section 01 21 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01210 - Allowances in accordance with MasterFormat 1995.


01 23 10 ALTERNATIVES

Date: 2010/12/31

Related sections:

032000 - CONCRETE REINFORCING
033000 - CAST-IN-PLACE CONCRETE
055000 - METAL FABRICATIONS

Notes:

This Section establishes the process for evaluating alternative materials, products, or processes when requesting a costing alternative to a base bid specification. Include a description of factors affecting related elements of Work. Base bid should be identified in all instances. Do not confuse the requirements of this Section with the requirements in Section 00 21 13 - Instructions to Bidders. Use this Section with caution because of the potential effect an alternative may have on the Bid Price. A contract might be awarded on the basis of an alternative which substantially reduces the Contract Price, even though the base bid was not low.

This Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 29 00 PAYMENT PROCEDURES

Date: 2006/03/31

Related sections:

Notes:

This Section is to be used for Private Sector projects only. Do not use this Section on Federal Government contracts.

For Stipulated Price (lump sum) contracts, this Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 29 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01290 - Payment Procedures in accordance with MasterFormat 1995.


01 29 83 PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Date: 2010/12/31

Related sections:

Notes:

DESCRIPTION: This Section establishes the general requirements for inspection and testing that is specified to be carried out by a testing laboratory designated by Departmental Representative, DCC Representative or Consultant. The appointment, direction and payment for this inspection and testing are under direct control of the Departmental Representative, DCC Representative or Consultant. Specifications should refer to this Section and include particular inspection, sampling and testing to be performed, laboratory address, size and quantity of samples, packaging instructions and other particular requirements affecting Contractor's or Design-Builder's responsibilities and costs.

This Section is not intended to apply to mill test reports and certificates of compliance, tests to demonstrate or adjust and balance equipment and systems, or other similar requirements for quality control that are Contractor's or Design-Builder's responsibility. Particular requirements should be specified in appropriate Sections related to the product, equipment or system.

Amend this Section to include particular requirements and related responsibilities of Contractor or Design-Builder for projects where on site laboratory is provided by Departmental Representative, DCC Representative or Consultant, or where more extensive on site facilities are to be provided by Contractor or Design-Builder for laboratory personnel, equipment, and sample storage.

For Stipulated Price (lump sum) contracts, this Section is written to complement the Federal Government's General Conditions as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 31 19 PROJECT MEETINGS

Date: 2006/06/30

Related sections:

013216
013300 - SUBMITTAL PROCEDURES
015200 - CONSTRUCTION FACILITIES
017800 - CLOSEOUT SUBMITTALS

Notes:


01321606 CONSTRUCTION PROGRESS SCHEDULE - CRITICAL PATH METHOD (CPM)
01 32 16.06 CONSTRUCTION PROGRESS SCHEDULE - CRITICAL PATH METHOD (CPM)

Date: 2006/06/30

Related sections:

012100 - ALLOWANCES

Notes:

DESCRIPTION: This Section specifies a time management approach using a project management control system based upon Critical Path Method (CPM) techniques.  The level of application of time management techniques will depend on project size, complexity, time restriction, and client requirements. Refer to Section 01 32 16.07 - Construction Progress Schedules - Bar (GANTT) Chart for other forms of time management levels of application.

SUPPORT: This Section was developed jointly by the National Master Specification (NMS) Secretariat and PWGSC/RPS/AES/Project Management Directorate and with assistance from Canadian Construction Association (CCA).

ENVIRONMENTAL: Sustainable design and other environmental considerations such as environmental assessment audits should be taken into account as an integral part of Project Planning, Monitoring and Control.

This Section is written to complement the Federal Government's General Conditions "C" and Terms of Payment "B".  Some modifications may be required if other forms of contract such as Canadian Construction Documents Committee - CCDC 2 are used as the basis for the Construction Agreement.

This Section follows the principles of PWGSC/RPS/AES/PMD Best Practice document - Project Time Management, Project Planning, Monitoring and Control.


01321607 CONSTRUCTION PROGRESS SCHEDULE - BAR (GANTT) CHART
01 32 16.07 CONSTRUCTION PROGRESS SCHEDULE - BAR (GANTT) CHART

Date: 2006/06/30

Related sections:

Notes:

DESCRIPTION: This Section represents a simplified approach to construction progress schedules, principally using Bar (GANTT) Charts. The level of application of time management techniques construction scheduling, will depend on project size, complexity, time restriction, and client requirements. Refer to Section 01 32 16.06 - Construction Progress Schedule - Critical Path Method (CPM), for other forms of time management levels of application.

SUPPORT: This Section was developed jointly by the National Master Specification (NMS) Secretariat, PWGSC/RPS/AES/Project Management Directorate and follows the principles of PMD Best Practice document - Project Time Management, Project Planning, Monitoring and Control.

ENVIRONMENTAL: Sustainable design and other environmental considerations such as environmental assessment audits should be taken into account as an integral part of Project Planning, Monitoring and Control.

This Section is written to complement the Federal Government's General Conditions 'C'. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 33 00 SUBMITTAL PROCEDURES

Date: 2009/12/31

Related sections:

Notes:

DESCRIPTION: This Section includes submissions of data or products to confirm or deny conformance to Contract Documents. Co-ordinate this Section with Section 01 79 00 - Demonstration and Training and Section 01 78 00 - Closeout Submittals.

This Section is written to complement the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01350006 SPECIAL PROCEDURES FOR TRAFFIC CONTROL
01 35 00.06 SPECIAL PROCEDURES FOR TRAFFIC CONTROL

Date: 2005/12/31

Related sections:

312413 - ROADWAY EMBANKMENTS
321116
321123 - Aggregate Base Courses
321216 - Asphalt Paving
32121616 - Road-Mix Asphalt Paving Wearing Courses

Notes:

DESCRIPTION: This Section specifies operational requirements and traffic control for Heavy Civil contracts when roadway traffic is to be accommodated during construction.

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01351313 SPECIAL PROCEDURES FOR AIRPORT FACILITIES
01 35 13.13 SPECIAL PROCEDURES FOR AIRPORT FACILITIES

Date: 2005/12/31

Related sections:

015600 - TEMPORARY BARRIERS AND ENCLOSURES

Notes:

DESCRIPTION: This Section specifies movement of equipment and other special procedures that must be considered when construction is being carried out while the airport facility is in use.

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01351343 SPECIAL PROJECT PROCEDURES FOR CONTAMINATED SITES
01 35 13.43 SPECIAL PROJECT PROCEDURES FOR CONTAMINATED SITES

Date: 2006/03/31

Related sections:

013531
013529

Notes:

DESCRIPTION: This Section specifies procedures associated with remediating contaminated sites after  an initial assessment has determined that the site is contaminated. This Section should be used together with Section 01 35 31 - Health and Safety for Contaminated Sites. Site remediation sections dealing with specific remediation activities are specified elsewhere.


01 35 21 LEED REQUIREMENTS

Date: 2006/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies requirements and procedures defined by Canada Green Building Council's (CaGBC) LEED prerequisites and credits required for LEED, Certified, Silver, Gold, or Platinum Project certification.

Canada Green Building Council's (CaGBC) LEED rating systems allocates points by meeting specific performance criteria set out in Prerequisites and Credits. Review the Evaluations and the Canada Green Building Council's (CaGBC) "LEED (Leadership in Energy and Environmental Design): Green Building Rating System" before editing this Section. Note that all LEED credits are optional, so requirements for credits not sought should be deleted.


01352906 HEALTH AND SAFETY REQUIREMENTS
01 35 29.06 HEALTH AND SAFETY REQUIREMENTS

Date: 2006/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
014100 - REGULATORY REQUIREMENTS
312316

Notes:

DESCRIPTION: Use this section on all Public Works and Government Services Canada (PWGSC) projects. This section includes health and safety considerations required to ensure that PWGSC shows due diligence towards health and safety on construction sites, and meets the requirements laid out in PWGSC/RPB Departmental Policy DP 073 - Occupational Health and Safety - Construction.

Close co-ordination with the Contractor's Work Plan should define the scope of the Work. Broad statements in this text may be interpreted to require more Work than intended, adding to construction costs unnecessarily, and must be carefully edited to specific project requirements. Avoid over specifying.


01352914 HEALTH AND SAFETY FOR CONTAMINATED SITES
01 35 29.14 HEALTH AND SAFETY FOR CONTAMINATED SITES

Date: 2006/03/31

Related sections:

Notes:

DESCRIPTION: This Section specifies detailed health and safety guidelines for hazardous construction type of projects. The guidelines are minimal requirements which are intended to provide for a safe and minimal risk working environment for personnel and to minimize impact of activities on the public and environment involving contact with hazardous materials.

The requirements for Health and Safety must be reviewed with an industrial hygiene specialist. Close co-ordination with the Work Plan should define the scope of the Work. Broad statements in this text may be interpreted to require more Work than intended, adding to construction costs unnecessarily, and must be carefully edited to specific project requirements. Avoid over specifying.


01 35 35 DND FIRE SAFETY REQUIREMENTS

Date: 2005/12/31

Related sections:

Notes:

DESCRIPTION: This Section specifies Fire Safety Requirements on Department of National Defence (DND) property.

Use this Section for DND projects only.

This Section 01 35 35 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01352 - DND Fire Safety Requirements in accordance with MasterFormat 1995.


01 35 43 ENVIRONMENTAL PROCEDURES

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


01 35 73 PROCEDURES FOR DECONSTRUCTION OF STRUCTURES

Date: 2006/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: Prior to the use of this Section every effort should be made to assess the economic viability of deconstruction and the degree (i.e. partial or total) to which it should be specified. Variables which will affect these decisions include: the size, type, age of the structure; the material composition of the structure; the quality and quantity of salvageable materials; the status of local reuse and recycling markets; and project time lines. This Section does not specify the requirements and procedures of deconstructing entire structures for the purpose of re-erection (or parts thereof) elsewhere.


01 41 00 REGULATORY REQUIREMENTS

Date: 2006/03/31

Related sections:

028400 - POLYCHLORINATE BIPHENYL REMEDIATION
028500

Notes:

DESCRIPTION: This Section includes administrative requirements for references to codes and discovery of hazardous materials including asbestos, PCB's and mould, and their remediation.

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 41 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01410 - Regulatory Requirements in accordance with MasterFormat 1995.


01 45 00 QUALITY CONTROL

Date: 2006/03/31

Related sections:

012100 - ALLOWANCES

Notes:

DESCRIPTION: This Section specifies the administrative and financial requirements for testing, inspection and report writing requested in the specifications in order to reduce the need to repeat these requirements in applicable specification Sections.

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 45 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01450 - Quality Control in accordance with MasterFormat 1995.


01 47 13 SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
025013 - MANAGEMENT OF TOXIC WASTE
312333
013573 - PROCEDURES FOR DECONSTRUCTION OF STRUCTURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
026500 - UNDERGROUND STORAGE TANK REMOVAL
335613 - Aboveground Fuel Storage Tanks
335616 - Underground Fuel Storage Tanks

Notes:

This Section 01 47 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01361 - Sustainable Requirements: Concept Design in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the requirements for the Concept Design strategy.

ENVIRONMENTAL: This Section will outline the holistic green design framework within which the project will evolve in the design process. It describes the design criteria for the project, sets sustainable goals based on the projects design decisions, in an effort to avoid undefined goals, disjointed efforts and mis-communications between the Engineer/Consultant and the Contractor. The sustainability goals are delineated with measurable performance targets. Operational requirements are specified to transform the design requirements into physical (site and building) requirements.


01 47 15 SUSTAINABLE REQUIREMENTS: CONSTRUCTION

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
025013 - MANAGEMENT OF TOXIC WASTE
312333
312213 - Rough Grading
014713 - SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN
013573 - PROCEDURES FOR DECONSTRUCTION OF STRUCTURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
329219
329223 - SODDING

Notes:

This Section 01 47 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01362 - Sustainable Requirements: Construction in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the specific environmental and sustainable requirements for building materials, products and systems needed to ensure that this project complies with green design processes and the client's sustainable development plan.

ENVIRONMENTAL: This Section captures the specific construction requirements for the project. The specification text ensures that the project will comply with the PWGSC green design process and the sustainability requirements. It will set the administrative, temporary and procedural requirements for the use of materials and methods of construction, which improve energy and water efficiency, reduce hazardous by-products, and use recycled materials, or materials, which can be reused.


01 47 17 SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
025013 - MANAGEMENT OF TOXIC WASTE

Notes:

This Section 01 47 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01363 - Sustainable Requirements: Contractor's Verification in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the opportunities for verification of the performance requirements and expected results included in the Concept Design and specified in Section 01 47 15 - Sustainable Requirements: Construction.

ENVIRONMENTAL: This Section will set the administrative, temporary and procedural requirements to provide the Engineer/Consultant with an opportunity to solicit verification from the Contractor that the sustainable requirements specific to each technical section have been complied with and met. For example where an energy performance target for the building is indicated the text would require the Contractor to demonstrate that the specified target had been achieved.


01 47 19 SUSTAINABLE REQUIREMENTS: OPERATION

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
025013 - MANAGEMENT OF TOXIC WASTE
312333
312213 - Rough Grading
017800 - CLOSEOUT SUBMITTALS
026500 - UNDERGROUND STORAGE TANK REMOVAL
335616 - Underground Fuel Storage Tanks
335613 - Aboveground Fuel Storage Tanks

Notes:

This Section 01 47 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01364 - Sustainable Requirements: Operation in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies products, materials, services, and methods used in the operation and maintenance of the building consistent with a procurement policy of eco-purchasing that reduces the volume of wastes, material costs, toxicity of products and supports recycling.

ENVIRONMENTAL: This Section provides information that does not describe prescriptive measures. The operational requirements are expressed in such a way that the objectives for achieving sustainable project operation are unambiguous, and the effectiveness criteria and performance measures are clear.


01 51 00 TEMPORARY UTILITIES

Date: 2006/06/30

Related sections:

015200 - CONSTRUCTION FACILITIES

Notes:

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 01 51 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01510 - Temporary Utilities in accordance with MasterFormat 1995.


01 52 00 CONSTRUCTION FACILITIES

Date: 2006/06/30

Related sections:

015100 - TEMPORARY UTILITIES

Notes:

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 01 52 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01520 - Construction Facilities in accordance with MasterFormat 1995.


01 56 00 TEMPORARY BARRIERS AND ENCLOSURES

Date: 2006/03/31

Related sections:

Notes:

Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 56 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01560 - Temporary Barriers and Enclosures in accordance with MasterFormat 1995.


01 61 00 COMMON PRODUCT REQUIREMENTS

Date: 2006/03/31

Related sections:

017300 - EXECUTION

Notes:

For Stipulated Price (lump sum) contracts, this Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Federal Government work use the term 'Tender' not 'Bid'.

This Section 01 61 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01610 - Basic Product Requirements in accordance with MasterFormat 1995.


01 71 00 EXAMINATION AND PREPARATION

Date: 2006/06/30

Related sections:

Notes:

For Stipulated Price (lump sum) contracts, this Section is written to complement the Canadian Construction Documents Committee (CCDC), document CCDC 2 and the Federal Government General Conditions 'C'. Modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), DOCUMENT 14 - 2000 Design-Build Stipulated Price Contract (CCA, CSC, RAIC) and DOCUMENT  15 - 2000 Design-Builder/Consultant Contract (CCA, CSC, RAIC). Modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 71 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01720 - Preparation in accordance with MasterFormat 1995.


01 73 00 EXECUTION

Date: 2006/03/31

Related sections:

Notes:

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 74 11 CLEANING

Date: 2006/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section is written to compliment the Federal Government's General Conditions 'C' as well as the Canadian Construction Documents Committee (CCDC), document CCDC 2. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.

This Section 01 74 11 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01740 - Cleaning in accordance with MasterFormat 1995.


01 74 21 CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Date: 2006/09/30

Related sections:

Notes:

DESCRIPTION: The purpose of this Section is to reduce the amount of materials sent to landfills, to maximize the salvage of materials for reuse and recycling and to specify a systematic waste management program, which at the completion of the project, will have clear documentation of the implemented waste management program.

For Federal Government projects only use the term 'Tender' not 'Bid'.

This Section 01 74 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 01355 - Waste Management And Disposal in accordance with MasterFormat 1995.


01 77 00 CLOSEOUT PROCEDURES

Date: 2009/06/30

Related sections:

017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 78 00 CLOSEOUT SUBMITTALS

Date: 2009/06/30

Related sections:

014500 - QUALITY CONTROL
017900 - DEMONSTRATION AND TRAINING
017100 - EXAMINATION AND PREPARATION

Notes:

For Design-Build contracts this Section is written to complement the Canadian Construction Documents Committee (CCDC), documents DOC 14 - Design-Build Stipulated Price Contract and DOC 15 - Design-Build/ Consultant Contract. Some modifications may be required if other forms of contract are used as the basis for the Construction Agreement.


01 79 00 DEMONSTRATION AND TRAINING

Date: 2009/06/30

Related sections:

Notes:


01 91 13 GENERAL COMMISSIONING (CX) REQUIREMENTS

Date: 2005/09/30

Related sections:

019131 - COMMISSIONING (CX) PLAN
019133 - COMMISSIONING FORMS
013216
019141 - COMMISSIONING: TRAINING

Notes:

DESCRIPTION: This section specifies general requirements relating to commissioning of all components, equipment, sub-systems, systems and integrated systems.


01 91 31 COMMISSIONING (CX) PLAN

Date: 2006/03/31

Related sections:

019133 - COMMISSIONING FORMS
019141 - COMMISSIONING: TRAINING

Notes:

DESCRIPTION: This Section describes the overall structure for the Commissioning of components, equipment, sub-systems, systems and integrated systems.

Read PWGSC Commissioning Guidelines CP.4 and other related PWGSC Commissioning documents.

Although all PWGSC projects require to be commissioned, not all projects require a Commissioning Plan. Discuss requirements with Consultant, PWGSC Project Manager and PWGSC Commissioning Manager.

Where this Section 01 91 31 - Commissioning (Cx) Plan is not included in the project specifications, specification writer to incorporate all relevant paragraphs from this Section into Section 01 91 13 - General Commissioning (Cx) Requirements.


01 91 33 COMMISSIONING FORMS

Date: 2005/09/30

Related sections:

Notes:

This section establishes requirements for the provision and use of installation/start-up check lists, product information and performance verification and commissioning report forms..

For PWGSC projects, a listing of commissioning forms can be found in the PWGSC Commissioning Guidelines, all of which are available at the Documentation Reference Centre.


01 91 41 COMMISSIONING: TRAINING

Date: 2005/09/30

Related sections:

Notes:

DESCRIPTION: This Section describes the training in architectural, structural, mechanical and electrical systems and equipment that is required to be provided to O&M personnel, plus Client, User, etc. as specified herein.

Refer to PWGSC's "CP.5 - Guide to the Preparation of Training Plans - 3rd edition November 2003", and prepare appropriate project-specific training plans for Architectural and Structural, Mechanical and Electrical and insert into the end of Section 01 91 41.


01 91 51 BUILDING MANAGEMENT MANUAL (BMM)

Date: 2005/09/30

Related sections:

Notes:

DESCRIPTION: This Section describes the requirements for the provision of those elements of the Building Management Manual, to be provided by the Contractor.  The Building Management Manual explains: (1) what systems, equipment and components that have been incorporated into the building, (2) why these systems equipment and components were selected and (3) how the design and operating concepts of the sub-systems, systems, and integrated systems are accomplished.

The Building Management Manual for new projects and existing buildings which have undergone major retrofit shall be completely new. Existing buildings which have undergone minor renovations, fit-ups, etc. shall consist of the existing manual updated to reflect work of this project.

For further information relating to the project-specific development of this section, the specification writer is referred to PWGSC's Commissioning Guideline -"CP.4 - Guide to the Preparation of Building Management Manuals".


02 27 13 THERMOGRAPHIC ASSESSMENT - BUILDING ENVELOPE

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies Thermographic assessment will reveal whether or not there is unexpected thermal bridging, air leakage, or convection owing to missing, incorrectly applied, or shifted insulation. It will also indicate moisture accumulations resulting from exfiltration of interior warm humid air or exterior water leaking into the building envelope. Thermographic patterns can be recognized as thermal bridging, irregularities in insulation, air leakage, convection, or moisture accumulation by properly trained and experienced thermographers.

Thermographic instruments produce two-dimensional images of surfaces by measuring thermal radiation emanating from that surface. Temperature gradients on surfaces are seen as variations in contrast or pseudo colour on camera viewer screen. If radiation gradients are caused by heat transfer variations in the wall because of thermal anomalies, these anomalies and their locations are made visible.

As concerns regarding indoor air quality increase, there is increasing concern with respect to mould. Thermal imagers cannot detect mould directly; they can often detect evidence of latent moisture associated with mould presence.  Since moisture presence is not positive proof of mould presence, further laboratory tests will be required to confirm mould within moist areas detected.

Thermographic inspection services for building envelopes do not form specific requirements for certain LEED prerequisites and credits in accordance with the Canada Green Building Council (CaGBC) - LEED Canada-NC Version 1.0. However, they can be included as part of Energy and Atmosphere (EA) Credit 3-Best Practice Commissioning. Thermographic inspections will verify that building envelopes are correctly built and meet minimum energy performance as designed to meet EA Prerequisite 2 - Minimum Energy Performance. When project requires LEED certification co-ordinate with NMS Section 01 35 21 - LEED Requirements.


02 27 16 THERMOGRAPHIC ASSESSMENT - ROOF

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies Thermographic Assessment will reveal whether or not there is unexpected thermal bridging, air leakage, or convection owing to missing, incorrectly applied, or shifted insulation. It will also indicate moisture accumulations resulting from exfiltration of interior warm humid air or exterior water leaking into the roof system.  Thermographic patterns can be recognized as thermal bridging, irregularities in insulation, air leakage, convection, or moisture accumulation by properly trained and experienced thermographers.

Thermographic instruments produce two-dimensional images of surfaces by measuring thermal radiation emanating from that surface. Temperature gradients on surfaces are seen as variations in contrast or pseudo colour on camera viewer screen. If radiation gradients are caused by heat transfer variations in the wall because of thermal anomalies, these anomalies and their locations are made visible.

Performed on a regular basis, infrared thermography can help to extend overall life of roofing systems when utilized as part of a preventive maintenance program.  Many roofs can gain significant quantities of moisture in very short periods. Retrofitted roof systems can become saturated in a matter of weeks while leaking little or no water into occupied spaces. By the time roof leaks are noticed, replacement may be the only option available.

Best candidates for infrared inspection are conventional flat or low slope roofs where insulation is located between roof deck and membrane and is in direct contact with underside of membrane. Applicable constructions are roofs with either smooth or gravel-surfaced, built-up or single-ply membranes. If gravel is present, it should be less than 13 mm diameter and less than 25 mm thick.

Imagers having short wavelength capabilities will provide more accurate results for smooth surfaced roofs, and roofs having reflective coatings. All infrared data should be verified by qualified roofing professionals using core sampling or invasive moisture meter readings.

Other forms of non-destructive testing such as capacitance or nuclear gauge testing may provide better results for roofs covered with high density ballast or pavers. Presence of ballast materials will mask small temperature differentials associated with latent moisture since they are capable of absorbing large amounts of solar energy during daylight hours.

Thermographic inspection services for roof systems do not form specific requirements for certain LEED prerequisites and credits in accordance with the Canada Green Building Council (CaGBC) - LEED Canada-NC Version 1.0.  However, they can be included as part of Energy and Atmosphere (EA) Credit 3-Best Practice Commissioning. Thermographic inspections will verify that roofs are correctly built and meet minimum energy performance as designed to meet EA Prerequisite 2 - Minimum Energy Performance. When project requires LEED certification co-ordinate with NMS Section 01 35 21 - LEED Requirements.


02 27 19 THERMOGRAPHIC ASSESSMENT - MECHANICAL EQUIPMENT

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section identifies thermally related anomalies moving pars, refractories, or heating and cooling equipment that is capable of direct line-of sight inspection. Inspection is intended to identify anomalies relating to localized heating arising from worn bearings, misaligned drive belts, blocked valves, degraded refractory insulation or leaks in in-floor heating systems.

Thermographic inspection services for mechanical equipment do not form specific requirements for certain LEED prerequisites and credits in accordance with the Canada Green Building Council (CaGBC) - LEED Canada-NC Version 1.0. However, they can be included as part of Energy and Atmosphere (EA) Credit 3-Best Practice Commissioning. Thermographic inspections will verify that mechanical equipment is correctly installed and operating within normal temperature ranges.  When project requires LEED certification co-ordinate with NMS Section 01 35 21 - LEED Requirements.


02 27 23 THERMOGRAPHIC ASSESSMENT - ELECTRICAL SYSTEMS

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: Use this Section to identify thermally related anomalies in AC or DC electrical equipment that is capable of direct line-of sight inspection. Inspection is intended to identify anomalies relating to localized heating arising from abnormally warm connections with high resistance caused by poor, loose, improper, corroded, old, over tightened, dissimilar metal or dirty connections.

Most thermographic inspection equipment used in the field is not rated for use in volatile environments. This Section should not be used for inspection services located in Classified Hazardous Locations: Class I, II, and III, Divisions 1 and 2; and Class I, Zones 0, 1, and 2 as defined in NFPA 70E.

Thermographic inspection services for electrical  equipment do not form specific requirements for certain LEED prerequisites and credits in accordance with the Canada Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.  However, they can be included as part of Energy and Atmosphere (EA) Credit 3-Best Practice Commissioning. Thermographic inspections will verify that electrical equipment is correctly installed and operating within normal temperature ranges.  When project requires LEED certification co-ordinate with NMS Section 01 35 21 - LEED Requirements.


02 41 13 Selective Site Demolition

Date: 2004/09/30

Related sections:

312333
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013216
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
028101 - HAZARDOUS MATERIALS
337173
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

This Section 02 41 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02225 - Sitework Demolition and Removal in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for demolishing, salvaging, recycling and removing wholly or in part, various items designated to be removed or partially removed and for backfilling resulting trenches, and excavations.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Demolition work includes special requirements with respect to de-construction, stock piling and alternate disposal of materials.

ENVIRONMENTAL: Retaining and reusing materials: when renovating, specify the careful removal of materials for future reuse, and where possible, source salvaged components. Prior to project start it is beneficial to gain a firm understanding of the types, quantities and value of the salvageable materials. (Ontario's 3Rs Regulations require that a Waste Audit and Waste Reduction Workplan be completed for certain projects prior to the start of any work). Research should also be done into the state of local reuse and recycling markets. This information will prove to be valuable during project supervision.

ENVIRONMENTAL: Ensure that the information (related to waste diversion) contained within this Section does not conflict with any instructions given in other Sections.

ENVIRONMENTAL: Reducing environmental impact: retaining buildings and upgrading or adapting them for new uses reduces the current environmental damage caused by producing materials such as steel and concrete. Reusing buildings require lower quantities of natural and manufactured materials since a structure is already in place.

This Section specifies sustainable requirements related to Construction and Verification.

For demolition of structures, use Section 02 41 16 - Structure Demolition.


02411314 Asphalt Paving Removal
02 41 13.14 Asphalt Paving Removal

Date: 2003/12/31

Related sections:

012900 - PAYMENT PROCEDURES

Notes:

DESCRIPTION: This Section specifies methods and procedures for the removal of existing asphalt pavement.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


02 41 16 STRUCTURE DEMOLITION

Date: 2010/12/31

Related sections:

015100 - TEMPORARY UTILITIES
013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013521 - LEED REQUIREMENTS
013543 - ENVIRONMENTAL PROCEDURES
013513
337173
312316
028101 - HAZARDOUS MATERIALS

Notes:

DESCRIPTION: This Section specifies demolition of structures, parts of structures, basements and foundation walls. It includes the abandonment and removal of septic tanks and tanks containing petroleum products.

If selective demolition is to be a separate contract, ensure the Contract includes appropriate Sections of Division 1 to cover such items as site access and restrictions, worker and public protection, safety, security, drainage, insurance, permits, and other items in Related Sections Article. For sitework demolition and removal, use Section 02 41 13 - Selective Site Demolition.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


02411601 STRUCTURE DEMOLITION - SHORT FORM
02 41 16.01 STRUCTURE DEMOLITION - SHORT FORM

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
337173
026500 - UNDERGROUND STORAGE TANK REMOVAL

Notes:

DESCRIPTION: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options. Specify additional requirements in PART 3 - EXECUTION.

Demolition is rapid destruction of a building with or without prior removal of hazardous materials.


02 41 20 DE-COMMISSIONING AND REMOVAL OF GENERAL PURPOSE (GP) FUME HOODS

Date: 2007/03/31

Related sections:

013521 - LEED REQUIREMENTS
028200

Notes:

This section includes LEED general requirements co-ordinate with NMS Section 01 35 21 - LEED Requirement.


02 41 21 DECONSTRUCTION OF STRUCTURES

Date: 2008/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013543 - ENVIRONMENTAL PROCEDURES
013573 - PROCEDURES FOR DECONSTRUCTION OF STRUCTURES
337173
028101 - HAZARDOUS MATERIALS

Notes:

DESCRIPTION: This Section specifies the deconstruction of structures and parts of structures. Its purpose is to provide specifiers with the tools to incorporate specifications which stress the salvage of building materials for reuse and/or recycling. This Section does not provide a framework for analysis of the feasibility of deconstruction. Prior to the use of this Section every effort should be made to assess the economic viability of deconstruction and the degree (i.e. partial or total) to which it should be specified. Variables which will affect these decisions include: the size, type, and age of the structure; the material composition of the structure; the quality and quantity of salvageable materials; the status of local reuse and recycling markets; and project time lines. This Section does not specify the requirements and procedures of deconstructing entire structures for the purpose of re-erection (or parts thereof) elsewhere.

Activities which surround the actual deconstruction of structures such as removal of underground services, blasting, underpinning, and shoring can provide waste diversion opportunities. Specify that any materials used or generated during these activities be of reusable quality or salvaged in condition suitable for alternate disposal methods.

Deconstruction can be described as construction in reverse. It involves carefully dismantling structure to maximize reuse of materials, thereby reducing waste and conserving resources.


02 41 99 DEMOLITION FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section is an abridged version of Sections 02 41 16 - Structure Demolition and 02 41 13 - Selective Site Demolition and is intended for Government - MINOR WORKS contracts. This Section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete Sections noted above.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


02 42 13 CARPET RECLAMATION

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
015100 - TEMPORARY UTILITIES

Notes:

Commercial carpet usually installed in office buildings, institutional facilities and other commercial buildings are either made of nylon 6 or nylon 6.6.

This Section specifies the requirements for the removal and recycling of used carpet and carpet scrap from installation of 4500 m² or greater.


02431305 HISTORIC - STRUCTURE RELOCATION
02 43 13.05 HISTORIC - STRUCTURE RELOCATION

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
310431 - HISTORIC - SUBGRADE SHORING AND BRACING
312333

Notes:

SUPPORT: This Section has been produced by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.


02 50 13 MANAGEMENT OF TOXIC WASTE

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS

Notes:

This section includes LEED general requirements co-ordinate with NMS Section 01 35 21 - LEED Requirement.


02610001 SOIL REMEDIATION
02 61 00.01 SOIL REMEDIATION

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013500
313219

Notes:


02 65 00 UNDERGROUND STORAGE TANK REMOVAL

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
312310
312213 - Rough Grading
026100

Notes:

Tank removal involves three areas of hazard: improper removal of tanks and piping which can result in releases that contaminate the environment (careless excavation); occupational health and safety hazards, including explosions, fires, and inhalation of fumes; and improper disposal of tanks and their residual liquids and sludges and surrounding contaminated soil or ground water. These aspects underline the importance of ensuring that those involved in this activity are properly trained in all aspects and are accountable through licensing procedures.


02 81 01 HAZARDOUS MATERIALS

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


02820001 ASBESTOS ABATEMENT - MINIMUM PRECAUTIONS
02 82 00.01 ASBESTOS ABATEMENT - MINIMUM PRECAUTIONS

Date: 2008/12/31

Related sections:

028200
013529

Notes:

DESCRIPTION: This Section specifies requirements and procedures for asbestos abatement and installation of non-friable asbestos-containing materials, ceiling tiles of less than 7.5 square metres, and less than one square metre of drywall which contains asbestos containing joint compound. For asbestos abatement projects requiring greater precautions refer to Sections 02 82 00.02 - Asbestos Abatement - Intermediate Precautions and 02 82 00.03 - Asbestos Abatement - Maximum Precautions respectively.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (2005), Regulation 278/05 (formerly Ontario Ministry of Labour Regulation 838/90) respecting Asbestos on Construction Projects and in Buildings and Repair Operations made under the Occupational Health and Safety Act. Regulation 278/05 in turn generally conforms to the recommendations contained in the Report of the Royal Commission on Matters of Health and Safety Arising from the Use of Asbestos in Ontario 1984, in which it was recommended that three levels of precautions for asbestos control operations be defined according to the exposure likely to occur. Accordingly, the Regulation has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 82 00.01 - Asbestos Abatement - Minimum Precautions, and Sections 02 82 00.02 - Asbestos Abatement - Intermediate Precautions and 02 82 00.03 - Asbestos Abatement - Maximum Precautions, have been prepared to conform to each of the three types.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for the other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02820002 ASBESTOS ABATEMENT - INTERMEDIATE PRECAUTIONS
02 82 00.02 ASBESTOS ABATEMENT - INTERMEDIATE PRECAUTIONS

Date: 2008/12/31

Related sections:

028200
135290
013529

Notes:

DESCRIPTION: This Section specifies requirements and procedures for removal, encapsulation, disturbing, or enclosure of specified amounts of asbestos containing materials of the type described within. For asbestos abatement projects requiring lesser or greater precautions refer to Sections 02 82 00.01 - Asbestos Abatement - Minimum Precautions and 02 82 00.03 - Asbestos Abatement - Maximum Precautions, respectively.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (2005), Regulation 278/05 (formerly Ontario Ministry of Labour Regulation 838/90) respecting Asbestos on Construction Projects and in Buildings and Repair Operations made under the Occupational Health and Safety Act. The "glove bag" method of removing amounts of asbestos containing insulation from piping is included. Regulation 278/05 in turn generally conforms to the recommendations contained in the Report of the Royal Commission on Matters of Health and Safety Arising from the Use of Asbestos in Ontario 1984, in which it was recommended that three levels of precautions for asbestos control operations be defined according to the exposure likely to occur. Accordingly the Regulation has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 82 00.02 - Asbestos Abatement - Intermediate Precautions, and Sections 02 82 00.01 - Asbestos Abatement - Minimum Precautions and 02 82 00.03 - Asbestos Abatement - Maximum Precautions, have been prepared to conform to each of the three types. As previously mentioned, this Section conforms to Type 2 (intermediate precautions); Sections 02 82 00.01 - Asbestos Abatement - Minimum Precautions and 02 82 00.03 - Asbestos Abatement - Maximum Precautions conform to Type 1 (minimum precautions) and Type 3 (maximum precautions) projects respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02820003 ASBESTOS ABATEMENT - MAXIMUM PRECAUTIONS
02 82 00.03 ASBESTOS ABATEMENT - MAXIMUM PRECAUTIONS

Date: 2008/12/31

Related sections:

135290
078100 - APPLIED FIREPROOFING
013529

Notes:

DESCRIPTION: This Section specifies requirements and procedures for removal, encapsulation, disturbing, or enclosure of asbestos-containing materials for projects requiring more extensive procedures than those specified in Section 02 82 00.01 - Asbestos Abatement - Minimum Precautions or Section 02 82 00.02 - Asbestos Abatement - Intermediate Precautions. These procedures may be required separately or in combination depending on the particular project. Definition of asbestos-containing materials and procedures covered by this section are described within.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is not intended to apply to asbestos abatement during routine inspection and maintenance, and during minor alteration work.

General requirements applicable to the project as a whole are not specified in this Section and must be specified in Division 1. These include Description of Work, Work Schedule, Contractors Use of Site, Security Program, Partial Occupancy, Project Meetings, Site Signs and Notices except warning signs specific to asbestos abatement, Photographs, Temporary Facilities and Safety Measures (other than as specified in this Section), general building cleanup, and the like. Review NMS Division 1 and modify to suit. Similarly other work necessitated by asbestos abatement but which can be performed in clean areas or after decontamination of work areas must be specified elsewhere (suspended ceilings, re-fireproofing, painting, electrical and mechanical work). IT IS ESSENTIAL THAT ASBESTOS ABATEMENT, AND RELATED WORK SUCH AS THAT MENTIONED ABOVE, BE CARRIED OUT UNDER A SINGLE CONTRACT. THIS PERMITS CONTROL OVER THE PROJECT AND FACILITATES SAFE PRACTICE.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (2005), Regulation 278/05 (formerly Ontario Ministry of Labour Regulation 838/90) respecting Asbestos on Construction Projects and in Buildings and Repair Operations made under the Occupational Health and Safety Act. The "glove bag" method of removing amounts of asbestos containing insulation from piping is included. Regulation 278/05 in turn generally conforms to the recommendations contained in the Report of the Royal Commission on Matters of Health and Safety Arising from the Use of Asbestos in Ontario 1984, in which it was recommended that three levels of precautions for asbestos control operations be defined according to the exposure likely to occur. Accordingly the Regulation has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 82 00.03 - Asbestos Abatement - Maximum Precautions, and Sections 02 82 00.01 - Asbestos Abatement - Minimum Precautions and 02 82 00.02 - Asbestos Abatement - Intermediate Precautions, have been prepared to conform to each of the three types. As previously mentioned, this Section conforms to Type 3 (maximum precautions) projects; Sections 02 82 00.01 - Asbestos Abatement - Minimum Precautions and 02 82 00.02 - Asbestos Abatement - Intermediate Precautions conform to Type 1 (minimum precautions) and Type 2 (intermediate precautions) projects respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02 83 10 LEAD - BASE PAINT ABATEMENT - MINIMUM PRECAUTIONS

Date: 2008/06/30

Related sections:

135290

Notes:

DESCRIPTION: This Section specifies requirements and procedures for removal of lead based paints of the type described within. For lead abatement projects requiring greater precautions refer to Sections 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions and 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions, respectively.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (1990), Regulation 843 respecting Designated Substances - Lead made under the Occupational Health and Safety Act, and the Ontario Ministry of Labour Guideline for Lead on Construction Projects. Accordingly the Guideline has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions, and Sections 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions and 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions, have been prepared to conform to each of the three types. As previously mentioned, this Section conforms to Type 1 (minimum precautions); Sections 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions and 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions conform to Type 2 (intermediate precautions) and Type 3 (maximum precautions) projects respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02 83 11 LEAD - BASE PAINT ABATEMENT - INTERMEDIATE PRECAUTIONS

Date: 2008/06/30

Related sections:

135290

Notes:

DESCRIPTION: This Section specifies requirements and procedures for removal of lead based paints of the type described within. For lead abatement projects requiring lesser precautions refer to Section 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions, and for lead abatement projects requiring greater precautions refer to Section 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions, respectively.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (1990), Regulation 843 respecting Designated Substances - Lead made under the Occupational Health and Safety Act, and the Ontario Ministry of Labour Guideline for Lead on Construction Projects. Accordingly the Guideline has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions, and Sections 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions, and 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions, have been prepared to conform to each of the three types. As previously mentioned, this Section conforms to Type 2a and Type 2b (intermediate precautions); Sections 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions and 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions conform to Type 1 (minimum precautions) and Type 3a and Type 3b (maximum precautions) projects respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02 83 12 LEAD - BASE PAINT ABATEMENT - MAXIMUM PRECAUTIONS

Date: 2008/06/30

Related sections:

Notes:

DESCRIPTION: This Section specifies requirements and procedures for removal of lead based paints of the type described within. For lead abatement projects requiring lesser precautions refer to Sections 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions and 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions, respectively.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the private sector.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section conforms reasonably closely to the requirements of the Revised Regulation of Ontario (1990), Regulation 843 respecting Designated Substances - Lead made under the Occupational Health and Safety Act, and the Ontario Ministry of Labour Guideline for Lead on Construction Projects. Accordingly the Guideline has established Type 1, Type 2, and Type 3 operations for minimum, intermediate, and maximum precautions. Such an arrangement is also convenient for specification purposes, and should satisfy most, if not all, requirements of Provinces for the work specified. Consequently, this Section 02 83 12 - Lead - Base Paint Abatement - Maximum Precautions and Sections 02 83 10 -  Lead - Base Paint Abatement - Minimum Precautions and Section 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions, have been prepared to conform to each of the three types. As previously mentioned, this Section conforms to Type 3 (maximum precautions); Sections 02 83 10 - Lead - Base Paint Abatement - Minimum Precautions and 02 83 11 - Lead - Base Paint Abatement - Intermediate Precautions conform to Type 1 (minimum precautions) and Type 2 (intermediate precautions) projects respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, use the precautions for the more stringent requirements as a basis for the project specification and state clearly the different requirements for other levels involved.

Clearly identify locations and extent of work on drawings and in this specification.


02 84 00 POLYCHLORINATE BIPHENYL REMEDIATION

Date: 2008/06/30

Related sections:

014500 - QUALITY CONTROL
013529
312333
312213 - Rough Grading

Notes:

The International Agency for Research on Cancer (IARC) has evaluated the data on chlorobiphenyl (54% chlorine) and has concluded that it causes cancer.


02850001 MOULD REMEDIATION - MINIMUM PRECAUTIONS
02 85 00.01 MOULD REMEDIATION - MINIMUM PRECAUTIONS

Date: 2007/03/31

Related sections:

Notes:

DESCRIPTION: This Section specifies requirements and procedures for remediation of areas less than 1 to a maximum of 3 square metres and for small isolated areas of less than 1 square metre in the HVAC (heating ventilating and air-conditioning) system. For mould remediation projects requiring greater precautions refer to Sections 02 85 00.02 - Mould Remediation - Medium Precautions and 02 85 00.03 - Mould Remediation - Maximum Precautions respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, the precautions for the more stringent requirements shall be used as a basis for the project specification and different requirements for the other levels involved shall be stated clearly.


02850002 MOULD REMEDIATION - MEDIUM PRECAUTIONS
02 85 00.02 MOULD REMEDIATION - MEDIUM PRECAUTIONS

Date: 2007/03/31

Related sections:

135290
028500

Notes:

DESCRIPTION: This Section specifies requirements and procedures for remediation of intermediate isolated areas 3 to 10 square metres of  mould contaminated  materials. For mould remediation projects requiring lesser or greater precautions refer to Sections 02 85 00.01 - Mould Remediation - Minimum Precautions and 02 85 00.03 - Mould Remediation - Maximum Precautions respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, the precautions for the more stringent requirements shall be used as a basis for the project specification and different requirements for the other levels involved shall be stated clearly.


02850003 MOULD REMEDIATION - MAXIMUM PRECAUTIONS
02 85 00.03 MOULD REMEDIATION - MAXIMUM PRECAUTIONS

Date: 2007/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290

Notes:

DESCRIPTION: This Section specifies requirements and procedures for remediation of extensive mould contamination greater than 10 contiguous square metres in an area and for areas greater than 1 square metre in a HVAC system. For mould remediation projects requiring lesser precautions refer to Sections 02 85 00.01 - Mould Remediation - Minimum Precautions and 02 85 00.02 - Mould Remediation - Medium Precautions respectively.

The specification writer must assess the project carefully to determine which of the three levels of precautions applies. Where the project involves more than one of the three levels, the precautions for the more stringent requirements shall be used as a basis for the project specification and different requirements for the other levels involved shall be stated clearly.


03 10 00 CONCRETE FORMING AND ACCESSORIES

Date: 2006/09/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
014721
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
079200 - Joint Sealants

Notes:

DESCRIPTION: This Section specifies the materials for wood, pan and tubular forms, form ties, liners and release agents as well as their fabrication, erection, removal and restoring.

This Section 03 10 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03100 - Concrete Forms and Accessories in accordance with MasterFormat 1995.


03 11 19 Insulated Concrete Forms

Date: 2002/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
017419
017800 - CLOSEOUT SUBMITTALS
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
079200 - Joint Sealants

Notes:

This Section 03 11 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03131 - Insulated Concrete Forms in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies insulated concrete forms comprised of mechanically-interlocked rigid board polystyrene insulation panels, plastic web spacers, plastic inserts, reinforcement mounting, concrete accessories and cast-in-place concrete.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


03 20 00 CONCRETE REINFORCING

Date: 2009/12/31

Related sections:

033000 - CAST-IN-PLACE CONCRETE
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies concrete reinforcing materials, their fabrication, placing and field touch-up.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


03 30 00 CAST-IN-PLACE CONCRETE

Date: 2009/12/31

Related sections:

012900 - PAYMENT PROCEDURES
013216
013521 - LEED REQUIREMENTS
013529
032000 - CONCRETE REINFORCING
031000 - CONCRETE FORMING AND ACCESSORIES
040500 - COMMON WORK RESULTS FOR MASONRY
014500 - QUALITY CONTROL
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the choice of two alternatives for specifying and ordering concrete, either performance or prescriptive criteria and includes the materials, mixes, accessories, preparation, construction and verification for cast-in-place concrete.

Fly ash is a coal combustion by product of electrical power generation.  These by-products rapidly accumulate and can cause disposal problems. Coal fly ash can be used as a component in concrete production.  Each tonne of fly ash cement used to replace one tonne of traditional cement ingredients saves one barrel of oil associated with the costs of mining materials. MTL 2004-16(TR-R) - Use of Fly Ash and Slag in Concrete: A Best Practice Guide by PWGSC and NRCan (ftp://ftp.pwgsc.gc.ca./rps/docentre/st/st252-e.pdf ) and ASTM C 618 Standard Specification for Coal Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provide two references.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


03300001 CAST-IN-PLACE CONCRETE SHORT FORM
03 30 00.01 CAST-IN-PLACE CONCRETE SHORT FORM

Date: 2009/12/31

Related sections:

013216
013521 - LEED REQUIREMENTS
032000 - CONCRETE REINFORCING
017411 - CLEANING
013543 - ENVIRONMENTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the choice of two alternatives for cast-in-place concrete, either performance or prescriptive criteria and includes materials, reinforcing bars, wire fabric, waterstops, fillers, sealers and the mix.

Fly ash is a coal combustion by product of electrical power generation.  These by-products rapidly accumulate and can cause disposal problems. Coal fly ash can be used as a component in concrete production.  Each tonne of fly ash cement used to replace one tonne of traditional cement ingredients saves one barrel of oil associated with the costs of mining materials. MTL 2004-16(TR-R) - Use of Fly Ash and Slag in Concrete: A Best Practice Guide by PWGSC and NRCan (ftp://ftp.pwgsc.gc.ca./rps/docentre/st/st252-e.pdf ) and ASTM C 618 Standard Specification for Coal Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provide two references.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


03 30 51 CONCRETE FOR BRIDGE DECKS

Date: 2006/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
033000 - CAST-IN-PLACE CONCRETE

Notes:

DESCRIPTION: This Section specifies the materials and construction for concrete bridge decks including protection and special techniques.

ENVIRONMENTAL: Fly ash is a coal combustion by product of electrical power generation. These by-products rapidly accumulate and can cause disposal problems.  Coal fly ash can be used as a component in concrete production. Each tonne of fly ash cement used to replace one tonne of traditional cement ingredients saves one barrel of oil associated with the costs of mining materials. MTL 2004-16(TR-R) - Use of Fly Ash and Slag in Concrete: A Best Practice Guide by PWGSC and NRCan and ASTM C 618 Standard Specification for Coal Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provide two references.

SUSTAINABLE:  For sustainable requirements for this Section, related to the Construction and Verification co-ordinate with Section 03 30 00 - Cast-in-Place Concrete.

This Section 03 30 51 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03301 - Concrete for Bridge Decks in accordance with MasterFormat 1995.


03 35 00 CONCRETE FINISHING

Date: 2009/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
015100 - TEMPORARY UTILITIES
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


03 35 05 CONCRETE FLOOR HARDENING

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
015100 - TEMPORARY UTILITIES
033000 - CAST-IN-PLACE CONCRETE

Notes:

This Section 03 35 05 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03361 - Concrete Floor Hardeners in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies concrete floor hardeners, slip resistant coatings, and sheet curing materials.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Concrete for concrete toppings, bonding adhesives, reinforcing mesh preparation and finishing of base slab, topping application and finishing are specified in Section 03 30 00 - Cast-in-Place Concrete.

Floor treatment materials which are usually applied to existing concrete floor surfaces, such as water or solvent based sealing compounds and acrylics, are specified in Section 03 35 00 - Concrete Finishing.

Coordinate curing and tolerance requirements with Section 03 30 00 - Cast-in-Place Concrete.


03 37 13 SHOTCRETE

Date: 2003/12/31

Related sections:

033000 - CAST-IN-PLACE CONCRETE
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 03 37 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03371 - Shotcrete in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for production and application of Portland cement concrete conveyed through a hose and applied by pneumatic projection through a spray nozzle.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Fly ash is a coal combustion by product of electrical power generation. These by-products rapidly accumulate and can cause disposal problems. Coal fly ash can be used as a component in cement/concrete production. Each ton of fly ash cement used to replace one tone of traditional cement/concrete ingredients saves one barrel of oil associated with the costs of mining materials.

ENVIRONMENTAL: Incorporating blast furnace slag, power station fly ash, industrial gypsum and silica fume as secondary raw materials into the mix for cement, raw materials and energy may be conserved, resource recovery may be increased, and quantities of waste requiring disposal will be reduced.


03 37 26 Underwater Placed Concrete

Date: 2003/12/31

Related sections:

033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING

Notes:

This Section 03 37 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03306 - Underwater Concreting in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supply and placement of concrete underwater by tremie, pumped concrete, bottom dump bucket, or bagged concrete method.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure that Federal and Provincial environmental authorities have been contacted in respect to project for any special environmental requirements and ensure this information is incorporated into documents and drawings.


03 41 00 PRECAST STRUCTURAL CONCRETE

Date: 2007/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
034500 - Precast Architectural Concrete

Notes:

DESCRIPTION: This Section specifies products of standard or special shapes that are reinforced using steel reinforcement, prestressed by pre-tensioning and/or post-tensioning, and through application become an integral structural part of the project. These products are normally produced using grey cement and usually have no special architectural finish.

For Federal projects, architectural precast concrete design should follow the recommendations of the Canadian Precast/Prestressed Concrete Institute (CPCI) - CPCI Design Manual - Third Edition, according to the PWGSC's Federal Office Building Standards.


03 41 36 PRECAST STRUCTURAL POST-TENSIONED CONCRETE

Date: 2007/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the administrative procedures, materials and some installation requirements for plant-precast structural members, which are post-tensioned on site.

For Federal projects, architectural precast concrete design should follow the recommendations of the Canadian Precast/Prestressed Concrete Institute (CPCI) -  CPCI Design Manual - Third Edition, according to the PWGSC's Federal Office Building Standards.


03 45 00 Precast Architectural Concrete

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
040512 - MASONRY MORTAR AND GROUT

Notes:

This Section 03 45 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03450 - Plant-precast Architectural Concrete in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies materials, concrete and grout mixes, the manufacture, finishes and erection of both load bearing and non-load bearing, plant-precast architectural concrete.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Fly ash is a coal combustion by product of electrical power generation.  These by-products rapidly accumulate and can cause disposal problems.  Coal fly ash can be used as a component in cement/concrete production.  Each ton of fly ash cement used to replace one ton of traditional cement/concrete ingredients saves one barrel of oil associated with the costs of mining materials. ASTM C 618 Standard Specification for Coal Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provides a reference.

ENVIRONMENTAL: By incorporating blast furnace slag, power station fly ash, industrial gypsum and silica fume as secondary raw materials into the mix for cement, raw materials and energy may be conserved, resource recovery may be increased, and quantities of waste requiring disposal will be reduced.


03 48 00 Precast Concrete Specialties

Date: 2003/12/31

Related sections:

032000 - CONCRETE REINFORCING

Notes:

This Section 03 48 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 03481 - Precast Concrete Parking Curbs in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, concrete mixes, fabrication and installation for precast concrete parking curbs.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


04 03 06 HISTORIC - CLEANING HISTORIC MASONRY

Date: 2009/12/31

Related sections:

013543 - ENVIRONMENTAL PROCEDURES
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section describes the type of masonry material and soiling; the performance requirements; and, the number and description of stages when they start and finish.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Contractor will permit, and provide time for attendance at a briefing session for all employees, highlighting the requirements of environmental specifications and others measures.

Cleaning historic masonry should only be carried out using recognized preservation methods, and then only when necessary to halt masonry deterioration or remove heavy soiling or graffiti.

The cleaning method should not be selected until masonry material and soiling have been positively identified. Type and degree of soiling to be removed should be well identified; type and function of the masonry material to be cleaned should be well understood; and, styles of pointing, tooling and other aspects of historic workmanship should be identified and recorded. Use gentlest cleaning method possible consistent with achieving an adequate level of cleanliness. Due to the nature of soiling, the different types of masonry construction and surface, and the wide variety of cleaning methods available, it is recommended that masonry conservation expertise - Masonry Conservator or Consultant - is consulted when selecting a masonry cleaning method. Any method that involves more than water should be specified by such expertise. This section specifies one commonly used method for cleaning historic masonry using the two-phase approach. Before testing with moderate pressure wash, test the effect of scrubbing with neutral pH detergent in water, without pressure. For a water wash, a moderate pressure water wash is used in the first phase after application on test area. More intensive cleaning methods may be used in second phase to remove localized stains or deposits. A variety of methods could be used on a single project depending on nature of soiling (stains and deposits). It is anticipated that moderate water wash will be costed on a lump sum basis and intensive cleaning on a unit price basis. If this approach is not practical, employ a logical decision-making process such as described in "Conserving Buildings - A Guide to Techniques and Materials," 2nd Edition, Martin E. Weaver, 1997. Water cleaning methods, in general, cause masonry material to absorb water. Time needed for each material to become wetted thoroughly, varies greatly. Bricks absorb three times as much water as limestone or sandstone. Their core and surface become wet rapidly. Water evaporates rapidly from bricks. Sedimentary stones retain absorbed water during treatment. This can cause dampness on inside walls, resulting in efflorescence, discolouration and plaster exfoliation. It is important that masonry cleaning techniques which use water must be carried out at an appropriate time of year, when temperatures are above 10 degrees C and when there is sufficient drying-out time allowed before risk of freezing occurs. The use of a drycleaning method allows greater flexibility to clean in the winter season and does not risk problems to foundations and grounds due to heavy water infiltration. Before using any wet cleaning method, ensure the building envelope is waterproof, including the foundations, and that all drainage is in good condition. The order of masonry conservation work is dependent upon a variety of factors such as masonry condition, ease of access and environmental conditions. Generally, the masonry wall will have been stabilized (through grouting and/or reinforcement), repaired and repointed. If new stones are put into the wall ensure that cleaning does not make them visually obtrusive. Most cleaning techniques may destroy tool marks of pointing, so final pointing is usually best done after cleaning. Some additional references for cleaning historic masonry are as follows: "Towards a Decision-Making Strategy for Masonry Cleaning". Johnson B. Masonry: Research, Application and Problems, ASTM STP 871, J.C. Crogan and J.J. Conway, Eds. American Society for Testing and Materials, Philadelphia, p.185, pp. 178-181. "Cleaning and Surface Repair - Past Mistakes and Future Prospects". J. Ashurst, Association for Preservation Technology Bulletin, Vol. XVII  No. 2, 1985 p. 39-41. "Historic Masonry" M. London, Bumbaru D. Heritage Montreal, Technical Guide No. 3, 1984.

The long service life or durability of historic masonry structures contributes to reducing the need for new construction materials or the creation of waste from demolition. Some stone may have acquired a protective patina, which contributes to its durability. Removal of the patina for aesthetic reasons may increase the rate of deterioration of the stone, shortening its potential service life or inherent durability.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 07 HISTORIC - MASONRY REPOINTING

Date: 2009/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
040308 - HISTORIC - MORTARING
040500 - COMMON WORK RESULTS FOR MASONRY
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

SUPPORT: This Section was developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Section 04 03 42 - Historic - Replacing Stone should be used where there is major replacement of stone and Section 04 03 41 - Historic - Repairing Stone, should be used for major repair of stone.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 08 HISTORIC - MORTARING

Date: 2008/06/30

Related sections:

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Mortar for historic masonry structures has to be designed to be: workable and compatible (similar to mortar in compressive strength and deformability, water transmission of mortar and water absorption of masonry) with the materials to be bonded and with service conditions; durable (resistance to frost action and salt crystallization, and controlled shrinkage and bond); breathable (permeable, water absorption and vapour transmission); lower in compressive strength and sacrificial to the masonry unit; and, faster initial setting is needed in Canada's cold climate, and in salty and/or saturated environments. These performance criteria have led to the use of mortar mixes for historic masonry structures such as Lime-based mortar, Portland Cement-Lime (PCL) and Masonry Cement-Lime (MCL) mortars.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 09 HISTORIC - GROUTING

Date: 2007/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

For information about grouting work refer to Houlsby, A.C. Construction and Design Guide of Cement Grouting, a guide to grout in rock foundation, John Wiley and Sons, Ed. 442 p.


04 03 31 HISTORIC - REPLACING BRICK

Date: 2009/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
040307 - HISTORIC - MASONRY REPOINTING
040500 - COMMON WORK RESULTS FOR MASONRY
040308 - HISTORIC - MORTARING
310431 - HISTORIC - SUBGRADE SHORING AND BRACING
015200 - CONSTRUCTION FACILITIES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 32 HISTORIC - TESTING AND SAMPLING BRICK UNITS

Date: 2009/12/31

Related sections:

040331 - HISTORIC - REPLACING BRICK

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Testing of brick masonry is divided into three basic groups, non-destructive testing, partially destructive testing and destructive testing. At present there are several tests available that may be used for each group with various degrees of success.

This Section does specify seven of the most commonly used tests from destructive group of tests. This type of testing has been thoroughly developed.

This Section is written to cover the following tests: test for modulus of rupture: test of shear strength; test for compressive strength; tests for absorption: tests to determine suitability of brick to weather exposure; test for freezing and thawing: test for determining durability of brick exposed to freeze-thaw cycles; test for initial Rate of absorption (suction): test to determine effect of cold temperature on brick laying; test for efflorescence: test for determining potential of brick to become surface-stained by soluble salts; test for measurement of size; test for measurement of warpage.

For unidirectional method of testing, recommended for old brick, see volume 44, 1975, Journal of Canadian Ceramic Society, pages 21-22.

Non-destructive testing is still at an experimental stage of development in Canada. It requires experienced operators and evaluators: see Canada Mortgage and Housing Corporation (CMHC) publications - Review of Non-destructive Test Method for Assessing Strength, Serviceability and Deterioration in Buildings, March, 1993.

American Standards have been developed for partially destructive test such as the L.A. Shear test or the flat Jacks: see American Society of Civil Engineering - Guideline for the Structural Condition Assessment of Existing Buildings, 1991.


04 03 41 HISTORIC - REPAIRING STONE

Date: 2009/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
040308 - HISTORIC - MORTARING
040307 - HISTORIC - MASONRY REPOINTING
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 42 HISTORIC - REPLACING STONE

Date: 2009/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
040308 - HISTORIC - MORTARING
079200 - Joint Sealants
310431 - HISTORIC - SUBGRADE SHORING AND BRACING
015200 - CONSTRUCTION FACILITIES
040307 - HISTORIC - MASONRY REPOINTING
040500 - COMMON WORK RESULTS FOR MASONRY

Notes:

DESCRIPTION: This Section specifies replacement and reinstatement of stone units with either natural or artificial units in historic structures, including stone selection, sizing and dressing for general reconstruction and replacement of individual deteriorated units.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

No CSA or ASTM standards exist for stone replacement. Descriptions of materials and methods are provided in the "Code of Practice for Stone Masonry" published by the British Standards Institute, London, BS 5390, 1976.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 03 43 HISTORIC - DISMANTLING STONE MASONRY

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
310431 - HISTORIC - SUBGRADE SHORING AND BRACING
040341 - HISTORIC - REPAIRING STONE
040306 - HISTORIC - CLEANING HISTORIC MASONRY

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

The work described in this Section implies the use of qualified labour, professional supervision and detailed monitoring on site. Otherwise, this Section would be more detailed.

When structure is comprised of different types of masonry, or requires various methods of treatment, the most exacting case must be described in detail. Other cases may be described either in separate  paragraphs or explained in a general paragraph.

When dismantling area contains materials other than masonry, these materials must be addressed in specific paragraphs. In general, procedure to be followed is the same, but precautions to be taken differ greatly according to refinement of structure. Precautions will probably be more elaborate (risk of wood decay, of metal oxidation, or of plaster soaking). When these materials constitute sufficiently important parts of structure, include in project specification section appropriate sections, referring to them as related work.

Refer to Weaver, Martin E., "Conserving Buildings", 2nd edition, John Wiley and Son Inc., 1997; London, Mark, "Masonry - How to Care for Old and Historic Brick and Stone", the Preservation Press, 1988; St. Louis, Denis, "Maçonnerie Traditionnelle, Volume III - Pathologie et Traitements", Heritage Montreal, 1984.


04 04 99 MASONRY FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section is an abridged version of Sections 04 05 00 - Common Work Results for Masonry, 04 05 12 - Masonry Mortar and Grout, 04 05 19 - Masonry Anchorage and Reinforcing, 04 21 13 - Brick Masonry and 04 22 00 - Concrete Unit Masonry and is intended for Government - MINOR WORKS contracts. This section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 05 00 COMMON WORK RESULTS FOR MASONRY

Date: 2008/12/31

Related sections:

013119 - PROJECT MEETINGS
013216
013529
040512 - MASONRY MORTAR AND GROUT
040523 - MASONRY ACCESSORIES
013521 - LEED REQUIREMENTS
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
040500 - COMMON WORK RESULTS FOR MASONRY
017100 - EXAMINATION AND PREPARATION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Use this Section when any kind of masonry work is specified.


04 05 12 MASONRY MORTAR AND GROUT

Date: 2008/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
040500 - COMMON WORK RESULTS FOR MASONRY
013521 - LEED REQUIREMENTS
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:


04 05 19 MASONRY ANCHORAGE AND REINFORCING

Date: 2008/12/31

Related sections:

013529
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
040500 - COMMON WORK RESULTS FOR MASONRY
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

Details of masonry reinforcement and connectors must be indicated on contract drawings. Engineering adequacy of these details to be certified by structural design engineer.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 05 23 MASONRY ACCESSORIES

Date: 2008/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
040500 - COMMON WORK RESULTS FOR MASONRY
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 21 13 BRICK MASONRY

Date: 2008/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
040500 - COMMON WORK RESULTS FOR MASONRY
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
040519 - MASONRY ANCHORAGE AND REINFORCING
040523 - MASONRY ACCESSORIES
040512 - MASONRY MORTAR AND GROUT
017411 - CLEANING
047113 - CALCIUM SILICATE MANUFACTURED BRICK MASONRY

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 21 19 CLAY TILE MASONRY

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
040500 - COMMON WORK RESULTS FOR MASONRY
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

This Section specifies clay tile unit masonry. These units can be used for combination masonry walls of brick masonry or concrete unit masonry. The can be left exposed, plastered or painted for interior use.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

Check with manufacturers for availability of special shapes, surface finishes and dimensions.

When more than one grade, finish, colour, type or size is required on a project ensure that locations are clearly indicated on drawings or specify locations of each particular clay tile product.

This Section 04 21 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 04212 - Clay Tile Unit Masonry in accordance with MasterFormat 1995.


04 22 00 CONCRETE UNIT MASONRY

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
040512 - MASONRY MORTAR AND GROUT
040519 - MASONRY ANCHORAGE AND REINFORCING
040523 - MASONRY ACCESSORIES
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 23 00 GLASS UNIT MASONRY

Date: 2008/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
040500 - COMMON WORK RESULTS FOR MASONRY
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
040512 - MASONRY MORTAR AND GROUT
017100 - EXAMINATION AND PREPARATION
040519 - MASONRY ANCHORAGE AND REINFORCING
079200 - Joint Sealants
017411 - CLEANING

Notes:

This Section includes glass block unit masonry, plain and decorative designs and joints. Mortar and grout, reinforcing and accessories are specified in related sections. Exterior block panels may be a maximum of 6.1 m high or 7.6 m high, but must not exceed 13.4 m² of unsupported wall area. (This assumes 100 mm thick block and is based on a wind load resistance of 1 kPa with a minimum safety factor of 2.7). Interior glass block panels must not exceed 23.2 m² of unsupported wall area, nor be more than 6.1 m high or 7.6m high in any dimension. Refer to Part 3 of the NBC for use of glass unit masonry in fire separations.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 43 13 MARBLE VENEER CLADDING

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
040500 - COMMON WORK RESULTS FOR MASONRY
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
079210
071900 - Water Repellents
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies marble for interior and exterior wall applications.

SUSTAINABILITY: LEED: This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification.

The following Sections contain text required to complete the work of this Section: 07 19 00 -  Water Repellents and 07 92 10 - Joint Sealing.


04 43 16 GRANITE VENEER CLADDING

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies granite for interior and exterior wall applications. Refer to TTMAC and specify flooring, veneer, window stools, thresholds, sills, stair treads or risers as required in appropriate sections.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 43 19 COLLECTED STONE VENEER CLADDING

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies natural rough textured stone for both interior and exterior wall applications.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 43 23 QUARRIED STONE VENEER CLADDING

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies natural building stone cut or machined to given sizes, dimensions or shape (dimension stone) and produced in accordance with working drawings. This includes stone sills, copings, smooth faced or machined ashlar and veneer trim, steps and other items.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 43 26 DIMENSION STONE VENEER CLADDING

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
040512 - MASONRY MORTAR AND GROUT
079200 - Joint Sealants
040519 - MASONRY ANCHORAGE AND REINFORCING
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


04 71 13 CALCIUM SILICATE MANUFACTURED BRICK MASONRY

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
040512 - MASONRY MORTAR AND GROUT
040519 - MASONRY ANCHORAGE AND REINFORCING
017411 - CLEANING

Notes:

DESCRIPTION: This Section describes calcium silicate brick, and includes units used as an non-load bearing, single wythe veneer and cavity construction; including mortar and related accessories. Calcium silicate bricks are not recommended for use below grade or in areas where they will be exposed to de-icing salts.


04 71 14 CALCIUM SILICATE MANUFACTURED UNIT MASONRY

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
040512 - MASONRY MORTAR AND GROUT
040519 - MASONRY ANCHORAGE AND REINFORCING
017411 - CLEANING

Notes:

DESCRIPTION: Calcium silicate unit masonry is not recommended for use below grade or in areas where the units will be exposed to de-icing salts.


04 73 13 CALCIUM SILICATE MANUFACTURED STONE MASONRY

Date: 2008/12/31

Related sections:

040500 - COMMON WORK RESULTS FOR MASONRY
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
040512 - MASONRY MORTAR AND GROUT
017411 - CLEANING

Notes:

DESCRIPTION: Calcium silicate building stone is not recommended below grade or in areas where it will be exposed to de-icing salts.


05 12 23 STRUCTURAL STEEL FOR BUILDINGS

Date: 2009/06/30

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

Structural steel work in this section includes structural sections indicated on drawings and non-standard stairs not covered in Section 05 51 29 - Metal Stairs and Ladders. These stairs must be detailed on drawings. Non-structural components should be included in Section 05 50 00 - Metal Fabrications. For structural steel for bridges, use Section 05 12 33 - Structural Steel for Bridges.


05 12 33 STRUCTURAL STEEL FOR BRIDGES

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section is intended for use in construction of dynamically loaded types of structures such as bridges. Consult with designer for materials and methods. Use Section 05 12 23 - Structural Steel for Buildings, for structural steel for buildings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 14 11 STRUCTURAL ALUMINUM FOR BUILDINGS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

Structural aluminum includes structural sections noted on structural drawings as required for building framing. Non-structural components should be specifically identified on drawings and included in Section 05 50 00 - Metal Fabrications. Cranes, radio and television towers, piping, light gauge products, bridges and transmission towers are not included in this Section.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 21 00 STEEL JOIST FRAMING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, fabrication and erection of steel joists.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 31 00 STEEL DECKING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Sheet Steel Building Institute (CSSBI).

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 41 00 STRUCTURAL METAL STUD FRAMING

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Bolting also eliminates the dangerous fumes and gases associated with welding.

This section specifies wind bearing steel stud systems. Wind-Load Bearing steel studs are flexural members used primarily for exterior walls. Use Section 09 22 16 - Non-Structural Metal Framing for interior non load bearing steel studs. This section does not include lightweight steel framing systems with axial load bearing studs with joist and rafters.

Refer to CSSBI 50M Lightweight Steel Framing Binder for additional background data.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 05 41 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 05411 - Wind-Load Bearing Steel Stud Systems in accordance with MasterFormat 1995.


05 50 00 METAL FABRICATIONS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
055129 - METAL STAIRS AND LADDERS
017411 - CLEANING

Notes:

This Section does not attempt to specify all metal fabrication items that may be required for a project. Items specified in this section are examples. Examine drawings, check sizes and specify all items.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 51 29 METAL STAIRS AND LADDERS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
055000 - METAL FABRICATIONS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies industrial, service and commercial steel stairs; metal stair items that may be required for a project. Items specified in this section are examples. Examine pedestrian bridges.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


05 52 16 HANDRAILS AT ROOF AREAS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes pipe or tube railing assemblies used at Green Roof areas; aluminum or steel materials; usually custom fabricated design.  This section includes performance and descriptive type specifications.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 03 12 Historic - Period Horizontal Log Work

Date: 2002/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017419
060573 - WOOD TREATMENT

Notes:

This Section 06 03 12 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 06131 - Historic Structures Period Horizontal Log Work in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies horizontal log walling and partitioning. This section does not include other major types of log construction; i.e., Poteaux en coulisse/Red River Frame (a heavy timber frame with log infill) stave wall (logs set vertically) or stove wood/stackwall (short lengths laid horizontally as on wood pile).

SUPPORT: This section has been produced jointly by the National Master Specification (NMS) Secretariat and by Real Property Services for Canadian Heritage, Environment Canada and Parks Canada Agency, Public Works and Government Services Canada, on behalf of Parks Canada.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Ensure that drawings indicate configuration and extent of log work and show representative portion of installation including such things as corner jointing and opening framing.


06 03 13 Historic - Carvel Planking

Date: 2002/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
017419
070391 - Historic - Caulking Vessels
015200 - CONSTRUCTION FACILITIES

Notes:

This Section 06 03 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 06155 - Historic Structures: Carvel Planking in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies repair of carvel planking on historic vessels and includes providing materials and physical work necessary to fit and install planking indicated.

SUPPORT: This Section has been jointly produced by the National Master Specification (NMS) Secretariat and Real Property Services for Canadian Heritage, Environment Canada and Parks Agency, Public Works and Government Services Canada, on behalf of Parks Canada.

ENVIRONMENTAL: This Section has been amended to reflect the best practices, products and procedures from an environmental standpoint. This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

This section may also be used for operational vessels.


06 03 15 HISTORIC - SPLICING OF WOOD COMPONENTS

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

ENVIRONMENTAL: Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the safe use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, and the Pest Control Products Act. Call provincial Environment or Agriculture departments, or the Pest Management Regulatory Agency (PMRA), Health Canada. For information and procedures on pest control products, call the Pest Management Regulatory Centre at 1-800-267-6315, or (613) 736-3799. Ensure that the use and disposal of wood preservatives complies with all departmental regulations, particularly the Environmental Assessment Review Process.


06 03 16 HISTORIC - STORAGE AND PROTECTION OF WOOD

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the safe use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, and the Pest Control Products Act.


06 03 18 Historic - Replacement of Curved Wood Members: Steam Bending

Date: 2002/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
017419

Notes:

This Section 06 03 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 06914 - Historic Structures: Replacement of Curved Wood Members: Steam Bending in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies techniques, materials and apparatus for the forming of wooden members by steam bending to be used in reconstruction or restoration of period structures.

SUPPORT: This Section has been produced by the National Master Specification (NMS) Secretariat and Real Property Services for Canadian Heritage, Environment Canada and Parks Agency, Public Works and Government Services Canada, on behalf of Parks Canada.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream. Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the safe use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, the Pest Control Products Act, and for Canadian Heritage projects, the Parks Canada Management Directive 2.4.1 and Parks Canada Management Directive 2.4.2. Call provincial Environment or Agriculture departments, or the Pest Management Regulatory Agency (PMRA), Health Canada. For information and procedures on pest control products, call the Pest Management Regulatory Centre at 1-800-267-6315, or (613) 736-3799. Ensure that the use and disposal of wood preservatives complies with all departmental regulations, particularly the Environmental Assessment Review Process.


06 03 74 HISTORIC - LONG-TERM TREATMENT OF WOOD

Date: 2008/06/30

Related sections:

012900 - PAYMENT PROCEDURES
060316 - HISTORIC - STORAGE AND PROTECTION OF WOOD
016100 - COMMON PRODUCT REQUIREMENTS
013529

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, and the Pest Control Products Act.


06 03 75 HISTORIC - ERADICATION OF INSECTS IN WOOD

Date: 2008/06/30

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This specification describes procedures for use of insecticides in 2 circumstances: 1) application by contractor for insect eradication work only; 2) application by contractor as part of larger contract for conservation or restoration work. It can also be used for work by departmental staff. Insert the required text from this section into applicable technical Sections.  This section should not be used as a separate section in a project specification.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, and the Pest Control Products Act.


06 03 76 Historic Structures - Antiseptic Treatment for Wood

Date: 2002/12/31

Related sections:

017419

Notes:

This Section 06 03 76 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 06073 - Historic Structures - Antiseptic Treatment for Wood in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies antiseptic treatments and procedures for their use for short term control of insect and fungal attack and sterilization of wood in historic structures.

SUPPORT: This section has been produced jointly by the National Master Specification (NMS) Secretariat and by Real Property Services for Canadian Heritage, Environment Canada and Parks Canada Agency, Public Works and Government Services Canada, on behalf of Parks Canada.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream. Wood Preservatives and other Pesticides are registered by Health Canada as part of the Pest Control Products Act. Ensure that the product specified is approved for the use intended. Ensure that the use and disposal of wood preservatives complies with all Federal, Provincial and Municipal regulations, particularly the Canadian Environmental Assessment Act (CEAA), the Canadian Environmental Protection Act, the Pest Control Products Act, and for Canadian Heritage projects, the Parks Canada Management Directive 2.4.1 and Parks Canada Management Directive 2.4.2. Call provincial Environment or Agriculture departments, or the Pest Management Regulatory Agency (PMRA), Health Canada. For information and procedures on pest control products, call the Pest Management Regulatory Centre at 1-800-267-6315, or (613) 736-3799. Ensure that the use and disposal of wood preservatives complies with all departmental regulations, particularly the Environmental Assessment Review Process.


06 05 73 WOOD TREATMENT

Date: 2007/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION

Notes:

DESCRIPTION: This Section specifies products treated with preservative and fire-retardant by pressure impregnation. Insert required text from this Section into applicable technical Sections. This Section should not be used as a separate Section in a project specification.

Larger wood members may require incising which will effect appearance.

This section includes LEED general requirements co-ordinate with NMS Section 01 35 21 - LEED Requirement.


06 08 99 ROUGH CARPENTRY FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
061000 - ROUGH CARPENTRY
060573 - WOOD TREATMENT
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section is an abridged version of Sections 06 05 73 - Wood Treatment and 06 10 00 - Rough Carpentry and is intended for Government - MINOR WORKS contracts. This Section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.

Use Section 06 10 00 - Rough Carpentry to specify rough carpentry for wood framed buildings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 10 00 ROUGH CARPENTRY

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
060573 - WOOD TREATMENT
017411 - CLEANING

Notes:

Use Section 06 08 99 - Rough Carpentry for Minor Works to specify rough carpentry for minor works projects.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06100001 ROUGH CARPENTRY - SHORT FORM
06 10 00.01 ROUGH CARPENTRY - SHORT FORM

Date: 2007/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
061000 - ROUGH CARPENTRY
060573 - WOOD TREATMENT

Notes:

Use Section 06 10 00 - Rough Carpentry to specify rough carpentry for wood framed buildings. Use either short form section or long form section but not both.

This section includes LEED general requirements co-ordinate with NMS Section 01 35 21 - LEED Requirement.


06 14 00 TREATED WOOD FOUNDATIONS

Date: 2007/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
060573 - WOOD TREATMENT

Notes:

Do not use this Section for DND projects.

For Public Works and Government Services Canada projects, contact client department to determine requirements for control and use of preservatives prior to utilization of this Section.

This section includes LEED general requirements co-ordinate with NMS Section 01 35 21 - LEED Requirement.


06 15 00 WOOD DECKING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
060573 - WOOD TREATMENT
079200 - Joint Sealants
017411 - CLEANING

Notes:

If wood products are to be treated with preservative or fire-retardant by pressure impregnation insert appropriate text from Section 06 05 73 - Wood Treatment.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 17 53 SHOP - FABRICATED WOOD TRUSSES

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013216
135290
013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
016100 - COMMON PRODUCT REQUIREMENTS
013543 - ENVIRONMENTAL PROCEDURES

Notes:

DESCRIPTION: This Section specifies the materials, fabrication and erection of prefabricated wood trusses.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section specifies sustainable requirements related to the Construction and Verification.

In case trusses are to be fabricated on basis of design by a Structural Engineer, drawings must indicate loading conditions, limitations and dimensions of members, particulars relating to connectors, sections and details of truss configuration, bearing conditions, chord extensions, chord splices, cantilevers, joint details, anchors, bracing, bridging and special framing for concentrated loads. If fabricator is to design trusses, loadings must be indicated, drawings must indicate location, spacing, span and geometry of trusses as well as required minimum distance at heel between top of truss and bearing surface to ensure air circulation. Use reference documents such as The Truss Plate Institute of Canada for Commercial, Residential and Farm snow loading and Truss Design Procedures and Specifications for Light Metal Plate Connected Wood Trusses.

This Section 06 17 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 06171 - Prefabricated Wood Trusses in accordance with MasterFormat 1995.


06 18 00 GLUED-LAMINATED CONSTRUCTION

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013543 - ENVIRONMENTAL PROCEDURES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the laminating stock, adhesive, fasteners, etc. for glued-laminated structural units, including fabrication and erection.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 20 00 FINISH CARPENTRY

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
087005 - CABINET AND MISCELLANEOUS HARDWARE
017411 - CLEANING

Notes:

Specifier to determine if AWMAC, NLGA or NHLA is governing grading authority for project and specify consistently throughout.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 40 00 ARCHITECTURAL WOODWORK

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
099123 - INTERIOR PAINTING
087005 - CABINET AND MISCELLANEOUS HARDWARE
062000 - FINISH CARPENTRY
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


06 47 00 PLASTIC LAMINATE FINISHING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
062000 - FINISH CARPENTRY
064000 - ARCHITECTURAL WOODWORK
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies laminated plastic for post formed, flat and field applications, along with the adhesives, fabrication and installation.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


07 03 13 Historic - Slate Shingle Roofing

Date: 2000/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
017419

Notes:

This Section 07 03 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07315 - Historic Structures - Slate Roofing in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies slates applied as only finish to roofs of historic buildings. Ensure that drawings indicate representative portion of installation including such things as slate pattern, exposure, headlap and sidelap of underlay as well as treatment at eaves, valleys, hips, ridges, gables, dormers, chimneys and sidewall openings. For convenience, flashing is specified in this section in a simplified manner. Specific seaming details, cleating patterns and specific accessories for flashing have not been included. Where flashing are elaborate or impact the design of the roof, a separate specification section is recommended.

SUPPORT: This Section developed by Real Property Services for Environment Canada and Canadian Heritage, Public Works and Government Services Canada has not been reviewed by other government departments nor the private sector.

ENVIRONMENTAL: This Section specifies when required environmentally responsible material choices, and takes a deconstruction approach which may include recycling and reuse options and generally available disposal options.


07 03 31 HISTORIC - CONCRETE ROOFING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
070332 - HISTORIC - WOOD SHINGLES AND SHAKES ROOFING

Notes:

DESCRIPTION: This Section specifies requirements for the installation of a roof covering made up of small concrete units described as shingles, slates, or tiles. The life span of this type of roof is expected to be approximately 60 years.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

Use this section to specify all types of unit concrete roof coverings, concrete shingles, slates, tiles, or channels. Although some roofers will be familiar with installation and details, modern use of concrete roofing is not common. Also, most concrete roofing jobs on historic buildings often consist of repair or reproduction.

Concrete roof materials used in damp areas of the country will collect dirt. Moss and vegetation will eventually appear on the concrete slates. Removal should follow the most recent research. Consult the regional CEAA officer for approved materials and consult AES for approved methods prior to executing the specifications.

Reference material which may assist with the preparation of this section are ACI Compilation No.5 Concrete Repair and Restoration, ACI Box 19150 Redford Station, Detroit MI 48219 - "Basic Steps to a Concrete Repair Program"; "Restoring Frank L. Wright's Falling Water House - Concrete".


07 03 32 HISTORIC - WOOD SHINGLES AND SHAKES ROOFING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
076200 - SHEET METAL FLASHING AND TRIM
009275

Notes:

DESCRIPTION: Ensure that drawings indicate extent of shingle and shake application and show a representative portion of installation which may include details of shingle pattern, exposure, headlap and sidelap of underlay as well as treatment at eaves, valleys, hips, ridges, gables, dormers, chimneys and sidewall openings.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section makes reference to the Architectural Conservation Technology (ACT) Manual, which was first prepared within the context of Parks Canada Policy (1979) and was re-edited in 1994.  See ACT Manual, Vol. VII Period Construction Technology, Article 9.1 Period Roofing - Shingle Roofing, published by Canada Communication Group - Publishing.


07 03 33 HISTORIC - SOD ROOFING

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This Section specifies sod materials for use as overlay on roofs of historic structures. There is no known single method of sod roofing. Sod roofing overlay is a technique which is comprised of a range of methods rather than one single form, with adaptations developed for variation of geography, climate, resources, roof style and of course skills of tradesman.

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.


07 03 34 Historic - Canvas Roofing

Date: 1999/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017419

Notes:

This Section 07 03 34 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07332 - Historic Structures Canvas Roofing in accordance with MasterFormat 1995.

DESCRIPTION: Canvas roofs have been used for small ornate roofs of unusual shape or section which are difficult to cover. They are also used for roofs of low pitch which are intended for walking on, porch roofs and floors. Weather decks of ships and boats are also covered with canvas. This specification should be used in conjunction with standard drawings of A and E Canada/PWC, AOR-0501, AOR-0502, AOR-0503 and AOR-0503-A.

SUPPORT: This section was developed by Real Property Services for Environment Canada and Canadian Heritage, Public Works and Government Services Canada.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

This section was developed between 1979 and 1984 to assist professional staff working on National Historic Site structures. No comprehensive update of this document has been undertaken to ensure: metrification of product measurements, current product availability, environmental and safety concerns, of reference book availability.


07 03 35 HISTORIC - TIN-PLATE AND TERNEPLATE ROOFING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section was developed to assist professional staff working on National Historic Site structures. No comprehensive update of this document has been undertaken to ensure: metrification of product measurements, current product availability or safety concerns.

This Section specifies architectural sheet metal roofing systems but does not address such pre-formed sheet metal roofing products as corrugated iron or steel shingles. This Section was first developed between 1979 and 1984 to assist professional staff working on National Historic Site structures. No comprehensive update of this document has been undertaken to ensure: metrification of product measurements, current product availability, environmental and safety concerns. The present guideline sheets provide valuable information referring to the products and materials characteristics to be selected and used in the above mentioned specification. PART 2, PRODUCTS - 2.1 MATERIALS - two types of metal plate roofing sheets were (1979-1984) manufactured, the tin-plate and the terneplate.  2.1.1 Tin-plate roofing sheets - two types of tin-plate are currently manufactured, a hot-dip tin-plate and an electrolytic tin-plate, a post 1934 development. Coating of former type is applied mechanically by tinning rolls. In case of latter, coating is obtained by electro-deposition. Specification varies for each product.  - Base Metal: Historically, hot-dip tin-plate was produced from a variety of base metals, genuine charcoal iron, coke iron and Bessemer steel.  In more recent years, hot-dip tin-plate is produced from open-hearth, electric-furnace or basic-oxygen steel. Electrolytic tin-plate, a comparatively recent type of tin-plate has been produced with latter mentioned steels only. Steel used in tin-plate manufacture comes in generally one of two forms: ordinary carbon, cold-rolled sheet, available in thicknesses greater than 0.38 mm or low carbon, single or double-reduced black plate, available in thicknesses less than 0.358 mm. Double-reduced product with thicknesses less than 0.155 mm is too thin to be of use in this specification. Single reduced black plate is available in a variety of ground roll and shot-blasted finishes. While important from standpoint of container manufacturers, these finishes have no relevance for a roofing application. They neither improve or worsen significantly, paint bonding characteristics of tin. The various tin-plate products now produced should not be considered for roof application for the reasons stated above.  - Basis weight or thickness: thickness of tin mill black plate, 0.36 mm or thinner, employed as a base metal for tin-plate is expressed by base weight method. This is weight in pounds of 112 sheets of base metal, 14" by 20" - a single base box. In near future the industry will be converting to a SITA (System International Tin-plate Area) method, where product is designated in units of 100 m². As this has not taken place to date, no metric equivalent for base box unit is provided. Weight of basis box for 1C tin-plate, a gauge once used for roofs, is 107 pounds.  Thickness of cold-rolled steel sheet, 0.38 mm and over, employed as a base metal for tin-plate is expressed in hundredths of a millimetre. The thickness of 1X and 2X tin-plate, once commonly used for roofs are 0.377 mm and 0.432 mm.  - Coating weights: pure tin coating on a hot-dip tin-plate is mechanically distributed over sheet surface by tinning rolls. Due to nature of this tinning operation and elevated temperature of metal it is not possible to control, within close limits tin coating weight. For these and other reasons, coating is measured and described by "tin pot yield" method. Total weight (in pounds) of tin consumed in manufacture of one base box, is pot yield. Terms, charcoal plate and coke plate, which in last century described quality of iron used as a base metal have now come to be applied to tin-plate of certain coating thickness. Amount of coating on coke plates is generally between 1.25 and 2.5 pounds per base box - on charcoal plates between 3 pounds and 5 pounds per base box. For roofing applications, heavier charcoal weight coatings have always been preferred. Common cokes, 1.25 lb/base box. Standard cokes, 1.50 lb/base box; Best cokes, 1.70 lb/base box. "Kanners" special cokes, 2.0 lb/base box; 1-A charcoal, 2.25 lb/base box; 2-A charcoal, 3 lb/base box; 3-A charcoal, 3.8 lb/base box.  Check CSA Standards and note steel, galvanized metal comes with a rust inhibitor which effects painting, usually paint will not adhere to coating. This must be neutralized before paint adheres. Method used must follow steel industry standards.  Weight of coating on an electrolytic plate is a measurement of amount of coating on both sides of sheet, expressed in grams per square meter. Prior to adoption of this system, a "pot yield" method was used. The coating designation numbers are a hold over from this earlier system. - Coating finish: historically two surface finishes were available, a "blue oil" and "bright dry", depending on how palm oil used in hot-dip process was handled. In recent years, no such variation occurs in manufacturing process and most tin-plate produced is of a mirror-bright finish. At least five different surface finishes are available, depending on finish of base metal and treatment of coating. If plated strip is heated above melting point of tin and quenched in water (melted), result is a bright reflective coating. If left unmelted, coating has a non-reflective appearance. Following finishes are available: 7B smooth finish base, possibly with fine grit lines; - a melted coating (bright-highly reflective); l7C smooth finish based with grit lines - a melted coating (bright-reflective) same-matte (unmelted) coating (non-reflective); 5B shot-blast finish base (SBF) - melted tin coating (bright-non reflective); 5C shot-blast finish (SBF) - matte unmelted tin coating (dully grey). For roofing purposes, all of the above listed finishes are acceptable.  - Grade : hot-dip tin coated sheet and hot-dip tin-plate are line-inspected on one surface and intermittently on two surfaces or in same instances continuously on both surfaces. Accepted product is known in commerce as "Unassorted" or "Standard" quality. Sometimes accepted "Standard" grade material is subjected to a further visual examination either on sorting tables or on special inspection lines, a process called "assorting" and separated into two quality gradings called "Primes" and "Seconds". "Primes" is grade designation given to tin-plate free from defects readily observed by unaided eye. It is the only grade of tin-plate that could be acceptable for a roofing application. Increased line speed of electrolytic tinning and practice of shipping much of tin in coils makes line inspection very difficult. At present time, normal production is called "standard" grade and remainder "menders", "rejects" or some other category. Onus is on purchaser to locate defects and do his own assorting.  - Size: hot-dip tin-plate and tin coated sheet are produced almost entirely as cut-lengths. Width of hot-dip tin-plate available is generally in range 635 to 762 mm. In heavier coatings, widths of up to 1500 mm are not uncommon. More common lengths are between 762 mm to 814 mm. In heavier coatings a length of 3000 mm can be ordered. Electrolytic tin-plate and tin coated sheet is available in cut lengths and coils. Commonly produced widths range from 635 mm to 965 mm. Lengths are normally in range of 508 mm to 1016 mm for cut-lengths. 5 to 10 ton coils commonly produced are too large to be considered for ordering in course of renewing a roof. Plate sizes listed are those most commonly used historically. 2.1.2 terneplate roofing sheets  - All terneplate is produced by hot-dip process. Two product lines "short terne" and "long terne" are available. The difference between the two products is largely one of size. "Short terne" is generally available in the sizes 356 x 508 mm and 508 x 711 mm. "Long terne" is available in cut lengths up to 3,658 mm and coils, generally 15,240 mm in length.  - Base metal: historically, terneplate was made with a variety of base metals; i.e., genuine charcoal iron, open hearth steel, Bessemer steel and low carbon steel. In more recent years, generally two base metal are used; a copper-bearing, low carbon steel and 304 (18% chrome, 8% nickel), dead-soft stainless steel. Copper content of copper bearing steel is usually specified as less than 0.20 percent by cast or heat analysis of 0.18 percent by product check or verification analysis.  The thickness of lighter gauge carbon steels, 0.38 mm, sometimes referred to as tin mill black plate, employed as a base metal for terneplate is expressed by base weight method. 107, 135 and 155 pounds per single base box sizes are most common. They are also known as 1C, 1X and 2X respectively. Thickness of cold-rolled, carbon steel sheet, 0.38 mm and over, employed as a base for long terne sheets or coils (seamless roll) and stainless steel sheet employed as a base for terne coated stainless sheets is expressed in hundredths of a millimetre. - Coating weights: terne coating is applied by hot-dip method, where sheets are passed through a bath and rollers remove excess coating by a squeezing action. Coating thickness on "short terneplate" is expressed in pounds per double base box (a surface area of 871.12 square feet). Generally, 3 coating weights are available. Coating thickness on "long terne" is generally expressed in grams per square metres. Some manufacturers continue to use the pound per base box method.  - Shop coat finish: it is recommended that all terne coated, carbon steel used at exterior be painted. This may consist of a mill applied shop coat, 2 sides, followed by 2 coats of oil paint (a red oxide-linseed oil paint primer and a coat of long oil exterior) on exposed surface. Alternatively single coat applied at underside can be a coat of red iron oxide-linseed oil paint applied before application. Terne coated stainless will weather to a uniform warm grey and needs no painting for protection or maintenance.  - Grade: short terne is inspected after coating and graded as "primes" and "seconds". "Primes" is grade designation given to terneplate free from defects readily observed by unaided eye. "Seconds" is grade designation given to short terne having imperfections in moderate degree or extent. For roofing purposes "primes", including a maximum of 3 percent "seconds" should be specified.  Long terne, in cut length sheets is produced to a single grade "prime finish", free from injurious defects such as blisters, flux, and uncoated spots. Production of coils does not afford an opportunity for inspection, grading and sorting.  - Size: "short terneplate" is cut to standard sizes and re-squared. Sizes 356 x 508 mm and 508 x 711 mm are commonly stocked. "Long terne" sheet is produced in cut-lengths and coils. Cut-length sheets are available in 508, 610 and 711 mm widths and 2438 and 3658 mm lengths. Coils or seamless rolls are available in widths ranging from 102 to 711 mm, and a length of 15,240 mm.


07 03 36 Historic - Board Roofing

Date: 2000/12/31

Related sections:

017419
610000

Notes:

This Section 07 03 36 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07471 - Historic Structures Board Roofing in accordance with MasterFormat 1995.

SUPPORT: This Section developed by Real Property Services for Canadian Heritage, Environment Canada and Parks Canada Agency, Public Works and Government Services Canada, and has not been reviewed by other government departments nor the private sector.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Use this Section as a guide to specifying boards applied to roofs of historic buildings as a covering. Ensure that drawings indicate extent of boarding and show a representative portion of pattern to be used both on main roof and any dormers. Considering infrequent use made of this roof covering today, it is essential that detail drawings, covering every aspect of installation be prepared. No store of knowledge concerning detailing or installation of board roofing can be expected from a roofer, or other tradesman today. For convenience of specifiers using this section flashing is included.

Where an existing historic board roof is being replaced, it's construction, materials and retailing should be carefully researched, this information should be used as the basis for the design of the new roof. To ensure it follows historic precedent.

This section was developed between 1979 and 1984 to assist professional staff working on National Historic Site structures. No comprehensive update of this document has been undertaken to ensure: metrification of product measurements, current product availability, environmental and safety concerns, of reference books availability.


07 03 91 Historic - Caulking Vessels

Date: 2000/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 07 03 91 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07921 - Historic Structures: Caulking Vessels in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies caulking of carvel planking on historic vessels. This section may also be used for caulking of operational vessels.

SUPPORT: This section developed by Real Property Services for Environment Canada and Canadian Heritage, Public Works and Government Services Canada.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including generally available disposal options.


07 11 13 BITUMINOUS DAMPPROOFING

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES

Notes:

This Section 07 11 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07120 - Bituminous Dampproofing in accordance with MasterFormat 1995.

This Section 07120 is presently numbered to meet the MasterFormat 1995 classification system. Beginning with the January 2005 update, this NMS section will be published as Section 07 11 13 in accordance with the recommendations of the MasterFormat 2004 classification system.

DESCRIPTION: This Section specifies asphalt for use as dampproofing and its application.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


07 12 13 BUILT-UP ASPHALT WATERPROOFING

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
079200 - Joint Sealants
060899 - ROUGH CARPENTRY FOR MINOR WORKS
061000 - ROUGH CARPENTRY
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
015600 - TEMPORARY BARRIERS AND ENCLOSURES

Notes:

DESCRIPTION: This Section specifies built-up asphalt waterproofing used for waterproofing of both horizontal and vertical surfaces.

This Section has been derived from an earlier version of Section 07 51 12 - Built-Up Asphalt Roofing and Waterproofing.

For built-up asphalt roofing refer to Section 07 51 13 - Built-Up Asphalt Roofing.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


07 13 52 MODIFIED BITUMINOUS SHEET WATERPROOFING

Date: 2008/12/31

Related sections:

013216
013529
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
071352 - MODIFIED BITUMINOUS SHEET WATERPROOFING
060899 - ROUGH CARPENTRY FOR MINOR WORKS
061000 - ROUGH CARPENTRY

Notes:

DESCRIPTION: This Section specifies modified bituminous sheet waterproofing used for both horizontal and vertical surfaces

This Section was derived from Section 07 52 00 - Modified Bituminous Membrane Roofing in order to specifically address waterproofing.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

The following Section contains text required to complete the work of this Section: 07 92 00 - Joint Sealants.

For Modified Bituminous Membrane Roofing use Section 07 52 00.


07 16 19 METAL OXIDE WATERPROOFING

Date: 2006/09/30

Related sections:

014500 - QUALITY CONTROL
071619 - METAL OXIDE WATERPROOFING
033505 - CONCRETE FLOOR HARDENING
033500 - CONCRETE FINISHING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the material and mixes for metal oxide waterproofing and their application.

This Section 07 16 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07161 - Metal Oxide Waterproofing in accordance with MasterFormat 1995.


07 17 13 Bentonite Panel Waterproofing

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
071713 - Bentonite Panel Waterproofing
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Notes:

This Section 07 17 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07170 - Bentonite Waterproofing in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the waterproofing materials, their preparation and application for bentonite waterproofing.

SUPPORT: This Section has been reviewed and updated with the assistance of Hesterman Technical Services, Regina, Saskatchewan. S4N 5X4; and Tremco Inc.- Sealant and Weatherproofing Division, Ottawa, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

American Colloid Company, 1500 West Shure Drive, Arlington Heights, Illinois 60004-1434 is the major producer of bentonite clay waterproofing in the USA. Material is not produced in Canada, but is available from suppliers in some areas of the country. Before specifying for a project, specifier should ensure that material is readily available and that local applicators are skilled in the application of material. This specification is based on American Colloid Company products and recommendations, and is limited to bentonite clay filled corrugated paper panel systems and accessories. Specifier should ensure that subsoil conditions are such that bentonite clay will perform properly as a waterproofing membrane and that special placement and compaction provisions are specified in Section 31 23 33.01 - Excavating, Trenching and Backfilling.


07 18 00 TRAFFIC COATINGS

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033500 - CONCRETE FINISHING

Notes:

This Section 07 18 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07180 - Traffic Coatings in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies water and weather impervious seamless pedestrian or vehicular traffic topping for roof terraces, balconies, mechanical room floors subject to flooding, and parking garage floors.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


07 19 00 Water Repellents

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section 07 19 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07190 - Water Repellent Coatings in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies water repellents for dampproofing of exterior surfaces of brick, stone, concrete and concrete block above grade.

SUPPORT: This Section has been reviewed and updated with the assistance of Hesterman Technical Services, Regina, Saskatchewan.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Specifier must ensure that use of specified water repellents is permitted by air pollution ordinances and is not too hazardous for project conditions. Check compatibility of water repellent with brick. Some brick manufacturers test specific coatings with their products. Before specifying product seek specialist advice on use of product.


07 21 13 BOARD INSULATION

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013216
013529
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies rigid, polystyrene, polyisocyanurate, urethane, mineral fibre, cellular glass and cellulose fibre, adhesives, accessories and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. Increased R-value insulation levels will provide improved energy efficiency. Improved energy efficiency reduces the use of nonrenewable energy sources and provides a lessened contribution to global warming.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 07 21 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07212 - Board Insulation in accordance with MasterFormat 1995.


07 21 16 BLANKET INSULATION

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013216
013529
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. Increased R-value insulation levels will provide improved energy efficiency. Improved energy efficiency reduces the use of nonrenewable energy sources and provides a lessened contribution to global warming.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 07 21 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07213 - Batt and Blanket Insulation in accordance with MasterFormat 1995.


07 21 23 LOOSE FILL INSULATION

Date: 2006/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
013529
015100 - TEMPORARY UTILITIES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
072600 - VAPOUR RETARDERS

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste system.

ENVIRONMENTAL: Increased R-value insulation levels will provide improved energy efficiency. Improved energy efficiency reduces the use of nonrenewable energy sources and provides a lessened contribution to global warming.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 07 21 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07211 - Loose Fill Insulation in accordance with MasterFormat 1995.


07212901 SPRAYED INSULATION - CELLULOSE
07 21 29.01 SPRAYED INSULATION - CELLULOSE

Date: 2006/03/31

Related sections:

013529
015100 - TEMPORARY UTILITIES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options. Increased R-value insulation levels will provide improved energy efficiency. Improved energy efficiency reduces the use of nonrenewable energy sources and provides a lessened contribution to global warming.


07212902 SPRAYED INSULATION - MINERAL FIBRE
07 21 29.02 SPRAYED INSULATION - MINERAL FIBRE

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
015100 - TEMPORARY UTILITIES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies insulation consisting of mineral fibres and binders which are sprayed on building components and surfaces for thermal and/or acoustical requirements.

SUSTAINABILITY: LEED: This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification.


07212903 SPRAYED INSULATION - POLYURETHANE FOAM
07 21 29.03 SPRAYED INSULATION - POLYURETHANE FOAM

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies spray in place urethane insulation not contained within a cavity or other restricted space. Ensure that assemblies incorporating spray in place urethane insulation conform to applicable fire protection requirements of the NBC, local authorities, Fire Commissioner for Canada and Government Department directives.

This section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification.  Co-ordinate with Section 01 35 21 - LEED Requirements.


07 24 00 EXTERIOR INSULATION AND FINISH SYSTEMS

Date: 2006/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
013529
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
072400 - EXTERIOR INSULATION AND FINISH SYSTEMS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
079200 - Joint Sealants

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options. Increased R-value insulation levels will provide improved energy efficiency.  Improved energy efficiency reduces the use of non-renewable energy sources and provides a lessened contribution to global warming.

This Section 07 24 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07240 - Exterior Insulation and Finish Systems in accordance with MasterFormat 1995.


07241001 EXTERIOR INSULATION AND FINISH SYSTEMS - PANELIZED
07 24 10.01 EXTERIOR INSULATION AND FINISH SYSTEMS - PANELIZED

Date: 2006/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
054100 - STRUCTURAL METAL STUD FRAMING
014500 - QUALITY CONTROL
013529
016100 - COMMON PRODUCT REQUIREMENTS
072410
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
072600 - VAPOUR RETARDERS
061000 - ROUGH CARPENTRY
092116 - GYPSUM BOARD ASSEMBLIES
072700
079210

Notes:

DESCRIPTION: This Section specifies exterior insulation and finish systems as prefabricated systems, sometimes called panelized systems, which are pre-manufactured in a factory and then installed on the building. This Section does not specify site applied systems, sometimes called cladding systems. It does not specify direct-applied or one coat stucco systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options. Increased R-value insulation levels will provide improved energy efficiency. Improved energy efficiency reduces the use of non-renewable energy sources and provides a lessened contribution to global warming.

This Section 07 24 10.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07241 - Exterior Insulation and Finish Systems: Panelized System in accordance with MasterFormat 1995.


07241003 EXTERIOR FINISH - DIRECT APPLIED
07 24 10.03 EXTERIOR FINISH - DIRECT APPLIED

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
072410
079210

Notes:

DESCRIPTION: This Section specifies exterior finish systems as site applied systems installed directly on the soffit of a building, sometimes called direct applied finish systems. These systems use the base, reinforcing and finish coats of the typical EIFS system minus the insulation.


07 26 00 VAPOUR RETARDERS

Date: 2006/03/31

Related sections:

013529
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
079200 - Joint Sealants
017411 - CLEANING

Notes:

Ensure that sheet vapour barrier can be installed and sealed as detailed without interrupting continuity of vapour barrier.

Ensure details at penetrations, openings and transitions between different types of vapour barrier are shown.

This Section 07 26 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07160 - Sheet Vapour Retarders in accordance with MasterFormat 1995.


07270001 AIR BARRIERS - DESCRIPTIVE OR PROPRIETARY
07 27 00.01 AIR BARRIERS - DESCRIPTIVE OR PROPRIETARY

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
079210
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies air/vapour barrier materials and systems. It does not include materials and systems that are air barriers only or vapour retarders only. It includes various materials and methods used to create a building enclosure air/vapour barrier and to seal spaces between adjacent materials or components forming wall or roof openings. It is intended to complement other air/vapour barrier material or component sections such as Sections 08 11 16 - Aluminum Doors and Frames, 08 11 19 - Stainless Steel Doors and Frames, 08 50 00 - Windows, 09 21 16 - Gypsum Board Assemblies and other sections. This section includes proprietary, descriptive and reference type specifications; edit to use only one type to avoid conflicting requirements.


07270002 AIR BARRIERS - PERFORMANCE
07 27 00.02 AIR BARRIERS - PERFORMANCE

Date: 2007/03/31

Related sections:

033000 - CAST-IN-PLACE CONCRETE
028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete enclosure air/vapour barrier. Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in a specially written Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications; these methods are addressed in Section 07 27 00.01 - Air Barriers - Descriptive or Proprietary.


07 31 13 ASPHALT SHINGLES

Date: 2004/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
076200 - SHEET METAL FLASHING AND TRIM

Notes:

This Section 07 31 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07311 - Asphalt Shingles in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies asphalt shingles, roll roofing, accessories, the removal of existing roofing and the application of new shingles.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure that drawings indicate extent of non-standard pattern as well as details at flashings, eaves, gables, hips, parapets, chimneys and dormers. Ensure that sheet metal flashings and trim are specified in Section 07 62 00 - Metal Flashing and Trim.


07 31 29 WOOD SHINGLES AND SHAKES

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS

Notes:

DESCRIPTION: This Section specifies wood shingles and shakes applied to roofs and exterior walls.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure that drawings indicate extent of shingle and shake application and show representative portion of pattern to be used, including exposure, sidelaps and headlaps as well as installation at flashings, eaves, gables, hip, parapets, chimneys and dormers. Ensure that sheet metal flashings and trim required in connection with wood shingles and shakes are specified in Section 07 62 00 - Sheet Metal Flashing and Trim.

Use Section 07 03 32 - Historic - Wood Shingles and Shakes Roofing, when doing complicated re-roofing of an historic building.

This Section 07 31 29 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07313 - Wood Shingles and Shakes in accordance with MasterFormat 1995.


07 42 43 COMPOSITE WALL PANELS

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies a composite panel material composed of two sheets of metal bonded to a low density thermoplastic or polyethylene core. The metal sheets can be aluminum with an anodized or painted finish, or stainless steel. The panels are attached to each other and to the substrate with extruded fasteners which can be either a continuous edge grip method or a rout and return method. Attachment methods should be checked with manufacturer.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


07424301 COMPOSITE METAL BUILDING PANELS
07 42 43.01 COMPOSITE METAL BUILDING PANELS

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies field assembled metal wall systems with exterior horizontal or vertical face profile and interior liner.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 07 41 43 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07431 - Composite Metal Building Panels in accordance with MasterFormat 1995.


07 44 56 Mineral Fiber Reinforced Cementitious Panels

Date: 2004/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529

Notes:

This Section 07 44 56 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07450 - Fibre Reinforced Cementitious Panels in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies wall systems comprising fibre reinforced cementitious or asbestos-cement composite panels in aluminum grid.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


07 46 13 PREFORMED METAL SIDING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

DESCRIPTION: This Section specifies residential and light commercial type prefinished metal strip siding, soffit and fascia cladding.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 07 46 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07465 - Preformed Metal Cladding/Siding in accordance with MasterFormat 1995.


07 46 23 WOOD SIDING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
076200 - SHEET METAL FLASHING AND TRIM

Notes:

DESCRIPTION: This Section specifies plywood, hardboard and lumber siding.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

If wood siding materials are to be treated with preservative or fire retardant by pressure impregnation insert appropriate text from Section "Wood Treatment", edited as required. Check treatability of specified species and acceptability of resulting colour before specifying.

This Section 07 46 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07461 - Wood Siding in accordance with MasterFormat 1995.


07 46 33 PLASTIC SIDING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

DESCRIPTION: This Section specifies residential and light commercial type rigid vinyl (PVC).

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 07 46 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07464 - Rigid Vinyl Siding in accordance with MasterFormat 1995.


07 51 00 BUILT-UP BITUMINOUS ROOFING

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
061000 - ROUGH CARPENTRY
079200 - Joint Sealants
060899 - ROUGH CARPENTRY FOR MINOR WORKS
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Notes:

DESCRIPTION: This Section specifies bituminous built-up roofing (BUR) in either conventional membrane roofing (CMR) or protected membrane roofing (PMR) systems.

Text from Section 07 92 00 - Joint Sealants might be used in Sealers article - PART 2 - PRODUCTS.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

For built-up asphalt waterproofing refer to Section 07 12 13 - Built-Up Asphalt Waterproofing.


07 52 00 MODIFIED BITUMINOUS MEMBRANE ROOFING

Date: 2008/12/31

Related sections:

013216
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
061000 - ROUGH CARPENTRY
060899 - ROUGH CARPENTRY FOR MINOR WORKS
053100 - STEEL DECKING

Notes:

DESCRIPTION: This Section specifies modified bituminous roofing used in both conventional membrane roofing (CMR) and protected membrane roofing (PMR) systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

The following Section contains text required to complete the work of this Section: 07 92 00 - Joint Sealants.

For Modified Bituminous Sheet Waterproofing use Section 07 13 52.


07 53 23 ETHYLENE PROPYLENE DIENE MONOMER ROOFING

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
075323 - ETHYLENE PROPYLENE DIENE MONOMER ROOFING
061000 - ROUGH CARPENTRY
079200 - Joint Sealants
053100 - STEEL DECKING
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Notes:

This Section specifies ethylene propylene diene monomer (EPDM) used for roofing in both conventional membrane roofing (CMR) and protected membrane roofing (PMR) systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

For waterproofing refer to Section 07 13 53.


07 54 19 POLYVINYL-CHLORIDE ROOFING

Date: 2009/12/31

Related sections:

013216
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
075419 - POLYVINYL-CHLORIDE ROOFING
061000 - ROUGH CARPENTRY
076200 - SHEET METAL FLASHING AND TRIM
053100 - STEEL DECKING
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
017411 - CLEANING

Notes:

This Section specifies polyvinyl chloride (PVC) roofing in both conventional membrane roofing (CMR) and protected membrane roofing (PMR) systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

For PVC membrane Waterproofing use Section 07 13 54 - Thermoplastic Sheet Waterproofing.

Consult with manufacturer before specifying PVC membrane for roofing applications when the January design temperature is -23 degrees C.


07555614 Hot Fluid Applied Rubberized Asphalt Roofing
07 55 56.14 Hot Fluid Applied Rubberized Asphalt Roofing

Date: 2004/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
015100 - TEMPORARY UTILITIES
075550
061000 - ROUGH CARPENTRY
079210
076200 - SHEET METAL FLASHING AND TRIM
014500 - QUALITY CONTROL
033000 - CAST-IN-PLACE CONCRETE
053100 - STEEL DECKING
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
015600 - TEMPORARY BARRIERS AND ENCLOSURES

Notes:

This Section 07 55 57 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07561 - Hot Applied Rubberized Asphalt Roofing and Waterproofing in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies hot applied rubberized asphalt (HARA) used for roofing and waterproofing in a protected membrane assembly. It also specifies sheathing materials, insulation, ballast and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

When a separate section is required for waterproofing, select appropriate paragraphs from this section and create section 07 11 13.


07 55 63 VEGETATED PROTECTED MEMBRANE ROOFING

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
013529
016100 - COMMON PRODUCT REQUIREMENTS
014713 - SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
132160
075563 - VEGETATED PROTECTED MEMBRANE ROOFING
076200 - SHEET METAL FLASHING AND TRIM
079523 - PREFABRICATED ROOF EXPANSION JOINTS
034500 - Precast Architectural Concrete
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section addresses "green roof" design, where a waterproof membrane is covered with soil and plant materials and perhaps walkway surfaces.  This Section includes a double ply roofing of reinforced composite membrane of modified asphalt bitumen, fused seams and adhered over a structural substrate.  This assembly, begins with a structural deck that is capable of supporting loads of rain/snow, then a waterproof membrane, loose laid insulation, filter fabric over insulation, soil cover and growing media, walk pavers or grass.  The assembly requires primary protective flashings to roof protrusions and penetrations, and may require roofing control joints and building expansion joints.  This section contains options to specify a roof assembly by performance criteria, or by prescriptive statements.  Edit to avoid conflicting requirements.

This Section is intended to be used for Green Roof applications where trees, shrubs, ground cover, grass, and walking pavers are used at a roof top area.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.


07 61 00 SHEET METAL ROOFING

Date: 2004/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
079200 - Joint Sealants

Notes:

This Section 07 61 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07610 - Sheet Metal Roofing in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the sheet metal, metal finishes, accessories, fabrication and installation for sheet metal roofing including mansard roofs.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


07 62 00 SHEET METAL FLASHING AND TRIM

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies galvanized steel, prefinished steel, aluminum, copper and stainless steel counter flashings, cap flashings, eaves troughs and down-pipes in connection with roofing  installation. When decorative type sheet metal work is required (such as batten spandrel panels and wide fascias) add necessary paragraphs as per project requirements. Specify standing seam or batten metal roofing in Section 07 61 00 - Sheet Metal Roofing.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


07 72 33 ROOF HATCHES

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This Section 07 72 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07724 - Roof Hatches in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for standard, metal roof hatches components, accessories and hardware. Also included are requirements for heat and smoke vents.

SUPPORT: This Section has been reviewed and updated with the assistance of Canadian Roofing Contractors Association (CRCA), Ottawa, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


07 72 69 ROOF ANCHORS AND SAFETY RESTRAINTS

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014713 - SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION

Notes:

DESCRIPTION: This Section includes shop fabricated roof mounted anchors and personal safety restraints for pedestrians or workers on or around the building roof.  This section includes performance and descriptive type specifications; edit to avoid conflicting requirements.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is intended to be used for Green Roof applications where trees, shrubs, ground cover, grass, and walking pavers are used at a roof top area.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction and Verification and Operation.


07 81 00 APPLIED FIREPROOFING

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
013216
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
099123 - INTERIOR PAINTING
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies mineral fiber sprayed-on fireproofing and sprayed-on cementitious fireproofing.


07 84 00 FIRE STOPPING

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
013216
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies specific construction consisting of any device intended to close off an opening or penetration during a fire and/or materials that fill an opening in a wall or floor assembly where penetration is by cables, cable trays, conduits, ducts, pipes and any poke through termination device, such as electrical outlet boxes along with their means of support through the wall or the floor opening and is intended to be used in specifications for buildings conforming to Part 3 and Part 9 of NBC.


07 92 00 Joint Sealants

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section 07 92 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07900 - Joint Sealers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies caulking and sealants not specified in other Sections. Refer to other sections for other caulking and sealants.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section can be used for work indicated and as a source of text for inclusion in other Sections where caulking and sealants are required.


07 95 13 EXPANSION JOINT COVER ASSEMBLIES

Date: 2004/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017419

Notes:

This Section 07 95 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 05810 - Expansion Joint Cover Assemblies in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies manufactured, cast and extruded expansion joint frames and cover assemblies made of aluminum, stainless steel, brass, bronze, and vinyl-acrylic. Their accessories, fabrication and installation are specified.

SUPPORT: This Section has been reviewed and updated with the assistance of Emseal Joint Systems Ltd.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

As there are many variations and combinations available, consult manufacturer's literature or representative when describing the products.

Coordinate forming of expansion joints with related sections, i.e. 03 30 00 - Cast-in-Place Concrete, 04 21 13 - Brick Masonry, 09 21 16 - Gypsum Board Assemblies.


07 95 23 PREFABRICATED ROOF EXPANSION JOINTS

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This Section 07 95 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 07712 - Prefabricated Roof Expansion Joints in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies prefabricated roof expansion joints in connection with roofing application.

SUPPORT: This Section has been reviewed and updated with the assistance of Canadian Roofing Contractors Association (CRCA), Ottawa, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


08 03 11 HISTORIC - PERIOD WOOD DOORS

Date: 2008/06/30

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
088050 - GLAZING

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section can be used to specify reproduction of historic transom, fanlight and sidelight sash/panels.

Period wood doors may require period door frames, hardware, glazing etc. In many cases, the door frame is a component of the door and the door and transom may actually be required to be fitted to the frame before installation in the opening. This is essential, for example, when fabricating doors with frame-mounted pintles. Add this Section to the project manual as required.

Canadian reference on period wood door technology: Architectural Conservation Technology (ACT) Manual, Volume VII, Period Construction Technology, Section 8.1, Period Joinery, Door Making. The Heritage Conservation Directorate of PWGSC produced this manual.

American References on historic building rehabilitation are for sale or available on the National Parks Service web site (http://www.nps.gov/history/hps/tps/briefs/presbhom .htm).  Preserving Historic Corridor Doors and Glazing In High-Rise Buildings; for the Technical Preservation Services catalogue of publications visit http://www.nps.gov/history/tps/tpscat.htm.


08 11 00 METAL DOORS AND FRAMES

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
087100 - DOOR HARDWARE
088050 - GLAZING

Notes:

Verify components with manufacturer and edit section to suit specific door type.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 11 16 ALUMINUM DOORS AND FRAMES

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
088050 - GLAZING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies aluminum doors, frames, sidelights and transoms used in storefront, entrance, vestibule and interior applications and are considered in this Section as a door system. Include in this section, any related components such as air barriers, vapour retarders, door adapters, intake or exhaust louvers. Coordinate with and specify glass and glazing components in Section 08 80 50 - Glazing.

Check manufacturer's literature for recommended hardware and if it is to be provided as part of the door specify in this section; and if not specify in Section 08 71 00 - Door Hardware.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 11 19 STAINLESS STEEL DOORS AND FRAMES

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies stainless steel doors, frames, sidelights and transoms used in storefront, entrance, vestibule and interior applications. Check manufacturers literature for recommended hardware and if it is to be provided as part of the door specify in this section; and if not specify in Section 08 71 00 - Door Hardware. Include in this section, any related components such as air barriers, vapour retarders, door adapters, intake or exhaust louvers. Co-ordinate with and specify glass and glazing components in Section 08 80 50 - Glazing.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 11 69 METAL STORM DOORS AND FRAMES

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 13 73 SLIDING METAL DOORS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies metal fire doors operating horizontally or vertically.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 14 16 Flush Wood Doors

Date: 2004/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
088050 - GLAZING
087100 - DOOR HARDWARE
089000 - LOUVRES AND VENTS

Notes:

This Section 08 14 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 08210 - Wood Doors in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies hollow and solid wood and plastic veneer wood doors and is based on CAN/CSA-O132.2 Series for Wood Flush Doors and AWMAC standard for Stile and Rail Doors. Prehung doors are available but are not specified in this section.

SUPPORT: This Section has been reviewed and updated with the assistance of Door and Hardware Institute.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. Canada is has implemented a CSA governed process to certify the forest management practices for wood products. Check with manufacturers regarding the use of product certified under CAN/CSA-Z808 in the manufacturing process. In order to minimize environmental impacts specified wood types should not be listed on the Convention on International Trade in Endangered Species (CITES).


08 14 80 SLIDING WOOD AND PLASTIC DOORS

Date: 2004/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 08 14 80 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 08260 - Sliding Wood and Plastic Doors in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies wood, steel, aluminum and vinyl frame sliding glass doors, including main frame, glazing, insect screens and is based on CAN/CGSB-82.1.

SUPPORT: This Section has been reviewed and updated with the assistance of the Door and Hardware Institute.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Canada has implemented a CSA governed process to certify the forest management practices for wood products. Check with manufacturers regarding the use of product certified under CAN/CSA-Z808 in the manufacturing process. In order to minimize environmental impacts specified wood types should not be listed on the Convention on International Trade in Endangered Species (CITES).


08310001 ACCESS DOORS - MECHANICAL
08 31 00.01 ACCESS DOORS - MECHANICAL

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
093013 - CERAMIC TILING
040500 - COMMON WORK RESULTS FOR MASONRY
092116 - GYPSUM BOARD ASSEMBLIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies access doors and panels to all concealed mechanical equipment for operating, inspecting, adjusting, balancing and servicing. It does not include access hatches, manhole covers or access doors and hatches supplied as an integral part of equipment.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 33 13 COILING COUNTER DOORS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies coiling (rolling) metal and wood doors of narrow horizontal slats, operating vertically (rolling up at head of opening) and are placed in wall openings above counter height. This includes also labelled coiling counter doors. Note that aluminum cannot be used for labelled shutters.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08332301 OVERHEAD COILING DOORS AND GRILLES
08 33 23.01 OVERHEAD COILING DOORS AND GRILLES

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies overhead coiling doors of narrow horizontal slats, operating vertically (rolling up at head of opening) and in wall openings for traffic purposes (human and vehicular). This includes fire rated rolling doors and grilles serving as security barriers.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 33 36 SIDE COILING GRILLES

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
087100 - DOOR HARDWARE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies side sliding grilles and closures which function as security barriers. It does not include counter height rolling shutters and overhead coiling doors and grilles. These are specified in Sections 08 33 23.01 - Overhead Coiling Doors and Grilles and 08 33 13 - Coiling Counter Doors, side coiling grilles and closures may be specified with coiling partitions, Division 10, when both are on project, to have similar finishes and hardware.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08345801 VAULT DOORS AND FRAMES
08 34 58.01 VAULT DOORS AND FRAMES

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

For DND projects specify vault doors listed in Supply and Service Security Equipment Guide - April 1977.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 34 83 HINGED SAFETY GLASS DOORS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies safety glass doors and lites made of tempered glass without stiles.

Doors with stiles are to be specified under Section 08 11 00 - Metal Doors and Frames, Section 08 11 16 - Aluminum Doors and Frames, Section 08 11 19 - Stainless Steel Doors and Frames, Section 08 14 16 - Flush Wood Doors.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08351301 PANEL FOLDING DOORS
08 35 13.01 PANEL FOLDING DOORS

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies panel folding doors, functioning as interior space saving devices for pass-throughs, pedestrian traffic through walls and partitions, and access doors to closets, wardrobes and wall storage areas. This Section does not include folding units which function as space dividers - movable partitions.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08351313 ACCORDION FOLDING DOORS
08 35 13.13 ACCORDION FOLDING DOORS

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies vinyl covered folding doors of serpentine design. This Section does not include folding or movable partitions that divide space, or wood or metal folding doors.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08361301 SECTIONAL WOOD DOORS
08 36 13.01 SECTIONAL WOOD DOORS

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies wood overhead operating doors consisting of hinged sections, approximately 600 mm wide.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08361302 SECTIONAL METAL DOORS
08 36 13.02 SECTIONAL METAL DOORS

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies metal overhead operating doors consisting of hinged sections, approximately 600 mm high. Overhead hardware door is specified by the 4 commonly available service types based in usage; heavy and standard duty industrial service hardware, commercial service hardware, and residential service hardware. Included in this Section are accessories, metal finishes, electrical operation and installation requirements.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08361303 SECTIONAL PLASTIC DOORS
08 36 13.03 SECTIONAL PLASTIC DOORS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies commercial grade plastic overhead doors made of aluminum extrusions and double skinned plastic, single plastic or fibreglass hinged panels.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 36 19 MULTI-LEAF VERTICAL LIFT DOORS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08361901 VERTICAL LIFT WOOD DOORS
08 36 19.01 VERTICAL LIFT WOOD DOORS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
088050 - GLAZING
099123 - INTERIOR PAINTING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08361902 MULTI-LEAF VERTICAL LIFT METAL DOORS
08 36 19.02 MULTI-LEAF VERTICAL LIFT METAL DOORS

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 38 16 FLEXIBLE TRAFFIC DOORS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 42 29 AUTOMATIC ENTRANCES

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
079200 - Joint Sealants
088050 - GLAZING
017411 - CLEANING
017900 - DEMONSTRATION AND TRAINING

Notes:

DESCRIPTION: This Section specifies packaged automatic entrance doors of the swinging, sliding and revolving type. It incorporates doors, door frames, screen framing, glass and glazing, door hardware, operators, controls and accessories. If this section is written specifically for operators and controls only, renumber and retitle the Section - Electro-Mechanical Hardware.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 44 13 GLAZED ALUMINUM CURTAIN WALLS

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
078400 - FIRE STOPPING
085000 - WINDOWS
727000
099123 - INTERIOR PAINTING
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies tubular aluminum exterior curtain wall assembly for multi-story cladding; site assembled "stick" frame or shop fabricated "unitized" subassemblies; factory prefinished, vision glass, glass or insulated metal panel infill, column covers, louvres, and glazing. With moderate editing, this section could be utilized for bronze or stainless steel systems or could incorporate granite, marble, or stone panels. Air barriers, vapour retarders, intake or exhaust louvres, each integral with the curtain wall system, should be included in this section.

This Section is not specifically structured for special or custom configured wall systems. Glass and glazing is referenced to Section 08 80 50 - Glazing. Sealants are referenced to Section 07 92 00 - Joint Sealants. Stone panels within the curtain wall system may be specified in a Division 4 section.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08442613 STRUCTURAL SEALANT GLAZED ASSEMBLIES
08 44 26.13 STRUCTURAL SEALANT GLAZED ASSEMBLIES

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS

Notes:

DESCRIPTION: This Section specifies an interior aluminum frame supporting an exterior glazed wall. This system has either no exterior visible mullions (four sided sealant glazed), or has mullions in either the horizontal or vertical plane (two sided sealant glazed). Glass and panels are retained in position with structural sealant and at panel perimeter. Air barriers, vapour retarders, intake or exhaust louvres, each integral with this wall system, should be included in this Section.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal.

SUSTAINABLE:  This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.

The assembly is shop fabricated (and to an extent - unitized), factory prefinished, including vision glass, glass or insulated metal panel infill, and glazing. Glass and glazing is referenced to Section 08 80 50 - Glazing. Sealants are referenced to Section 07 92 10 - Joint Sealing. Stone panels within this glazed wall system will be specified in a Division 4 section.

This Section 08 44 26.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 08975 - Structural Sealant Glazing System in accordance with MasterFormat 1995.


08 50 00 WINDOWS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies horizontal and vertical sliding, casement, projected and fixed windows. Ensure drawings indicate window elevations, dimensions, opening vents and other pertinent details.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

This Section is based on CAN/CSA-A440/A440.1.

Specify window material in title, i.e. Aluminum Windows. If section title changes, change the section number to that recommended in CSC/CSI MasterFormat.


08 62 10 PLASTIC SKYLIGHTS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies standard skylights, their glazing, curb frames, accessories and their installation.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


08 70 05 CABINET AND MISCELLANEOUS HARDWARE

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087110
017411 - CLEANING

Notes:

DESCRIPTION: This Section contains requirements of Architectural Hardware for custom fabricated millwork.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

For prefabricated cabinets, laboratory furniture and windows, consult catalogues for manufacturer's standard Architectural Hardware included with product and specify accordingly.

Use Section 08 71 10 - Door Hardware specify door hardware.


08 71 00 DOOR HARDWARE

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
055000 - METAL FABRICATIONS
017411 - CLEANING

Notes:

DESCRIPTION: This Section contains requirements of finish hardware for conventional doors.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

For special doors such as overhead, folding, flexible, refrigerator/freezer and vault doors etc., consult catalogues for manufacturer's standard hardware included with product and specify accordingly.

Use Section 08 70 05 - Cabinet and Miscellaneous Hardware to specify hardware for custom fabricated millwork.


08 80 50 GLAZING

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088753 - SECURITY FILMS
079200 - Joint Sealants
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Incorporate product and installation requirements and specify in this section by direct reference in metal frame, door, window, glazed wall and other sections to minimize redundant specifying. The referring section should identify the specific glass or plastic, the applicable installation method, whether shop or field glazing is required, as well as identify any variations to the requirements of this section. Drawings should also reference the specific glass or plastic to assist clarity.


08 87 53 SECURITY FILMS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088753 - SECURITY FILMS

Notes:

DESCRIPTION: This Section describes security films/laminates for retrofit applications to existing glass surfaces/windows where the manufactured glass needs to be enhanced for life safety and property protection. This section addresses three levels of protection  This specification is intended for on site and factory installed interior surfaces of the glass or window system. The section does not include bullet resistant glass and glazing products. It is recommended that security film be used in renovation type projects and that bullet resistant glazing be used in new construction where applicable. Bullet resistant glazing should be specified in Section 08 80 50 - Glazing.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

For sustainable requirements for this section related to the Construction and Verification, co-ordinate with Section 01 47 15 Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.

This Section 08 87 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 12497 - Security Film for Glass in accordance with MasterFormat 1995.


08 90 00 LOUVRES AND VENTS

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies metal louvres and vents manufactured from extrusions and formed sheet metal. Do not include here louvres connected to ductwork. Types included are stationary louvres, adjustable louvres, louvred penthouses, door louvres, and brick and block vents.  For louvres and vents connected to ductwork, refer to Section 23 37 20 - Louvres, Intakes and Vents.


09 03 51 HISTORIC - PLASTER

Date: 2008/06/30

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
040308 - HISTORIC - MORTARING

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section specifies repair and replacement of plaster in historic structures. For repair and replacement of plaster in historic structures, refer to Preservation Briefs 21- Repair in Historic Flat Plaster - Walls and Ceilings from the National Trust, published by the US National Parks Service (http://www.cr.nps.gov); also, refer to the Association for Preservation Technology International (APTI) Publications (http://www.apti.org).


09 03 61 Historic - Repainting Exterior Surfaces

Date: 1999/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section 09 03 61 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09991 - Repainting Historic Structures: Exterior Surfaces in accordance with MasterFormat 1995.

This section developed by Architectural and Engineering Services for Environment Canada, Public Works Canada and has not been reviewed by other government departments nor the private sector.

This section specifies priming and painting previously painted exterior surfaces of historic structures, including historic structures exposed to fresh and salt water maritime atmosphere.


09 03 62 Historic - Repainting Interior Surfaces

Date: 1996/06/30

Related sections:

Notes:

This Section 09 03 62 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09992 - Repainting Historic Structures: Interior Surfaces in accordance with MasterFormat 1995.

This section developed by Architectural and Engineering Services for Environment Canada, Public Works Canada and has not been reviewed by other government departments nor the private sector.

This section specifies detailed procedures and necessary information on each step of repainting process on interior historic structures of plaster, wallboard, wood, masonry, brick, concrete and metal surfaces. In this section varnish, lacquer, stain, wax and oil coatings are not dealt with as part of paint coatings.


09 21 16 GYPSUM BOARD ASSEMBLIES

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 21 99 PARTITIONS FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies gypsum board, metal framing and accessories for the application and installation of interior partitions.

This section is an abridged version of Sections 09 21 16 - Gypsum Board Assemblies and 09 22 16 - Non-Structural Metal Framing and is intended for Government - MINOR WORKS contracts. This section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 22 14 FURRING AND LATHING

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies furring and lathing for gypsum, cement and acoustic plasters, including fire rated plaster systems.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.

This Section 09 22 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09205 - Furring and Lathing in accordance with MasterFormat 1995.


09 22 16 Non-structural Metal Framing

Date: 2004/09/30

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 09 22 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09110 - Non-load Bearing Wall Framing in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies interior studs. For wind load bearing studs refer to Section 05 41 00 - Structural Metal Stud Framing.

SUPPORT: This Section has been reviewed and updated with the assistance of Canadian Sheet Steel Building Institute, Cambridge, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


09 23 00 GYPSUM PLASTERING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 30 13 CERAMIC TILING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
092214 - FURRING AND LATHING
079200 - Joint Sealants
017411 - CLEANING

Notes:

Specify waterproofing membrane under tile finish in showers, pools and other wet areas in appropriate Sections. Membranes should not be used directly under tile set by thin-bed method. Metal lath for ceramic tile work may be specified in Section 09 22 14 - Furring and Lathing or in this Section. Specify gypsum board in Section 09 21 16 - Gypsum Board Assemblies or plaster substrate in Section 09 23 00 - Gypsum Plastering only for dry set or organic adhesive application of ceramic tile.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 30 15 QUARRY AND PAVER TILING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
092214 - FURRING AND LATHING
079200 - Joint Sealants
017411 - CLEANING

Notes:

Specify waterproofing membrane under quarry tile finish in wet areas in appropriate Sections.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 51 13 ACOUSTICAL PANEL CEILINGS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013543 - ENVIRONMENTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
095300

Notes:

DESCRIPTION: This Section specifies acoustical units for direct application or for suspended ceiling systems, installation and application.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

Co-ordinate acoustical units to be installed in suspended ceiling systems with the suspension systems in Section 09 53 00.01 - Acoustical Suspension.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 09 51 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09510 - Acoustical Ceilings in accordance with MasterFormat 1995.


09 51 99 ACOUSTICAL CEILINGS FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies acoustical units, acoustical ceiling suspension system components and accessories application and installation.

This Section is an abridged version of Sections 09 53 00.01 - Acoustical Suspension and 09 51 13 - Acoustical Panel Ceilings and is intended for Government - MINOR WORKS contracts. This section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Co-ordinate acoustical units to be installed in suspended ceiling systems with the suspension systems in Section 09 53 00.01 - Acoustical Suspension.


09530001 ACOUSTICAL SUSPENSION
09 53 00.01 ACOUSTICAL SUSPENSION

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies suspension systems for acoustical and panel/grid ceilings. It must be correlated with acoustical units in Section 09 51 13 - Acoustical Panel Ceilings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 54 23 LINEAR METAL CEILINGS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 58 00 INTEGRATED CEILING ASSEMBLIES

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS

Notes:

DESCRIPTION: This Section specifies suspended ceiling system incorporating acoustical, illuminating and air handling components as integral part of the system and in some instances providing fire protection rating in combination with floor/roof framing above.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.

This Section 09 58 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09547 - Integrated Ceiling in accordance with MasterFormat 1995.


09 63 40 STONE FLOORING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
090500
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
061000 - ROUGH CARPENTRY
079200 - Joint Sealants
017411 - CLEANING

Notes:

One concern with stone use indoors is the possible contamination by radon, a naturally occurring radiation, which increases the risk of lung cancer. Check with local authorities, the Provincial Ministries of the Environment, or Environment Canada to determine if radon is a concern in the area where the material was quarried.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 64 23 WOOD PARQUET FLOORING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
090500
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies adhesive applied unfinished and prefinished hardwood parquet flooring.

Ensure that the requirement of substrate flatness of maximum 6 mm variation in 3000 mm radius is specified in Section 03 30 00 - Cast-in-Place Concrete. Slabs on grade must be either waterproofed or have a dampproof membrane.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 64 29 WOOD STRIP AND PLANK FLOORING

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies wood strip flooring, wood sleepers, subfloor preparation and base.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Ensure that the requirements of concrete floor-slab flatness of maximum 6 mm variation in 3000 mm radius is specified in Section 03 30 00 - Cast-in-Place Concrete. Slabs on grade must be either waterproofed or have dampproof membrane.


09 64 53 RESILIENT WOOD FLOORING ASSEMBLIES

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
079200 - Joint Sealants
017411 - CLEANING

Notes:

Ensure that requirement of concrete floor slab flatness of maximum 6 mm variation in 3000 mm radius is specified in Section 03 30 00 - Cast-in-Place Concrete. Slabs on grade must be either waterproofed or have dampproof membrane.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 65 16 RESILIENT SHEET FLOORING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
282000
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 65 19 RESILIENT TILE FLOORING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
282000
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 65 99 RESILIENT FLOORING FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017100 - EXAMINATION AND PREPARATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies vinyl and linoleum flooring, vinyl, rubber and linoleum bases, stair treads, risers and nosing, and accessories. Preparation, flooring and base applications are specified.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

This section is an abridged version of Sections 09 65 16 - Resilient Sheet Flooring and 09 65 19 - Resilient Tile Flooring and is intended for Government - MINOR WORKS contracts. This section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.


09 66 13 PORTLAND CEMENT TERRAZZO FLOORING

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies administrative procedures, materials, accessories, mixes and installation procedures. It does not include information on pre-fabricated terrazzo products. Refer to Section 09 66 23 for Plastic Matrix Terrazzo.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Specify waterproofing membrane under terrazzo finish in showers, pools, cast-in-place terrazzo slop sinks and other wet areas in appropriate Sections.


09 66 16 TERRAZZO FLOOR TILING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, mixes and installation requirements for precast terrazzo.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 66 23 RESINOUS MATRIX TERRAZZO FLOORING

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies administrative procedures, materials, accessories and some installation requirements for Plastic Matrix Terrazzo. It does not include prefabricated terrazzo products. Refer to Section 09 66 13 for Portland Cement Terrazzo.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 68 13 TILE CARPETING

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
024213 - CARPET RECLAMATION
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017100 - EXAMINATION AND PREPARATION
017300 - EXECUTION
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies tile carpeting for indoor commercial use. The standard CAN/CGSB-4.129 is referenced to provide carpet for three classes of traffic use applications.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 68 16 SHEET CARPETING

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
024213 - CARPET RECLAMATION
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017100 - EXAMINATION AND PREPARATION
017300 - EXECUTION
260500 - COMMON WORK RESULTS FOR ELECTRICAL
096516 - RESILIENT SHEET FLOORING
014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies sheet carpet for indoor commercial use. The standard CAN/CGSB-4.129 is referenced to provide carpet for three classes of traffic use applications. This Section includes direct glue-down installations and installation over undercushion.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 69 00 ACCESS FLOORING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
096516 - RESILIENT SHEET FLOORING
096519 - RESILIENT TILE FLOORING
260528 - GROUNDING - SECONDARY
014500 - QUALITY CONTROL
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Notes:

DESCRIPTION: This Section specifies access flooring systems consisting of a series of square, modular, removable, interchangeable panels resting on supporting pedestals and utilizing either a stringer or stringerless type of construction.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section does not specify specialty items such as conductive flooring, radio-frequency and electromagnetic interference shielding, or underfloor fire protection systems. These items must be designed to suit project requirements, coordinated with appropriate specification section and the manufacturer's consulted for availability.

Specifier must consider loads imposed on flooring system during operation of data processing facility. Paper for high speed printers delivered by carts are heavy loads which when in motion may exceed the capacity of the floor system. Check with floor system manufacturer's when heavy rolling loads are expected.

Include a requirement in Section 03 30 00 - Cast-in-Place Concrete and 03 35 00 - Concrete Finishing that concrete floor, used as air plenum, surfaces beneath raised floors are to be sealed with a liquid sealer compound. Sealer should be compatible with pedestal adhesive if pedestals are anchored with adhesive. When a non-compatible sealer is to be used specify the sealer to be removed at pedestal locations before adhesive is applied.

This Section specifies grounding of access floor system for safety hazard and static suppression. Co-ordinate with Division 16. The connection of access floor support system to building grounding electrodes specified in Section 26 05 28 - Grounding - Secondary.

This Section 09 69 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10270 - Access Flooring in accordance with MasterFormat 1995.


09 72 16 VINYL-COATED FABRIC WALL COVERINGS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
015100 - TEMPORARY UTILITIES
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 80 00 ACOUSTIC TREATMENT

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 91 13 EXTERIOR PAINTING

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
099113 - EXTERIOR PAINTING
321723 - PAVEMENT MARKINGS
230553
017411 - CLEANING

Notes:

DESCRIPTION: The system designations and finish formulae are as specified by the Master Painters Institute (MPI).  Products included in the Approved Product Listing are performance tested for resistance to weathering and abrasion, scrub, stain and chemical resistance, cleanability, and application and hiding qualities.

Finishes that are traditionally applied in "Shop" environments (Sections 05 50 00, 06 40 00 etc.) should be specified in those related sections in accordance with requirements noted herein. Other specialty maintenance coatings or finishes are specified in separate sections.

For application of paint to interior surfaces, refer to Section 09 91 23.

For application of paint to existing surfaces, i.e., repainting, refer to Sections 09 91 23.01 and 09 91 13.01.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09911301 EXTERIOR RE-PAINTING
09 91 13.01 EXTERIOR RE-PAINTING

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: The system designations and finish formulae are as specified by the Master Painters Institute (MPI).  "Detail Performance" products included in the MPI Approved Product List are performance tested on such criteria as resistance to abrasion, scrub, stain and chemical resistance, cleanability, and application and hiding qualities.

The Owner or Departmental Representative/Engineer/Consultant shall provide a list of surfaces to be repainted as well as the degree of surface deterioration (DSD) of each surface based on MPI DSD descriptions and assigned ratings and shall issue this information to painters bidding the work. Discrepancies between these surface ratings and painter's site reviews shall be resolved prior to Bid or Tender submission.

Specialty maintenance coatings or finishes are specified in separate Sections.

For repainting of previously painted interior surfaces, refer to Section 09 91 23.01.

For application of paint to unpainted surfaces, refer to Sections 09 91 23 and 09 91 13.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 91 23 INTERIOR PAINTING

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014500 - QUALITY CONTROL
013216
135290
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
092116 - GYPSUM BOARD ASSEMBLIES
C3040 - PAINTING
230553

Notes:

DESCRIPTION: This Section specifies the application of site applied paint finishes to new interior surfaces, including site painting of shop primed surfaces.  The system designations and finish formulae are as specified by the Master Painters Institute (MPI).  Products included in the Approved Product Listing are performance tested for resistance to abrasion, scrub, stain and chemical resistance, cleanability, and application and hiding qualities.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

Finishes that are traditionally applied in "Shop" environments (Sections 05 50 00 -  Metal Fabrications, 06 40 00 - Architectural Woodwork, etc.) should be specified in those related sections in accordance with requirements.  Other specialty maintenance coatings or finishes are specified in separate sections.

For application of paint to exterior surfaces, refer to Section 09 91 13 - Exterior Painting.

For application of paint to existing surfaces, i.e., repainting, refer to Sections 09 91 13.01 - Exterior Re-Painting and 09 91 23.01 - Interior Re-Painting.


09912301 INTERIOR RE-PAINTING
09 91 23.01 INTERIOR RE-PAINTING

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

DESCRIPTION: The system designations and finish formulae are as specified by the Master Painters Institute (MPI).  "Detail Performance" products included in the MPI Approved Product List are performance tested on such criteria as resistance to abrasion, scrub, stain and chemical resistance, cleanability, and application and hiding qualities.

The Owner, Departmental Representative, Engineer or Consultant shall provide a list of surfaces to be repainted as well as the degree of surface deterioration (DSD) of each surface based on MPI DSD descriptions and assigned ratings and shall issue this information to painters bidding the work.  Discrepancies between these surface ratings and painter's site reviews shall be resolved prior to Bid or Tender submission.

Specialty maintenance coatings or finishes are specified in separate sections.

For repainting of previously painted exterior surfaces, refer to Section 09 91 13.01.

For application of paint to unpainted surfaces, refer to Sections 09 91 23 and 09 91 13.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 91 99 PAINTING FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
099113 - EXTERIOR PAINTING
099123 - INTERIOR PAINTING
230553
017411 - CLEANING

Notes:

This section is an abridged version of Sections 09 91 13 - Exterior Painting, 09 91 13.01 - Exterior Re-Painting, 09 91 23 - Interior Painting and 09 91 23.01 - Interior Re-painting and is intended for Government - MINOR WORKS contracts. This section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete sections noted above.

Finishes that are traditionally applied in "Shop" environments (Sections 05 50 00 - Metal Fabrications, 06 40 00 - Architectural Woodwork, etc.) should be specified in those related sections in accordance with requirements.  Other specialty maintenance coatings or finishes are specified in separate sections.

For application of paint to exterior surfaces, refer to Section 09 91 13 - Exterior Painting.

For application of paint to existing surfaces, i.e., repainting, refer to Sections 09 91 13.01 - Exterior Re-Painting and 09 91 23.01 - Interior Re-Painting.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 96 53 ELASTOMERIC COATINGS

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies air and catalyst cured elastomeric coating and their application.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

For sustainable requirements for this Section related to the Construction and Verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.

This Section 09 96 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 09962 - Elastomeric Coatings in accordance with MasterFormat 1995.


09 96 59 HIGH-BUILD GLAZED COATINGS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


09 96 66 AGGREGATE WALL COATINGS

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015100 - TEMPORARY UTILITIES
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies interior or exterior wall coatings of aggregate and matrix (aggregate binder).

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Consult with coating material manufacturers regarding compatibility between selected substrate and matrix.


09 97 19 PAINTING EXTERIOR METAL SURFACES

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section outlines requirements for cleaning and painting metal surfaces of heavy civil structures.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10 11 13 CHALKBOARDS

Date: 2005/03/31

Related sections:

Notes:

DESCRIPTION: This Section specifies components for site fitting and installation, and factory finished units supplied ready for mounting. Free-standing units are not included. Check local suppliers for variations in materials and assemblies that may exist in different regions. Co-ordinate with Section 10 11 23 - Tackboards where combination units are required.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 10 11 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10110 - Chalkboards in accordance with MasterFormat 1995.


10 11 23 TACKBOARDS

Date: 2005/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies components for site fitting and installation, and factory finished units supplied ready for mounting. Free-standing units are not included. Check local suppliers for variations in materials and assemblies that may exist in different regions. Co-ordinate with Section 10 11 13 - Chalkboards where combination units are required.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 10 11 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10120 - Backboards in accordance with MasterFormat 1995.


10 14 00 SIGNAGE

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies signs for buildings. Signs isolated from building, such as road/driveway or parking signs, should be specified Section 10 14 53 - Traffic Signage. For Federal Government Primary Identification Signs refer to the requirements of the Federal Identity Program or contact the Project Manager. A sign schedule and details drawings are an essential part of sign description. Use standardized or modular sizes to enable interchanging, intermixing, additions and deletions. For best results, signs should be responsibility of one supply source.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10 14 53 TRAFFIC SIGNAGE

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This section specifies requirements for supplying, installing and painting roadside and overhead signs.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10211313 METAL TOILET COMPARTMENTS
10 21 13.13 METAL TOILET COMPARTMENTS

Date: 2005/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the materials and components for metal toilet partitions.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

For design requirements and for sizes, mounting heights and clearances see CAN/CSA-B651 Barrier-Free Design.

This Section 10 21 13.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10160 - Metal Toilet Partitions in accordance with MasterFormat 1995.


10211319 PLASTIC TOILET COMPARTMENTS
10 21 13.19 PLASTIC TOILET COMPARTMENTS

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
055000 - METAL FABRICATIONS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies both laminated and solid plastic toilet partitions. For design requirements and for sizes, mounting heights and clearances refer to CSA-B651 Accessible Design for the Built Environment.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10 21 16 SHOWER AND DRESSING COMPARTMENTS

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
064700 - PLASTIC LAMINATE FINISHING
055000 - METAL FABRICATIONS

Notes:

DESCRIPTION: This Section specifies shower and dressing compartments made of steel sheet and plastic laminate. For design requirements and for sizes, mounting heights and clearances see CAN/CSA-B651 Barrier-Free Design.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 10 21 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10185 - Shower and Dressing Compartments in accordance with MasterFormat 1995.


10 22 13 WIRE MESH PARTITIONS

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
087100 - DOOR HARDWARE
087005 - CABINET AND MISCELLANEOUS HARDWARE
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies mesh partitions used to provide secure storage areas, and includes welded wire or expanded, galvanized, painted, PVC or epoxy coated mesh. This Section does not specify chain link mesh partitions. Chain link fabric, framework and gates are specified in Section 32 31 13 - Chain Link Fences and Gates.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10 22 19 POST AND PANEL DEMOUNTABLE PARTITIONS

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies demountable partitions of prefabricated panels of gypsum board, enamelled steel, or other materials, erected on metal posts. Partition thickness is usually 38 to 63 mm. Ceiling, cornice and rail height partitions included.

Include doors and hardware in this Section if not specified under other Sections.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10221901 STUD TYPE DEMOUNTABLE PARTITIONS
10 22 19.01 STUD TYPE DEMOUNTABLE PARTITIONS

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
092216 - Non-structural Metal Framing
092116 - GYPSUM BOARD ASSEMBLIES
088050 - GLAZING
079200 - Joint Sealants
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies demountable partitions of metal studs (drywall and other types) to which gypsum board and other panel materials are applied in manner which enables dismantling and relocation of partition system. Partition thicknesses are from 50 to 125 mm. Ceiling and cornice height partitions included.

Demountable partitions provide lessened environmental impact through their ability to be reused and refurbished. The specification of reused or refurbished demountable partitions provides for effective use of natural resources and diverts materials from the waste steam.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10222613 ACCORDION FOLDING PARTITIONS
10 22 26.13 ACCORDION FOLDING PARTITIONS

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
097216 - VINYL-COATED FABRIC WALL COVERINGS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies fabric covered accordion folding partitions used to divide spaces as a light barrier or sound barrier, or both. This Section does not include accordion folding doors or folding or operable walls and partitions whose rigid panels are individually moved or hinged along their vertical edges to fold in serpentine fashion.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

The following Section contains text required to complete the work of this Section 09 72 16 - Vinyl-Coated Fabric Wall Coverings.


10222633 FOLDING PANEL PARTITIONS
10 22 26.33 FOLDING PANEL PARTITIONS

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
097216 - VINYL-COATED FABRIC WALL COVERINGS
096800
092116 - GYPSUM BOARD ASSEMBLIES
064700 - PLASTIC LAMINATE FINISHING
087005 - CABINET AND MISCELLANEOUS HARDWARE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies flat folding partitions furnished as single panels, hinged pairs, or motorized continuously hinged panel trains. This Section does not include portable, demountable, accordion or retractable coiling partitions.

SUSTAINABILITY: LEED: This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification.

Materials for acoustic wall and ceiling baffles are specified in the appropriate section.

The following Sections contain text required to complete this Section: 06 47 00 - Plastic Laminate Finishing, 08 70 05 - Cabinet and Miscellaneous Hardware, 09 21 16 - Gypsum Board Assemblies, 09 68 00 - Carpeting, and 09 72 16 - Vinyl-Coated Fabric Wall Coverings.


10260001 WALL AND CORNER GUARDS
10 26 00.01 WALL AND CORNER GUARDS

Date: 2004/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 10 26 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10260 - Wall and Corner Guards in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies minimum requirements for vinyl, rubber, pvc and metal wall and corner guards, door bumper guards, accessories and attachments.

SUPPORT: This Section has been reviewed and updated with the assistance of Shanahan's Manufacturing Limited, Calgary, Alberta.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


10 28 10 TOILET AND BATH ACCESSORIES

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section does not specify items such as stainless steel mirror, pre-assembled wash centre, ceiling mounted shower rod, mop and broom holder, electric towel warmer, retractable clothes line or seat cover dispenser.

Include waste management specifications as required, refer to Section 01 74 21 - Construction/Demolition Waste Management and Disposal.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10441619 FIRE EXTINGUISHERS AND SAFETY BLANKETS
10 44 16.19 FIRE EXTINGUISHERS AND SAFETY BLANKETS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This Section specifies different types of water and chemical fire extinguishers, cabinets and fire blankets.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Portable fire extinguishers using carbon tetrachloride or chlorobromomethane should not be specified due to potential associated health and safety issues.


10 51 13 METAL LOCKERS

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
087100 - DOOR HARDWARE
087005 - CABINET AND MISCELLANEOUS HARDWARE
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10 56 13 METAL STORAGE SHELVING

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies metal storage shelving (made up of standard components) other than library or open filing shelving. Storage shelving in this Section does not include pallet racking (heavy industrial type shelving) or kitchen shelving. Ensure that drawings show shelving layouts, number of bays, shelves, base plates, bins, drawers, shelf dividers, and anchoring devices.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


10562613 MANUAL MOBILE STORAGE SHELVING
10 56 26.13 MANUAL MOBILE STORAGE SHELVING

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
061000 - ROUGH CARPENTRY
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies manually operated mobile shelving storage. For electrically operated mobile storage shelving, see Section 10 56 26.23.


10562623 MOTORIZED MOBILE STORAGE SHELVING
10 56 26.23 MOTORIZED MOBILE STORAGE SHELVING

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
061000 - ROUGH CARPENTRY
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies electrically operated mobile shelving storage. For mechanically operated mobile storage shelving, see Section 10 56 26.13 - Mobile Shelving Storage - Manual.


10 75 00 FLAGPOLES

Date: 2004/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section 10 75 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 10350 - Flagpoles in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, accessories, fabrication and installation for steel, aluminum and fibreglass flagpoles.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure drawings indicate height and diameter at butt and tip of flagpoles, including setting depth (for ground set poles). Setting depth is normally 10% of exposed height or minimum 915 mm, whichever is greater.


11 12 00 PARKING CONTROL EQUIPMENT

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING
017900 - DEMONSTRATION AND TRAINING

Notes:

DESCRIPTION: This Section specifies basic equipment to control entry and exit of vehicles at parking areas. Many variations, options and accessories are available and must be carefully selected to ensure all the necessary equipment is included and is compatible with the operations desired. Discuss selection of equipment with management and equipment manufacturers. This is essential for sophisticated parking systems. Parking meters are not included in this Section.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


11 13 13 LOADING DOCK BUMPERS

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies pre-manufactured units ready for mounting, including laminated, moulded, extruded and steel face dock bumpers. Verify with local suppliers for variations in materials and assemblies.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


11 13 16 LOADING DOCK SEALS AND SHELTERS

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies equipment for truck dock seals and shelters, and rail dock shelters.  Verify with local suppliers for variations in materials and assemblies.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


11131913 LOADING DOCK LEVELERS
11 13 19.13 LOADING DOCK LEVELERS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies manual, semi-automatic and hydraulic dock levelers, the levelling platform, dock boards, railcar ramp, accessories, electrical and installation requirements.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Size of opening and anchor inserts to be coordinated with Section 03 30 00 - Cast-in-Place Concrete. Specify provisions of opening in Section 03 30 00 - Cast-in-Place Concrete.


11 13 30 ELEVATING DOCKS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the equipment for stationary, semi-portable, and pit installed elevating docks and their installation.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Size of opening and anchor inserts to be coordinated with Section 03 30 00 - Cast-in-Place Concrete.


11 24 19 VACUUM CLEANING SYSTEMS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and installation for a complete built-in vacuum cleaning system.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


11 40 10 FOOD SERVICE STOCK EQUIPMENT

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies food service catalogued commercial kitchen equipment.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Check equipment energy and power characteristics for compatibility with project design or that available on site and specify accordingly, i.e.: Electrical - phase, voltage, amperage, cycle; Gas - type (natural or propane), pressure; Steam - pressure.


11 40 20 FOOD SERVICE CUSTOM EQUIPMENT

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017900 - DEMONSTRATION AND TRAINING

Notes:

DESCRIPTION: This Section specifies the materials, fabrication and installation of custom fabricated food service equipment.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Specifier to review Instructions to Bidders and Tender Form for pre-qualification or qualification requirements of equipment suppliers, fabricators or installers.


11 41 10 Walk-in Freezers and Coolers

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL

Notes:

This Section 11 41 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 11405 - Prefabricated Walk-in Freezers And Coolers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the administrative and procedural requirements as well as materials accessories and installation procedures for prefabricated walk-in freezers and coolers.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

ENVIRONMENTAL: CFC based refrigerants have been associated with the depletion of the ozone layer.  The specification of equipment that operates on this refrigerants should be avoided use should be avoided.  Equipment operating with HFC based refrigerants have a lower environmental impact and should be specified.


11512313 METAL LIBRARY SHELVING
11 51 23.13 METAL LIBRARY SHELVING

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
062000 - FINISH CARPENTRY
064700 - PLASTIC LAMINATE FINISHING
099123 - INTERIOR PAINTING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies stationary library shelving and open shelf filing shelving. Ensure that drawings show shelving layouts, number of bays, shelves, pullout shelves, dividers, end panels, base plates and anchoring devices. Indicate if wood end panels required.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

The following Sections contain text required to complete the work of this Section: 06 20 00 - Finish Carpentry, 06 47 00 - Plastic Laminate Finishing, Section 09 91 23 - Interior Painting.


11 82 19 PACKAGED INCINERATORS

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099123 - INTERIOR PAINTING

Notes:

This Section 11 82 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 11171 - Packaged Incinerators in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies factory made or field assembled incinerators having capacity up to 50 tonnes of waste per day. Do not use this Section for classified waste. Check Provincial and local environmental regulatory agencies to ensure their acceptance in project location, and determine any special requirements. Co-ordinate with mechanical and electrical designers to determine responsibilities of each trade. Ensure that incinerator area is sized to accommodate equipment and servicing. Refer to ASME PTC 33 for Incinerator performance. (Note: this standard is for large capacity).

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


11 82 26 Waste Compactors And Destructors

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419
055000 - METAL FABRICATIONS
260501
099123 - INTERIOR PAINTING

Notes:

This Section 11 82 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 11172 - Waste Compactors in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies waste compactors and hoppers for use in either a compaction container or a bag compactor system for interior or exterior use. It does not include waste shredders, pulping machines or trailer containers. For tender comparison specifier may find it advantageous to request detailed information on equipment to be included with tender submission.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure that system is compatible with equipment used by local disposal companies. Check room clearances with designers.


12 21 13 HORIZONTAL LOUVRE BLINDS

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies cord operated, surface mounted 25 mm and 35 mm wide (narrow type) only. For horizontal louvre blinds wider than 35 mm refer to manufacturer's literature and modify section to suit.

Check manufacturers literature for availability, motor and control requirements and co-ordinate with Division 26.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


12 21 16 VERTICAL LOUVRE BLINDS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION

Notes:

DESCRIPTION: This Section specifies standard and heavy duty vertical louvre blinds, secured top and bottom or top secured only (free hanging) with four basic materials for the vanes.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Check with manufacturers literature and select combinations of rail and vane materials, operation and function to suit project requirements.

Check manufacturers literature for availability, motor and control requirements and co-ordinate with Division 26 - Electrical.

Specify "between glass" vertical louvre blinds in appropriate window section.


12355313 STEEL LABORATORY CASEWORK
12 35 53.13 STEEL LABORATORY CASEWORK

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING

Notes:

This Section 12 35 54 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 12311 - Steel Laboratory Casework in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies steel laboratory casework including all plumbing and electrical fittings. However fittings should be specified here for supply only with installation covered by Divisions 15 and 16 respectively. Ensure that all holes to receive fittings are prepared by casework manufacturer.


12355319 WOOD LABORATORY CASEWORK
12 35 53.19 WOOD LABORATORY CASEWORK

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
088050 - GLAZING

Notes:

This Section 12 35 55 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 12321 - Wood Laboratory Casework in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies wood laboratory casework including all plumbing and electrical fittings. However fittings should be specified here for supply only but installation shall be covered by Divisions 15 and 16 respectively. Ensure that all holes to receive fittings are prepared by casework manufacturer.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


12 50 00 FURNITURE

Date: 2004/06/30

Related sections:

028101 - HAZARDOUS MATERIALS

Notes:

This Section 12 50 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 12500 - Furniture in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and components for desks, seating and panel systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


12 92 16 INTERIOR PLANTINGS

Date: 2008/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies fertilizer, plants, pots, support, planting and pot installation for interior plantings.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

This specification is intended for direct planting and/or double containerizing in fixed and/or moveable containers for foliage plants.


13 34 19 METAL BUILDING SYSTEMS

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
076200 - SHEET METAL FLASHING AND TRIM

Notes:

DESCRIPTION: This Section specifies an alternative roof system consisting of self-framing truss type roofs. Requirements for these roof systems are more specific than those for typical systems generally specified. When choosing self-framing truss type roofs, use paragraphs so identified throughout this Section. Edit remainder to suit.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and for generally available waste disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Bolting also eliminates the dangerous fumes and gases associated with welding.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 13 34 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13126 - Steel Building Systems in accordance with MasterFormat 1995.


13 34 23 PREFABRICATED BUILDINGS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
088050 - GLAZING
079200 - Joint Sealants

Notes:

DESCRIPTION: This Section specifies performance criteria for prefabricated buildings. For some components, materials and finishes other Sections may be added. Avoid conflicts between specified performance criteria and prescriptive statements in other Sections.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and for generally available waste disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Bolting also eliminates the dangerous fumes and gases associated with welding.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 13 34 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13127 - Prefabricated Buildings in accordance with MasterFormat 1995.


14 12 00 ELECTRIC DUMBWAITERS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


14 20 03 FREIGHT ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for electric and hydraulic freight elevators.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete electric or hydraulic freight elevator system. Materials, operators and systems used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria maybe described in a specially written Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 14 20 03 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 14201 - Freight Elevators in accordance with MasterFormat 1995.


14 20 06 PASSENGER ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for electric and hydraulic passenger elevators.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete electric or hydraulic passenger elevator system.  Materials, operators and systems used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria may be described in a specially written Section. This Section includes a performance specification; do not add manufacturers names or prescriptive specifications.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 14 20 06 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 14202 - Passenger Elevators in accordance with MasterFormat 1995.


14 31 00 ESCALATORS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


14 32 00 MOVING WALKS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


14 42 00 WHEELCHAIR LIFTS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

Ensure that following items are specified in other Sections: 1)Backfilling at cylinder well casing and hydraulic lines between plunger and remote machine room, 2)Masonry enclosed hoistway, 3)Building-in and grouting hoistway door frames and thresholds, 4)Structural steel, hoistway framing and divider beams, overhead hoist or sheave beams, 5)Waterproofing of lift pit, 6)Fireproofing of guide rail brackets where attached to fireproofed structural members, 7)Fire and smoke detectors in hoistway, 8)Electrical service to main disconnect, lift controllers in machine room including emergency power transfer cabinet, 9)Fire alarm signal lines to lift controller cabinet, 10)Empty conduit for telephone line remote from lift machine room or hoistways.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


14 43 19 SUSPENDED POWERED PLATFORMS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


14 43 21 PLATFORM LIFTS - HYDRAULIC

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 05 01 COMMON WORK RESULTS FOR MECHANICAL

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies common work results for Divisions Divisions 21, 22 and 23. Use this Section when multiple discipline mechanical contracts are being Bid or Tendered. If only a single discipline such as Fire Suppression, Plumbing or HVAC are included in the project, use the Common Work Results Section from the appropriate Division.

This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 21 05 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15010 - Mechanical General Requirements in accordance with MasterFormat 1995.


21 05 05 COMMON WORK RESULTS FOR FIRE SUPPRESSION

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies common work results for Division 21 - Common Work Results for Fire Suppression. Use this Section when fire suppression is being Bid or Tendered as the only mechanical subcontracted work. If other mechanical work is included in the contract use Section 21 05 01 - Common Work Results for Mechanical.

This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


21 12 01 STANDPIPE AND HOSE ASSEMBLY

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230519 - METERS AND GAUGES FOR HVAC PIPING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 13 13 WET PIPE SPRINKLER SYSTEMS

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
283100 - FIRE DETECTION AND ALARM
230519 - METERS AND GAUGES FOR HVAC PIPING
260500 - COMMON WORK RESULTS FOR ELECTRICAL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 13 16 DRY PIPE SPRINKLER SYSTEMS

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230519 - METERS AND GAUGES FOR HVAC PIPING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

Pre-action systems employing automatic sprinklers are often used with dry pipe sprinkler systems, either pressurized or non-pressurized. Electrical fire detectors are installed in the same areas as sprinkler heads. Actuation of the fire detection head (operating through the central fire alarm panel) opens the alarm valve of the sprinkler system which permits water to flow into the piping and discharges from any sprinklers which may be open.

Deluge systems employ branches of open type sprinklers attached to mains connected to the water supply through the alarm valve.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21210001 CARBON DIOXIDE EXTINGUISHING SYSTEMS - TOTAL FLOODING
21 21 00.01 CARBON DIOXIDE EXTINGUISHING SYSTEMS - TOTAL FLOODING

Date: 2008/12/31

Related sections:

087100 - DOOR HARDWARE
283100 - FIRE DETECTION AND ALARM
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT

Notes:

DESCRIPTION: This Section specifies the administrative procedures as well as the materials and accessories for a total flooding type carbon dioxide fire extinguishing system.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21210002 CARBON DIOXIDE EXTINGUISHING SYSTEMS - LOCAL APPLICATION
21 21 00.02 CARBON DIOXIDE EXTINGUISHING SYSTEMS - LOCAL APPLICATION

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT

Notes:

DESCRIPTION: This Section specifies the administrative procedures as well as the materials and accessories for a local application type carbon dioxide fire extinguishing system.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 22 00 CLEAN AGENT FIRE EXTINGUISHING SYSTEMS

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

It is necessary to add and co-ordinate specification sections for fire detectors, control equipment, wiring, and checkout of the detection/control portion of the system.

To ensure the successful flooding of an area with a gaseous fire fighting agent requires a complete sealing of the area to contain the clean agent. Co-ordinate this section with other specification sections to provide appropriate specifications for doors, door closures, door seals, dampers, louvers and sealants.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 23 00 WET CHEMICAL FIRE EXTINGUISHING SYSTEMS

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
283100 - FIRE DETECTION AND ALARM
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the administrative procedures, materials, accessories, installation and testing procedures for pre-engineered wet chemical fire protection systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


21 24 00 Dry Chemical Fire Extinguishing Systems

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
283100 - FIRE DETECTION AND ALARM

Notes:

This Section 21 24 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13971 - Pre-engineered Dry Chemical Fire Protection System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the administrative procedures, materials, accessories, installation and testing procedures for pre-engineered dry chemical fire protection systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


21 30 00 FIRE PUMPS

Date: 2009/06/30

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230715 - THERMAL INSULATION FOR PIPING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies packaged fire pumps for use when water pressure serving facility is inadequate.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 05 00 COMMON WORK RESULTS FOR PLUMBING

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies common work results for Division 22 - Plumbing. Use this Section when plumbing is being Bid or Tendered as the only mechanical subcontracted work. If other mechanical work is included in the contract use Section 21 05 01 - Common Work Results for Mechanical.

This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


22 10 10 PLUMBING PUMPS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
221116 - DOMESTIC WATER PIPING
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS

Notes:

DESCRIPTION: This Section specifies the materials and installation of plumbing pumps.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 22 10 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15440 - Plumbing Pumps in accordance with MasterFormat 1995.


22 11 16 DOMESTIC WATER PIPING

Date: 2009/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230505 - INSTALLATION OF PIPEWORK
230501 - USE OF HVAC SYSTEMS DURING CONSTRUCTION
230523
210501 - COMMON WORK RESULTS FOR MECHANICAL
331116 - Site Water Utility Distribution Piping
223113 - RESIDENTIAL DOMESTIC WATER SOFTENERS
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Use this Section for: (1) copper incoming domestic water service, up to NPS 2 1/2, (2) all hard drawn copper domestic hot and cold water services inside building, (3) soft copper tubing inside building, (4) soft copper buried tubing outside building (i.e. between potable water source and meter inside building).

This Section assumes that: (1) buried copper tubing is "soft" in long lengths with no buried joints, (2) copper tubing embedded inside building is "soft", encased in protective conduit.


22 13 17 DRAINAGE WASTE AND VENT PIPING - CAST IRON AND COPPER

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
079200 - Joint Sealants
230501 - USE OF HVAC SYSTEMS DURING CONSTRUCTION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 13 18 DRAINAGE WASTE AND VENT PIPING - PLASTIC

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
079200 - Joint Sealants
230505 - INSTALLATION OF PIPEWORK
017411 - CLEANING

Notes:

For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 15 00 GENERAL SERVICE COMPRESSED AIR SYSTEMS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230516 - EXPANSION FITTINGS AND LOOPS FOR HVAC PIPING
210501 - COMMON WORK RESULTS FOR MECHANICAL
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS

Notes:

DESCRIPTION: This Section specifies piping, fittings, equipment and installation for compressed air systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section 22 15 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15211 - Compressed Air Systems in accordance with MasterFormat 1995.


22 30 05 DOMESTIC WATER HEATERS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
223005 - DOMESTIC WATER HEATERS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230714 - THERMAL INSULATION FOR EQUIPMENT
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies administrative procedures, materials and accessories for electric, gas, fuel oil and steam domestic water heaters and storage tanks as well as some information on installation instructions.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 31 13 RESIDENTIAL DOMESTIC WATER SOFTENERS

Date: 2007/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

Other methods of water conditioning include gas chlorination, filtration, reverse osmosis and deionization to suit project. Consult water treatment specialist.

Specifier to obtain chemical and bacteriological water sample analysis on which the project specification is to be based. Specify equipment and material to meet the "Guidelines for Canadian Drinking Water Quality" published by Health Canada.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 31 16 COMMERCIAL DOMESTIC WATER SOFTENING

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies manual and automatic water softeners, their components and installation.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 42 01 PLUMBING SPECIALTIES AND ACCESSORIES

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013217
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS

Notes:

DESCRIPTION: This Section specifies plumbing specialties and accessories.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 22 42 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15401 - Plumbing Specialties and Accessories in accordance with MasterFormat 1995.


22 42 03 COMMERCIAL WASHROOM FIXTURES

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 42 16 COMMERCIAL LAVATORIES AND SINKS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 42 20 COMMERCIAL SHOWERS AND BATHTUBS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


22 47 00 DRINKING FOUNTAINS AND WATER COOLERS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 01 31 AIR DUCT CLEANING FOR HVAC SYSTEMS

Date: 2009/06/30

Related sections:

013529
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section contains information on cleaning HVAC air duct systems and related equipment and components in existing facilities including the use of antimicrobial agents and coatings.

Although cleaning of air ducts has a positive affect on Indoor Air Quality (IAQ), there is no credit given for this directly in any of the CaGBC LEED Rating Systems.  LEED for Existing Buildings does take into consideration the types of cleaning solutions used in building maintenance.

If there is a suspicion that hazardous or toxic materials may be found in the HVAC System, a full environmental assessment of the HVAC System should be carried out prior to any contract being awarded for HVAC System cleaning.


23 05 00 COMMON WORK RESULTS FOR HVAC

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies common work results for Division 23 - Heating, Ventilation and Air Conditioning. Use this Section when HVAC is being Bid or Tendered as the only mechanical subcontracted work. If other mechanical work is included in the contract use Section 21 05 01 - Common Work Results for Mechanical.

This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


23 05 01 USE OF HVAC SYSTEMS DURING CONSTRUCTION

Date: 2005/09/30

Related sections:

Notes:

DESCRIPTION: This Section specifies the use of mechanical systems during construction and should be read in conjunction with the appropriate Division 1 sections.

This Section 23 05 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15054 - Use of Mechanical Systems During Construction in accordance with MasterFormat 1995.


23 05 05 INSTALLATION OF PIPEWORK

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 05 13 COMMON MOTOR REQUIREMENTS FOR HVAC EQUIPMENT

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014500 - QUALITY CONTROL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

Starters, motor protection devices, and manual control devices are specified in Division 26 sections and indicated on the electrical drawings.

This Section is applicable to packaged equipment. Include full specification for motors.

This Section 23 05 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15053 - Motors, Drives and Guards for Mechanical Systems in accordance with MasterFormat 1995.


23 05 16 EXPANSION FITTINGS AND LOOPS FOR HVAC PIPING

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 05 17 PIPE WELDING

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: Use this Section for pressure pipe line welding.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 05 19 METERS AND GAUGES FOR HVAC PIPING

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and components for metering steam and chilled/hot water including installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section has been written in the form of a performance type specification in which many of the components are specified in general terms only.

This Section 23 05 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15121 - Fluid Flow and Energy Metering in accordance with MasterFormat 1995.


23051901 THERMOMETERS AND PRESSURE GAUGES - PIPING SYSTEMS
23 05 19.01 THERMOMETERS AND PRESSURE GAUGES - PIPING SYSTEMS

Date: 2004/12/31

Related sections:

013529
230553

Notes:

This Section 23 05 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15122 - Thermometers and Pressure Gauges - Piping Systems in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: For sustainable requirements for this Section related to the Concept Design, Construction, Verification and Operation, co-ordinate with Section 21 05 01 - Common Work Results for Mechanical or Section 23 05 53.01 - Mechanical Identification.


23052301 VALVES - BRONZE
23 05 23.01 VALVES - BRONZE

Date: 2009/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section has been developed as a reference section.  The intention is that in the relevant technical section under the paragraph for bronze gate valves (for example) the following wording (or similar) would be used: Gate valves NPS 2 and under in Mechanical Rooms: Bronze, rising stem, (solid) (split wedge) disc, (screwed) (union) bonnet, Class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze. Or Gate valves NPS 2 and under elsewhere: Bronze, non-rising stem, (solid) (split wedge) disc, (screwed) (union) bonnet Class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze. Similarly, in the paragraph for globe valves, the following (or similar) wording would be used: Globe valves NPS 2 and under: Bronze, renewable (composition) (plug) disc and seat, (screwed) (union) bonnet, class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23052302 VALVES - CAST IRON
23 05 23.02 VALVES - CAST IRON

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
23052303 - VALVES - CAST STEEL
017411 - CLEANING

Notes:

This Section has been developed as a reference section. The intention is that the relevant technical section will specify the valve in sufficient detail, making reference to the Section number 23 05 23.02 only. Thus, under the paragraph for cast iron gate valves (for example) the following wording (or similar) would be used: Gate valves NPS 2 ½  - 8, in Mechanical Rooms: Cast iron, (inside rising stem) (0S&Y), (bronze) trim, (you will have to select disc construction and material from this specification), multiple-bolted bonnet for taps and drains, Class 125, flanged ends (with 2 mm raised face with serrated finish); operators. In accordance to Section 23 05 23.02 - Valves - Cast Iron. Or NPS 10 - 24 non-rising stem in Mechanical Rooms and elsewhere: Cast iron, non-rising stem, (bronze) (iron) trim, (you will have to select disc construction and material from this specification), multiple-bolted bonnet for taps and drains, Class 125, flanged ends (with 2 mm raised face with serrated finish); Operators. All to Section 23 05 23.02 - Valves - Cast Iron.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23052303 VALVES - CAST STEEL
23 05 23.03 VALVES - CAST STEEL

Date: 2004/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 23 05 24 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15113 - Valves - Cast Steel in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

This section to be used as a reference section whereby the technical section will identify the valve by Section and paragraph number.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification


23052304 VALVES - LUBRICATED PLUG
23 05 23.04 VALVES - LUBRICATED PLUG

Date: 2004/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 23 05 25 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15114 - Valves - Lubricated Plug in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

This Section to be used as a reference section whereby the technical section will identify the valve by Section and paragraph number.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


23052305 BUTTERFLY VALVES
23 05 23.05 BUTTERFLY VALVES

Date: 2009/06/30

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section has been developed as a reference section. The intention is that in the relevant technical section under the paragraph for bronze gate valves (for example) the following wording (or similar) would be used: gate valves NPS 2 and under in Mechanical Rooms: bronze, rising stem, (solid) (split wedge) disc, (screwed) (union) bonnet, Class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze. Or gate valves NPS 2 and under elsewhere: bronze, non-rising stem, (solid) (split wedge) disc, (screwed) (union) bonnet Class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze. Similarly, in the paragraph for globe valves, the following (or similar) wording would be used: globe valves NPS 2 and under: bronze, renewable (composition) (plug) disc and seat, (screwed)  (union) bonnet, class (125) (150), (screwed) (solder) ends, to Section 23 05 23.01 - Valves - Bronze.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 05 29 HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
055000 - METAL FABRICATIONS
033000 - CAST-IN-PLACE CONCRETE
014500 - QUALITY CONTROL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies concrete housekeeping pads, hangers and supports for mechanical piping, ducting and equipment. This Section does not include seismic restraint.

Departmental Representative/DCC Representative/Consultant is to design hanger system for thermal pipe expansion and show location of both spring and roller hangers on drawings.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 05 33 HEAT TRACING FOR HVAC PIPING AND TANKS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies heat tracing cables for pipes and tanks including controls and installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section is based on assumption that system voltage, cable wattage, cable length, cold lead cable length and size, layout of cables for pipe or tank tracing will be indicated (straight line, spiralling, etc). For tracing of large pipes, indicate isometric layout.

Heating cables based on CSA C22.2 No.130.1 and/or C22.2 No.130.2.

This Section 23 05 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15705 - Heating Cables - Pipe/Tank Tracing in accordance with MasterFormat 1995.


23 05 48 VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
033000 - CAST-IN-PLACE CONCRETE
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies vibration isolation materials and components, seismic control measures and their installation

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 05 48 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15072 - Vibration Isolation and Seismic Control Measures in accordance with MasterFormat 1995.


23054901 SEISMIC RESTRAINT SYSTEMS (SRS) - TYPE P2 BUILDINGS
23 05 49.01 SEISMIC RESTRAINT SYSTEMS (SRS) - TYPE P2 BUILDINGS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This  Section specifies seismic restraint systems for all statically supported and vibration isolated equipment and systems. In addition to all mechanical, this includes laboratory fume hoods, BSC's, incinerators, kitchen equipment, electrical light fixtures, transformers, MCC's, UPS, diesel generators, standby power, fire protection.

Add following wording in all relevant Divisions and sections: "Supports and anchor bolts to withstand seismic events as specified in Section 23 05 49.01 - Seismic Restraint Systems: Type P2 Buildings".

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 05 49.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15071 - Seismic Restraint Systems (SRS) - Type P2 Buildings in accordance with MasterFormat 1995.


23055301 MECHANICAL IDENTIFICATION
23 05 53.01 MECHANICAL IDENTIFICATION

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
099123 - INTERIOR PAINTING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and requirements for the identification of piping systems, duct work, valves and controllers, including the installation and location of identification systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 05 53.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15075 - Mechanical Identification in accordance with MasterFormat 1995.


23 05 93 TESTING, ADJUSTING AND BALANCING FOR HVAC

Date: 2005/12/31

Related sections:

Notes:

DESCRIPTION: This Section specifies information on testing, adjusting and balancing of heating, ventilating and air conditioning systems. It does not include commissioning of these systems.

ENVIRONMENTAL: The Canadian Standards Association (CSA) has developed a standard, Z204, for managing indoor air quality in office buildings.  This Guideline defines acceptable indoor IAQ and provides methods to help achieve acceptable indoor air quality in office buildings, throughout the conception, design, construction, commissioning, operation, and maintenance stages. This guideline applies to public and a private-sector building used primarily for office functions and is intended to deal with contaminants normally found in these environments.

ENVIRONMENTAL: The American Society of Heating, Refrigerating, and Air Conditioning Engineers (ASHRAE) published its 'Standard 62: Ventilation for Acceptable Indoor Air Quality'. This standard provides for minimum ventilation rates and indoor air quality that will be acceptable to human occupants and are intended to avoid adverse health effects.  This standard applies to all types of facilities.  The specified rates at which outdoor air must be supplied to each room within the facility range from 15 to 60 cfm/person, depending on the activities that normally occur in that room.

Performance tests, pressure tests and leakage tests for each item of equipment must be specified in applicable sections of Division 23.

This Section 23 05 93 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15950 - Testing, Adjusting and Balancing (TAB) of Mechanical Systems in accordance with MasterFormat 1995.


23 05 94 PRESSURE TESTING OF DUCTED AIR SYSTEMS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013216
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies pressure testing of ducts over 5 m in length, forming part of a supply, return or exhaust ductwork system directly or indirectly connected to air handling equipment.

This Section specifies sustainable requirements related to the Construction and Verification.

Leakage testing may be essential for proper achievement and maintenance of design criteria and design intents. The designer must select and specify the systems to be tested, the proper duct construction class and sealing procedures.

Drawings and specifications must clearly identify different duct pressure classifications.

Leakage testing is included in AABC and SMACNA manual but not in NEBB Manual.

This Section 23 05 94 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15814 - Pressure Testing of Ducted Air Systems in accordance with MasterFormat 1995.


23 07 13 DUCT INSULATION

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
017411 - CLEANING

Notes:

DESCRIPTION: This Section describes Thermal Insulation for ductwork and ductwork accessories in a commercial type application. It does not include insulation for ductwork in an industrial process type application.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 07 14 THERMAL INSULATION FOR EQUIPMENT

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies fire suppression equipment insulation in a commercial type application. It does not include insulation for equipment in an industrial process type application.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 07 15 THERMAL INSULATION FOR PIPING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
079210
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies Thermal Insulation for piping and piping accessories in a commercial type application. It does not include insulation for piping in an industrial process type application.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 07 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15081 - Thermal Insulation for Piping in accordance with MasterFormat 1995.


23 08 01 PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS

Date: 2005/12/31

Related sections:

230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
264200 - CATHODIC PROTECTION
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
224200

Notes:

This Section 23 08 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15970 - Performance Verification Mechanical Piping Systems in accordance with MasterFormat 1995.


23 08 02 CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
232500 - HVAC WATER TREATMENT SYSTEMS
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the procedures and cleaning solutions for cleaning mechanical piping systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 08 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15095 - Cleaning and Start-up of Mechanical Piping Systems in accordance with MasterFormat 1995.


23 09 33 ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies materials and installation procedures for electric heating and cooling controls.

ENVIRONMENTAL: Energy management strategies are best when they: are capable of being operated and maintained simply, efficiently and effectively; have a greater number of HVAC zones; provide for setback of temperature during unoccupied hours; are designed for optimal heat-up and cool-down strategies; are accompanied by individual meters or sub-meters; and, provide feedback to the users and management on building energy.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section is based on assumption that system voltages, capacity and location of controls will be indicated on drawings. This specification covers electrical control devices for heating and cooling in excess of 50 V except for low voltage thermostats used for electric heating.

Controls based on CSA C22.2 No. 24.

This Section 23 09 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15916 - Electric Heating and Cooling Controls in accordance with MasterFormat 1995.


23 09 43 PNEUMATIC CONTROL SYSTEM FOR HVAC

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
233315 - DAMPERS - OPERATING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies pneumatic control components for a typical commercial building specification.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 09 43 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15920 - Pneumatic Controls in accordance with MasterFormat 1995.


23 10 01 SERVICE GARAGE SYSTEMS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
221500 - GENERAL SERVICE COMPRESSED AIR SYSTEMS
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the typical components associated with the operation of a service garage including compressed air systems, inflators, air outlets, industrial lubricating systems, waste oil receiver and storage systems, hoist trolley, gasoline and diesel storage tanks, piping and dispensers, and the installation of these components.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 10 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15201 - Service Garage Systems in accordance with MasterFormat 1995.


23 11 13 FACILITY FUEL-OIL PIPING

Date: 2009/12/31

Related sections:

013216
013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
230523
264200 - CATHODIC PROTECTION
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the supply and installation of fuel oil piping from oil tanks to stationary and portable oil-burning equipment and appliances.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 11 23 FACILITY NATURAL GAS PIPING

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
230501 - USE OF HVAC SYSTEMS DURING CONSTRUCTION
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS

Notes:

DESCRIPTION: This Section specifies piping, valves and fittings, installation and testing for gas fired equipment.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section is based on service from outlet of gas meter or propane storage tank into building.

This Section 23 11 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15192 - Piping, Valves and Fittings - Gas in accordance with MasterFormat 1995.


23 11 26 FACILITY LIQUID-PETROLEUM GAS PIPING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
210501 - COMMON WORK RESULTS FOR MECHANICAL
230553
230519 - METERS AND GAUGES FOR HVAC PIPING
013543 - ENVIRONMENTAL PROCEDURES
312333
230517 - PIPE WELDING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the steel and FRP materials, components and installation for the outdoor and indoor distribution systems for petroleum products.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

See Section 33 65 26 - Telethermics Insulated and Plastic Jacketted Systems for specifications for factory fabricated, insulated and jacketted systems.

Specifier to review the new Canadian Environmental Protection Act guidelines on secondary containment in piping which have not received official federal endorsement at the time of this review for update.

This Section 23 11 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15193 - Petroleum Products Distribution System - Steel and FRP in accordance with MasterFormat 1995.


23 20 13 HIGH PRESSURE PIPING SYSTEMS INSIDE BUILDINGS AND CHC PLANTS

Date: 2009/12/31

Related sections:

013529
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
078400 - FIRE STOPPING
230517 - PIPE WELDING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
230553

Notes:

For campus type high temperature hot water, high pressure steam, high pressure chilled water (i.e. "Telethermics") distribution piping systems between central heating plants and various buildings, refer to "Telethermics" group of specifications (NMS Sections 33 65 13 through 33 65 46).

Co-ordinate and include text as required from the following specification sections (apart from Division 1 sections) to ensure a complete document 01 91 13 - General Commissioning (Cx) Requirements, 07 84 00 - Firestopping, 21 05 01 - Common Work Results for Mechanical, 23 05 17 - Pipe Welding, 23 05 29 - Hangers and Supports for HVAC Piping and Equipment, 23 05 53.01 - Mechanical Identification, 23 05 93 - Testing, Adjusting and Balancing for HVAC (when HP Distribution Piping Systems include Hot Water Heating Systems).

Specs for Pumped Condensate mains are the same as for 150 psig (1034 kPa) steam except that piping is schedule 80.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23211301 HYDRONIC SYSTEMS: COPPER
23 21 13.01 HYDRONIC SYSTEMS: COPPER

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230523
230517 - PIPE WELDING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section intended for hot water heating, glycol, condenser and chilled water systems, temperature range 5 degrees C to 120 degrees C and 860 kPa working pressure.

This Section 23 21 13.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15182 - Hydronic Systems: Copper in accordance with MasterFormat 1995.


23211302 HYDRONIC SYSTEMS: STEEL
23 21 13.02 HYDRONIC SYSTEMS: STEEL

Date: 2004/09/30

Related sections:

230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
230501 - USE OF HVAC SYSTEMS DURING CONSTRUCTION
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
013300 - SUBMITTAL PROCEDURES
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230523
230517 - PIPE WELDING
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC

Notes:

This Section 23 21 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15183 - Hydronic Systems: Steel in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification, co-ordinate with Section 23 08 02 Cleaning and Start-Up of Mechanical Piping Systems, Section 23 05 01 - Installation of pipework and Section 23 08 01 - Performance Verification Mechanical Piping systems.

This Section specifies steel piping valves and fittings for hydronic systems.

This Section intended for hot water heating, glycol, condenser and chilled water systems, temperature range 5 degrees C to 120 degrees C and 860 kPa working pressure.


23211303 PRESS JOINT PIPING SYSTEMS HYDRONIC SYSTEMS
23 21 13.03 PRESS JOINT PIPING SYSTEMS HYDRONIC SYSTEMS

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
230523
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
210501 - COMMON WORK RESULTS FOR MECHANICAL
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

There are environmental and health concerns related to the use of glycol particularly during storage, handling and dispose.  Of the two main types of glycol used, propylene glycol appears to be more environmental friendly than ethylene glycol. However, propylene glycol is more viscous than ethylene glycol, therefore requiring greater pump energy to circulate through a piping system. The alternative options to using glycol as suggested, relate to piping configurations at hydronic coils and the use of small circulating pumps to ensure continuous flow of water through the coils in order to avoid freeze up.

This Section may be used in lieu of Sch. 40 pipe with threaded fittings or copper tube with solder type fittings.

This Section intended for hot water heating, glycol, condenser and chilled water systems, temperature range 5 degrees C to 120 degrees C and 860 kPa pressure, ASTM A 53 Sch. 5 pipe, sizes up to NPS2.


23 21 14 HYDRONIC SPECIALTIES

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 21 23 HYDRONIC PUMPS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 22 13 STEAM AND CONDENSATE HEATING PIPING

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230523
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
238413 - HUMIDIFIERS
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
017411 - CLEANING

Notes:

This Section is intended for steam up to 860 kPa and condensate return piping. Specifier to note that this section specifies steel piping and fittings for condensate.

For steam distribution systems above 860 kPa, see Section 33 65 13 - Telethermics - Distribution Piping - Steel.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 22 14 STEAM SPECIALTIES

Date: 2008/12/31

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230801 - PERFORMANCE VERIFICATION MECHANICAL PIPING SYSTEMS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 22 23 STEAM CONDENSATE PUMPS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 23 00 REFRIGERANT PIPING

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230501 - USE OF HVAC SYSTEMS DURING CONSTRUCTION

Notes:

DESCRIPTION: This Section specifies copper tubing and fittings for refrigerant along with installation, charging and testing.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section is primarily for simple refrigeration piping interconnections such as between HVAC equipment. For complex refrigeration systems refer to Section 42 20 00 - Process Cooling Equipment.

This Section 23 23 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15187 - Copper Tubing and Fittings Refrigerant in accordance with MasterFormat 1995.


23 25 00 HVAC WATER TREATMENT SYSTEMS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
224216 - COMMERCIAL LAVATORIES AND SINKS
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, components, equipment and chemicals for the installation of a complete HVAC water treatment system.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 25 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15188 - HVAC Water Treatment Systems in accordance with MasterFormat 1995.


23311301 METAL DUCTS - LOW PRESSURE TO 500 PA
23 31 13.01 METAL DUCTS - LOW PRESSURE TO 500 PA

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
234100
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
230594 - PRESSURE TESTING OF DUCTED AIR SYSTEMS

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE:  This Section specifies sustainable requirements related to the Construction and Verification.

This Section 23 31 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15811 - Ductwork - Low Pressure Metallic to 500 Pa in accordance with MasterFormat 1995.


23311302 METAL DUCTS - HIGH PRESSURE TO 2500 PA
23 31 13.02 METAL DUCTS - HIGH PRESSURE TO 2500 PA

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
230594 - PRESSURE TESTING OF DUCTED AIR SYSTEMS

Notes:

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 31 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15812 - Ductwork - High Pressure Metallic to 2500 Pa in accordance with MasterFormat 1995.


23 32 48 ACOUSTICAL AIR PLENUMS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230593 - TESTING, ADJUSTING AND BALANCING FOR HVAC
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies materials and performance criteria for sound attenuation for mechanical systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 32 48 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15825 - Sound Attenuation in accordance with MasterFormat 1995.


23 33 00 AIR DUCT ACCESSORIES

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the materials and installation for duct accessories including flexible connections, access doors, vanes and collars.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section 23 33 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15820 - Duct Accessories in accordance with MasterFormat 1995.


23 33 14 DAMPERS - BALANCING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies balancing dampers for mechanical forced air ventilation and air conditioning systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 33 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15821 - Dampers - Balancing in accordance with MasterFormat 1995.


23 33 15 DAMPERS - OPERATING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230943 - PNEUMATIC CONTROL SYSTEM FOR HVAC
233300 - AIR DUCT ACCESSORIES
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies operating dampers for mechanical forced air ventilation and air conditioning systems which are not specified in Section 23 09 43 - Pneumatic Control System for HVAC.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 33 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15822 - Dampers - Operating in accordance with MasterFormat 1995.


23 33 16 DAMPERS - FIRE AND SMOKE

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
233300 - AIR DUCT ACCESSORIES
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes Fire and Smoke Dampers, and Fire Stop Flaps.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 33 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15823 - Dampers - Fire and Smoke in accordance with MasterFormat 1995.


23 33 46 FLEXIBLE DUCTS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013300 - SUBMITTAL PROCEDURES
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including reuse and recyclingoptions, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 33 46 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15813 - Flexible Ductwork in accordance with MasterFormat 1995.


23 33 53 DUCT LINERS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
013529
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION

Notes:

SUPPORT: This Section has been reviewed and updated with the assistance of PWGSC/RPS/AES/Buildings Directorate staff.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.

This Section 23 33 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15084 - Acoustic Duct Lining in accordance with MasterFormat 1995.


23 34 00 HVAC FANS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230513 - COMMON MOTOR REQUIREMENTS FOR HVAC EQUIPMENT
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
233300 - AIR DUCT ACCESSORIES
237310 - AIR HANDLING - BUILT-UP
237311 - AIR HANDLING UNITS - PACKAGED
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes fans, motors, accessories and hardware for commercial use.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 34 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15831 - Commercial Fans in accordance with MasterFormat 1995.


23 34 24 DOMESTIC FANS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies fans, window ventilators, exterior, wall and ceiling mounted discharge fans for domestic use.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 34 24 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15832 - Domestic Fans in accordance with MasterFormat 1995.


23 34 25 PACKAGED ROOF AND WALL EXHAUSTERS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies roof and wall exhausters.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 34 25 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15833 - Packaged Roof and Wall Exhausters in accordance with MasterFormat 1995.


23 35 16 ENGINE EXHAUST SYSTEMS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 36 00 AIR TERMINAL UNITS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies variable volume boxes, constant volume bypass, and fan powered and electronic variable air volume boxes.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 36 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15840 - Air Terminal Units in accordance with MasterFormat 1995.


23 37 13 DIFFUSERS, REGISTERS AND GRILLES

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies supply, return and exhaust grilles and registers, diffusers and linear grilles, for commercial and residential use.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

Specifier to co-ordinate with Section 08 90 00 - Louvres and Vents, to ensure design free areas are specified.

This Section 23 37 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15852 - Grilles, Registers and Diffusers in accordance with MasterFormat 1995.


23 37 20 LOUVRES, INTAKES AND VENTS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
099113 - EXTERIOR PAINTING
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies administrative procedures, materials, accessories and installation procedures for mechanical louvres, intakes and vents. It also includes reinforcement and bracing for air vents, intakes and gooseneck hoods for wind speed, in accordance with NBC for location. This Section does not include architectural louvres and vents; refer to Section 08 09 00 - Louvres and Vents for specification information.

Ventilation systems should be designed to meet or exceed those specified in MD 15000 standards.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 37 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15851 - Louvres, Intakes and Vents in accordance with MasterFormat 1995.


23 38 13 COMMERCIAL KITCHEN HOODS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
234400 - HVAC AIR FILTRATION
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 38 17 PERCHLORIC ACID FUME HOOD AND EXHAUST SYSTEM - STAINLESS STEEL

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230553
230713 - DUCT INSULATION
017100 - EXAMINATION AND PREPARATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies stainless steel perchloric acid fume hoods, ductwork and performance test procedure.

Private sector to use with caution. Specifications are based on PWGSC Standards and Guidelines No. MD 15128, Appendix A, for Perchloric Acid Fume Hoods which contains the following quotes: "When hot perchloric acid fumes contact many metals, they will react to form metal perchlorates. These are the crystalline compounds which will explode with little provocation." "Perchloric acid in vapour form has no effect on PVC, PP, PE, PTFE and a number of other plastics. Consequently, provided that the exhaust system is 100% plastic construction and has no crevices or places where perchloric acid or perchlorate salts can accumulate, dangerous conditions will not occur." "Duct shafts or shafts containing plastic ducting must be protected by automatic sprinklers".

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 38 18 PERCHLORIC ACID FUME HOOD AND EXHAUST SYSTEM - PLASTIC

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
079200 - Joint Sealants
017100 - EXAMINATION AND PREPARATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and components for the plastic perchloric acid fume hoods, ductwork, fume hood and ductwork installation.

With appropriate changes to neutralizing solution, this specification may be used for other specialized applications.

Private sector to use with caution. Specifications are based on PWGSC Standards and Guidelines No. MD 15128, Appendix A, for Perchloric Acid Fume Hoods which contains the following quotes: "When hot perchloric acid fumes contact many metals, they will react to form metal perchlorates. These are the crystalline compounds which will explode with little provocation." "Perchloric acid in vapour form has no effect on PVC, PP, PE, PTFE and a number of other plastics. Consequently, provided that the exhaust system is 100% plastic construction and has no crevices or places where perchloric acid or perchlorate salts can accumulate, dangerous conditions will not occur." "Duct shafts or shafts containing plastic ducting must be protected by automatic sprinklers".

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 44 00 HVAC AIR FILTRATION

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies filters and filter gauges for various types of mechanical air handling equipment.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 44 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15861 - Filters and Filter Gauges in accordance with MasterFormat 1995.


23 51 00 BREECHING, CHIMNEYS AND STACKS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
033000 - CAST-IN-PLACE CONCRETE
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, accessories and installation for breechings, chimneys and stacks.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 51 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15551 - Breeching and Chimneys in accordance with MasterFormat 1995.


23 52 00 HEATING BOILERS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies heating boiler units including fire tube, cast iron, coil tube hot water, electric, steam boilers, gas or oil burners their installation and commissioning.

ENVIRONMENTAL: The Federal Government has implemented energy efficiency standards for some heating and other energy consuming appliances and products.  Some provincial governments have introduced energy efficiency standards and other provinces have stated their intention to follow. Once these standards are in place, low efficiency models that do not meet the standard will no longer be allowed on the market in that particular jurisdiction.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 52 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15510 - Packaged Boilers in accordance with MasterFormat 1995.


23 54 13 ELECTRIC-RESISTANCE FURNACES

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and components for electric-resistance furnaces.

ENVIRONMENTAL: The Federal Government has implemented energy efficiency standards for some heating and other energy consuming appliances and products.  Some provincial governments have introduced energy efficiency standards and other provinces have stated their intention to follow. Once these standards are in place, low efficiency models that do not meet the standard will no longer be allowed on the market in that particular jurisdiction.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This specification is based on assumption that location of unit, kW and HP ratings, voltage and phase, plenum opening m³ /s capacity will be indicated.

Electric forced air furnace based on CSA C22.2 No .46.

This Section 23 54 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15532 - Electric Forced Air Furnaces in accordance with MasterFormat 1995.


23 54 16 FUEL-FIRED FURNACES

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
238413 - HUMIDIFIERS
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 55 01 DUCT HEATERS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013543 - ENVIRONMENTAL PROCEDURES
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Specification is based on assumption that quantities, wattage, voltage, phase, number of stages, size, built-in controls, terminal end location, operating air flow, mounting arrangement and types of duct heaters will be indicated.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 55 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15824 - Duct Heaters in accordance with MasterFormat 1995.


23561301 HEATING SOLAR FLAT PLATE COLLECTORS
23 56 13.01 HEATING SOLAR FLAT PLATE COLLECTORS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
055000 - METAL FABRICATIONS
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 57 00 HEAT EXCHANGERS FOR HVAC

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and installation for heat exchangers and accessories.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 64 13 ABSORPTION WATER CHILLERS

Date: 2010/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 64 16 CENTRIFUGAL WATER CHILLERS

Date: 2010/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 64 19 RECIPROCATING WATER CHILLERS

Date: 2010/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
232300 - REFRIGERANT PIPING
230715 - THERMAL INSULATION FOR PIPING
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 64 26 ROTARY-SCREW WATER CHILLERS

Date: 2010/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 65 10 CONDENSERS, COOLERS AND COOLING TOWERS

Date: 2005/12/31

Related sections:

230549
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017419
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
033000 - CAST-IN-PLACE CONCRETE
232123 - HYDRONIC PUMPS
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, components, framing, installation and testing for evaporative condensers, closed circuit coolers and cooling towers.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 65 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15661 - Evaporative Condensers/Closed Circuit Coolers/Cooling Towers in accordance with MasterFormat 1995.


23 65 16 NATURAL DRAFT COOLING TOWERS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 72 00 AIR-TO-AIR ENERGY RECOVERY EQUIPMENT

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
233300 - AIR DUCT ACCESSORIES
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, components and installation for air-to-air energy recovery equipment.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 72 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15781 - Heat Reclaim Devices in accordance with MasterFormat 1995.


23 73 10 AIR HANDLING - BUILT-UP

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
233400 - HVAC FANS
230714 - THERMAL INSULATION FOR EQUIPMENT
233315 - DAMPERS - OPERATING
234400 - HVAC AIR FILTRATION
233300 - AIR DUCT ACCESSORIES
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 73 11 AIR HANDLING UNITS - PACKAGED

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
233300 - AIR DUCT ACCESSORIES
230548 - VIBRATION AND SEISMIC CONTROLS FOR HVAC PIPING AND EQUIPMENT
234400 - HVAC AIR FILTRATION
233315 - DAMPERS - OPERATING
238413 - HUMIDIFIERS
017411 - CLEANING

Notes:

DESCRIPTION: This section does not include built up air handling units. Built up air handling units can be found in section 23 73 10 - Air Handling - Built-up.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


23 74 00 PACKAGED OUTDOOR HVAC EQUIPMENT

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
237400 - PACKAGED OUTDOOR HVAC EQUIPMENT
230802 - CLEANING AND START-UP OF MECHANICAL PIPING SYSTEMS
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS

Notes:

DESCRIPTION: This Section specifies the materials and installation for self-contained multizone and single zone, gas, electric, hot water and refrigeration packaged rooftop HVAC units.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section specifies sustainable requirements related to the Construction and Verification.

This Section 23 74 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15732 - Packaged Rooftop HVAC Units in accordance with MasterFormat 1995.


23 81 23 Computer Room Air Conditioning

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017419

Notes:

This Section 23 81 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15731 - Computer Room Air Conditioning System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies cabinets, plenums, fans, compressors, coils, filters, condensers and controls including piping, valves, fittings and accessories and their installation for a complete computer room air conditioning system.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: CFC based refrigerants have been associated with the depletion of the ozone layer.  The specification of equipment that operates on these refrigerants should be avoided use should be avoided.  Equipment operating with HCFC based refrigerants are preferred to CFC based products.  HFC based refrigerants have an even lower environmental impact and should be specified when ever possible.  Specifier to ensure that refrigerant is not a CFC listed in the Canadian Environmental Protection Act (CEPA). Environment Canada has published details of approved alternative refrigerants.


23 81 40 Air and Water Source Unitary Heat Pumps

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
232300 - REFRIGERANT PIPING

Notes:

This Section 23 81 40 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15740 - Heat Pumps in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the general administrative procedures as well as materials, accessories and installation procedures for both water and air source heat pumps.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: CFC based refrigerants have been associated with the depletion of the ozone layer. The specification of equipment that operates on these refrigerants should be avoided use should be avoided. Equipment operating with HCFC based refrigerants are preferred to CFC based products.  HFC based refrigerants have an even lower environmental impact and should be specified when ever possible.  Specifier to ensure that refrigerant is not a CFC listed in the Canadian Environmental Protection Act (CEPA). Environment Canada has published details of approved alternative refrigerants.

Refer to Section 23 23 00 - Copper Tubing and Fittings Refrigerant, for refrigeration piping if not specified herein.


23 82 19 FAN COIL UNITS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and installation for fan coil units.

ENVIRONMENTAL: The Federal Government has implemented energy efficiency standards for some heating and other energy consuming appliances and products.  Some provincial governments have introduced energy efficiency standards and other provinces have stated their intention to follow. Once these standards are in place, low efficiency models that do not meet the standard will no longer be allowed on the market in that particular jurisdiction.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section is based on assumption that voltage, phase, kW capacities, and location of heaters will be indicated.

Heaters based on CSA C22. No. 46.

This Section 23 82 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15701 - Forced Air Console Unit in accordance with MasterFormat 1995.


23 82 20 FORCED AIR HEATERS

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

Notes:

This Section 23 82 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15702 - Forced Air Heaters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies ceiling and wall mounted electric forced air heaters.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

This Section is based on  the assumption that heater quantities, location, voltage, phase, capacities, control characteristics and location, mounting (surface or flush), speed (single or dual) will be indicated.

Heaters based on CSA C22.2 No.46.


23 82 21 INCREMENTAL HEATING AND COOLING UNITS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013216
135290

Notes:

DESCRIPTION: This Section specifies electric incremental heating and cooling units, accessories and installation procedures.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

This Section specifies sustainable requirements related to the Construction and Verification.

This specification is based on assumption that system voltage, wattage, phase, unit type location and schedule listing heating kW, cooling kW, and air volume in m³ /s will be indicated. This specification covers self-contained through-the-wall combination electric heating and air-conditioning units requiring electrical connection only.

This Section 23 82 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15703 - Incremental Heating and Cooling Units in accordance with MasterFormat 1995.


23 82 23 Unit Ventilators

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 23 82 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15767 - Unit Ventilators in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies self-contained and through the wall unit ventilators and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: If this Section is being used to specify new unit ventilators to replace existing units, ensure that provisions are made within this section for either the reuse, recycling or rebuilding of these unit ventilators.


23823301 Residential Convectors
23 82 33.01 Residential Convectors

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

Notes:

This Section 23 82 34 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15763 - Baseboard Convectors Residential in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies baseboard convectors for residential use and their controls and installation.  This specification is based on assumption that quantities, voltage, wattage, length of units and control characteristics, thermostats, relays, are indicated. Baseboard convectors based on CSA C22.2 No.46.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: If this Section is being used to specify new baseboard convectors to replace existing convectors, ensure that provisions are made within this section for either the reuse, recycling or rebuilding of these convector units.


23823302 Commercial Convectors
23 82 33.02 Commercial Convectors

Date: 2003/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

Notes:

This Section 23 82 35 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15764 - Baseboard Convectors Commercial in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies baseboard convectors for commercial use and their controls and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: If this Section is being used to specify new baseboard convectors to replace existing convectors, ensure that provisions are made within this section for either the reuse, recycling or rebuilding of these convector units.

This Section is based on assumption that quantities, voltage, wattage, length of units and controls, thermostats, relays, will be indicated.

Baseboard convectors based on CSA C22.2 No.46.


23823303 CABINET CONVECTOR HEATERS
23 82 33.03 CABINET CONVECTOR HEATERS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies cabinet convector heaters and their controls and installation.  This Specification is based on assumption that quantities, voltage, capacities, mounting (surface/flush/semi-recessed/floor) and layout will be indicated. Heaters based on CSA C22.2 No.46.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 82 37 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15769 - Cabinet Convector Heaters in accordance with MasterFormat 1995.


23 82 36 FINNED TUBE RADIATION HEATERS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies base board and finned tube radiation, and cabinet convectors including installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 82 36 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15762 - Convectors and Finned Tube Radiation in accordance with MasterFormat 1995.


23 82 39 UNIT HEATERS

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 23 82 39 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15765 - Unit Heaters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies cabinet, horizontal, vertical and revolving discharge unit heaters and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: If this Section is being used to specify new unit heaters to replace existing unit heaters, ensure that provisions are made within this section for either the reuse, recycling or rebuilding of these unit heaters.


23823901 UNIT HEATERS - ELECTRIC
23 82 39.01 UNIT HEATERS - ELECTRIC

Date: 2003/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230933 - ELECTRIC AND ELECTRONIC CONTROL SYSTEM FOR HVAC

Notes:

This Section 23 82 40 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15766 - Unit Heaters - Electric in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies electric unit heaters and their controls and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: If this Section is being used to specify new unit heaters to replace existing unit heaters, ensure that provisions are made within this section for either the reuse, recycling or rebuilding of these unit heaters.

This specification is based on assumption that quantities, voltage, wattage, cubic metres per second of units and controls, thermostats, relays and mounting details will be indicated.

Heaters based on CSA C22. No.46.


23823902 LIQUID HEATERS
23 82 39.02 LIQUID HEATERS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies commercial, industrial and domestic immersion heaters and their installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section is based on assumption that heater loads, voltages and phases will be indicated.

Heaters based on CSA C22.2 No. 110.

This Section 23 82 50 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15706 - Liquid Heaters in accordance with MasterFormat 1995.


23 83 00 RADIANT HEATING UNITS

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies vacuum, condensing,  non-condensing, pressure or gravity vented or unvented, high intensity or low intensity infrared heating systems designed to be compatible with either natural gas or propane fuel.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 23 83 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15761 - Infrared Heating Systems in accordance with MasterFormat 1995.


23830001 Radiant Heaters - Electric Infrared
23 83 00.01 Radiant Heaters - Electric Infrared

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 23 83 35 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15768 - Electric Infrared Radiant Heaters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies electric infrared heaters, controls and installation procedures.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

This Section is based on the assumption that heater type, mounting arrangement and height, dimensions and voltage will be indicated.

Heaters based on CSA C22.2 No.46.


23 83 13 RADIANT HEATING ELECTRIC CABLES

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies radiant heating cables their installation and testing.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This specification is based on assumption that supply voltage capacities, phase, and lengths will be indicated.

Heating cables based on CSA C22.2 No. 130.2.

Specify in Section 09 23 00 - Gypsum Plastering that to avoid plaster cracking from insufficient cover, apply 13 mm base coat. Insulating plaster such as vermiculite is not acceptable.

This Section 23 83 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15704 - Heating Cables - Radiant in accordance with MasterFormat 1995.


23831301 RADIANT HEATING ELECTRIC CABLES - SNOW MELTING
23 83 13.01 RADIANT HEATING ELECTRIC CABLES - SNOW MELTING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
238314
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies snow melting cables, accessories, thermostat and snow sensing controls, and installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This specification is based on assumption that system voltage, cable wattage, cable length, spacing, cold lead cable length and size, layout of cables, and junction boxes will be indicated.

Heating cable based on CAN/CSA C22.2 No. 130-[03]

This Section 23 83 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15771 - Heating Cables - Snow Melting in accordance with MasterFormat 1995.


23831302 RADIANT HEATING ELECTRIC CABLES - FLOOR WARMING
23 83 13.02 RADIANT HEATING ELECTRIC CABLES - FLOOR WARMING

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies floor warming cables and their accessories, controls and installation.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This specification is based on the assumption that voltages, lengths, layout and wattages, spacing, cold lead length and size will be indicated.

Heating cables based on CAN/CSA C22.2 No. 130.1.

This Section 23 83 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15772 - Heating Cables - Floor Warming in accordance with MasterFormat 1995.


23 84 13 HUMIDIFIERS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017800 - CLOSEOUT SUBMITTALS
013216
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
233113
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies materials and installation for direct steam injection mechanical, atomizing, plenum mounted drum, plenum or duct mounted pad, packaged electrode steam generating, packaged, gas fired, steam generator type humidifiers and accessories.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section specifies sustainable requirements related to the Construction and Verification.

This Section 23 84 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15751 - Humidifiers in accordance with MasterFormat 1995.


25 01 11 EMCS: START-UP, VERIFICATION AND COMMISSIONING

Date: 2004/06/30

Related sections:

250501 - EMCS: GENERAL REQUIREMENTS
001330
017800 - CLOSEOUT SUBMITTALS
017900 - DEMONSTRATION AND TRAINING

Notes:

This Section 25 01 11 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13832 - EMCS: Start-up and Check-out in accordance with MasterFormat 1995.

DESCRIPTION: This Section describes start-up, check-out, operational acceptance tests for building EMCS and requirements to ensure the full commissioning of a facility including assurance that systems meet design criteria and specification requirements.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 01 12 EMCS: TRAINING

Date: 2004/06/30

Related sections:

250501 - EMCS: GENERAL REQUIREMENTS

Notes:

This Section 25 01 12 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13835 - EMCS: Training in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the requirements for an EMCS training program, instructors and training materials.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 05 01 EMCS: GENERAL REQUIREMENTS

Date: 2005/03/31

Related sections:

250502 - EMCS: SUBMITTALS AND REVIEW PROCESS
250554 - EMCS: IDENTIFICATION
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section describes the general requirements for a Building Energy Monitoring and Control System (EMCS)that are common to NMS EMCS Sections.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 25 05 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13830 - EMCS: General Requirements in accordance with MasterFormat 1995.


25 05 02 EMCS: SUBMITTALS AND REVIEW PROCESS

Date: 2004/06/30

Related sections:

Notes:

This Section 25 05 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13831 - EMCS: Shop Drawings, Product Data and Review Process in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the requirements for shop drawings and their preliminary and detailed review. This Section also specifies the design requirements for the preliminary design review and the preliminary design review meeting.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 05 03 EMCS: PROJECT RECORD DOCUMENTS

Date: 2004/06/30

Related sections:

250501 - EMCS: GENERAL REQUIREMENTS
250502 - EMCS: SUBMITTALS AND REVIEW PROCESS

Notes:

This Section 25 05 03 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13834 - EMCS: Project Record Documents in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the requirements for final control diagrams and the operation and maintenance manual for the EMCS work.

When Section 01 78 00 - Closeout Submittals is included in the project manual, coordinate the operation and maintenance requirements specified in this section with those specified in Section 01 78 00 to avoid duplication and conflicts.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 05 54 EMCS: IDENTIFICATION

Date: 2004/06/30

Related sections:

Notes:

This Section 25 05 54 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13836 - EMCS: Identification in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the identification of EMCS devices, sensors, wiring tubing, conduit and equipment, the nameplates materials, colours and lettering sizes.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 08 20 EMCS: Warranty and Maintenance

Date: 2004/06/30

Related sections:

250501 - EMCS: GENERAL REQUIREMENTS

Notes:

This Section 25 08 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13833 - EMCS: Commissioning in accordance with MasterFormat 1995.

DESCRIPTION: Included in this Section are the requirements for warranty and activities during the warranty period and service contracts.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.


25 10 01 EMCS: LOCAL AREA NETWORK (LAN)

Date: 2005/03/31

Related sections:

Notes:

DESCRIPTION: This Section specifies the requirements for Local Area Network (LAN) in a Building Energy Monitoring and Control System (EMCS).

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification of this project for attaining environmental performance goals, co-ordinate with Section 25 05 01 - EMCS: General Requirements.

This Section 25 10 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13840 - EMCS: Local Area Network (LAN) in accordance with MasterFormat 1995.


25 10 02 EMCS: OPERATOR WORK STATION (OWS)

Date: 2005/03/31

Related sections:

250503 - EMCS: PROJECT RECORD DOCUMENTS
050501
259001 - EMCS: SITE REQUIREMENTS, APPLICATIONS AND SYSTEMS SEQUENCES OF OPERATION

Notes:

DESCRIPTION: This Section specifies the hardware and software requirements for an Operator Work Station (OWS) in a Building Energy Monitoring and Control System (EMCS), including primary, secondary, portable and remote OWS's.

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification of this project for attaining environmental performance goals, co-ordinate with Section 25 05 01 - EMCS: General Requirements.

This Section 25 10 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13841 - EMCS: Operator Work Station (OWS) in accordance with MasterFormat 1995.


25 30 01 EMCS: BUILDING CONTROLLERS

Date: 2005/03/31

Related sections:

250502 - EMCS: SUBMITTALS AND REVIEW PROCESS
250503 - EMCS: PROJECT RECORD DOCUMENTS
259001 - EMCS: SITE REQUIREMENTS, APPLICATIONS AND SYSTEMS SEQUENCES OF OPERATION
250501 - EMCS: GENERAL REQUIREMENTS

Notes:

This specification for Building Controllers is the basic reference document for all automation controllers including MCU, LCU, ECU and TCU.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.

This Section 25 30 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13842 - EMCS: Building Controllers Family of Controllers in accordance with MasterFormat 1995.


25 30 02 EMCS: FIELD CONTROL DEVICES

Date: 2005/03/31

Related sections:

017300 - EXECUTION
078400 - FIRE STOPPING
230943 - PNEUMATIC CONTROL SYSTEM FOR HVAC
233315 - DAMPERS - OPERATING
250111 - EMCS: START-UP, VERIFICATION AND COMMISSIONING
250501 - EMCS: GENERAL REQUIREMENTS
250502 - EMCS: SUBMITTALS AND REVIEW PROCESS
250554 - EMCS: IDENTIFICATION
259001 - EMCS: SITE REQUIREMENTS, APPLICATIONS AND SYSTEMS SEQUENCES OF OPERATION
260500 - COMMON WORK RESULTS FOR ELECTRICAL
262710 - MODULAR WIRING SYSTEM
262726 - WIRING DEVICES

Notes:

DESCRIPTION: This Section specifies transmitters, sensors, controls, meters, switches, transducers, damper operators, valve actuators, low voltage current transformers and other such control devices integral to the EMCS.

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification, co-ordinate with Section 25 05 01 - EMCS: General Requirements.

This Section 25 30 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13844 - EMCS: Field Control Devices in accordance with MasterFormat 1995.


25 90 01 EMCS: SITE REQUIREMENTS, APPLICATIONS AND SYSTEMS SEQUENCES OF OPERATION

Date: 2005/03/31

Related sections:

Notes:

DESCRIPTION: This Section specifies the site specific requirements and systems sequences of operation.  For PWGSC projects refer to MD13800 - Energy Management and Control Systems (EMCS) Design Manual, which shows how the information is to be presented.

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification for attaining environmental performance goals, co-ordinate with Section 25 05 01 - EMCS: General Requirements.

This Section 25 90 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13846 - EMCS: Site Requirements Applications and Systems Sequences of Operation in accordance with MasterFormat 1995.


26 05 00 COMMON WORK RESULTS FOR ELECTRICAL

Date: 2006/09/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
132160
013216
013529
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
016100 - COMMON PRODUCT REQUIREMENTS
262903 - CONTROL DEVICES
014500 - QUALITY CONTROL
099123 - INTERIOR PAINTING

Notes:

DESCRIPTION: This Section describes the Common Work Results applicable to electrical disciplines.  This Section may also be used as Common Works Results for other projects involving Communications, or Electronic Safety and Security work, by changing the number and title and editing the text accordingly to either Section 27 05 01 - Common Work Results - Communications, or Section 28 05 01 - Common Work Results - Electronic Safety and Security.

This Section 26 05 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16010 - Electrical General Requirements in accordance with MasterFormat 1995.


26 05 14 POWER CABLE AND OVERHEAD CONDUCTORS (1001 V)

Date: 2008/06/30

Related sections:

260500 - COMMON WORK RESULTS FOR ELECTRICAL
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL

Notes:


26 05 20 WIRE AND BOX CONNECTORS 0-1000 V

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 05 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16151 - Wire And Box Connectors 0-1000 V in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and installation for wire and box connectors.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 05 21 WIRES AND CABLES (0-1000 V)

Date: 2008/12/31

Related sections:

260500 - COMMON WORK RESULTS FOR ELECTRICAL
013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
337173
260536 - CABLE TRAYS FOR ELECTRICAL SYSTEMS
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS

Notes:

DESCRIPTION: This Section specifies copper, ACM alloy and aluminum conductors rated from 0-1000 Volts and the most common electrical insulation and covering materials.  This Section does not include fire rated building wiring to ULC S139 and CSA C83, marine, hazardous, mining, instrumentation, communication and fire alarm wiring.

Aluminum wiring is more commonly recycled and remanufactured than copper wiring. Projects including significant amounts of new or redundant aluminum wiring should have particular notes for the preference of recycling. Building renovations can often include redundant wiring and particular effort should be made to have abandoned wiring removed and recycled.  This can also remove quantities of various potential toxic electrical insulation materials from the site.

For Federal Government projects refer to departmental guidelines for conductor material selection for branch circuit wiring.


26 05 22 CONNECTORS AND TERMINATIONS

Date: 2003/12/31

Related sections:

017419
260533 - Raceway and Boxes for Electrical Systems

Notes:

This Section 26 05 22 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16153 - Connectors And Terminations in accordance with MasterFormat 1995.


26 05 27 GROUNDING - PRIMARY

Date: 2008/06/30

Related sections:

260500 - COMMON WORK RESULTS FOR ELECTRICAL
014500 - QUALITY CONTROL

Notes:

Each individual installation involves special consideration in establishing grounding design. Variables such as local soil conditions, and other factors need to be considered.

Grounding and bonding equipment based on CSA C22.2 No. 41.


26 05 28 GROUNDING - SECONDARY

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 05 28 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16062 - Grounding - Secondary in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Ensure that underground water pipe is conductive if used as ground connection.

Grounding equipment based on CSA C22.2 No.41.


26 05 29 Hangers and Supports for Electrical Systems

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This Section 26 05 29 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16071 - Fastenings And Supports in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies U shape support channels either surface mounted, suspended or set in poured concrete walls and ceilings.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 05 31 SPLITTERS, JUNCTION, PULL BOXES AND CABINETS

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This specification is based on assumption that voltage, phase, number of wires, ampacity, size, box or trough type of splitter will be indicated.

This specification is based on assumption that the cabinet size, type, and number of terminals will be indicated.

For main junction and pull boxes, indicate size and if flush or surface mounted.

Splitters are referenced to comply with CSA C22.2 No. 76.

(Cutout), junction and pull boxes are referenced to comply with CSA C22.2 No. 40.


26 05 32 OUTLET BOXES, CONDUIT BOXES AND FITTINGS

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

This specification covers installation of boxes in non-hazardous locations only. Refer to Canadian Electrical Code for other areas.

Outlet boxes, conduit boxes and fittings are based on CSA C22.2 No. 18.


26 05 33 Raceway and Boxes for Electrical Systems

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 05 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16152 - Cable Splice And Junction Boxes in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies cable splice and junction boxes and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26053301 SURFACE AND LIGHTING FIXTURE RACEWAYS
26 05 33.01 SURFACE AND LIGHTING FIXTURE RACEWAYS

Date: 2008/06/30

Related sections:

014500 - QUALITY CONTROL
262719 - MULTI-OUTLET ASSEMBLIES

Notes:


26 05 34 CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS

Date: 2006/12/31

Related sections:

017411 - CLEANING

Notes:

DESCRIPTION: This section specifies rigid and flexible fasteners, fittings and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.


26 05 36 CABLE TRAYS FOR ELECTRICAL SYSTEMS

Date: 2006/09/30

Related sections:

Notes:

DESCRIPTION: This Section specifies metal and fibreglass cabletroughs and fittings, and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section 26 05 36 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16135 - Cable troughs in accordance with MasterFormat 1995.


26 05 37 WIREWAYS AND AUXILIARY GUTTERS

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 05 37 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16136 - Wireways And Auxiliary Gutters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies wireways, auxiliary gutters, associated fittings and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 05 38 CELLULAR METAL FLOOR RACEWAY FITTINGS

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 05 38 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16137 - Cellular Metal Floor Raceway Fittings in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies cellular metal raceways, associated fittings and installation. Ensure that location of outlets for systems served by cellular metal floor, location of elbows, tees, cross-boxes, and cell access boxes, are shown on the drawings and have been coordinated with Division 5.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 05 39 Underfloor Raceways for Electrical Systems

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
096519 - RESILIENT TILE FLOORING
096800

Notes:

This Section 26 05 39 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16113 - Underfloor Distribution System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies only single level underfloor distribution systems, buried type.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

A number of different types of underfloor systems are available: single level flush type, two level, trench header type and cellular floors.

The underfloor duct system usually makes provision for three channels, e.g. power, intercom, and telephone.


26054301 INSTALLATION OF CABLES IN TRENCHES AND IN DUCTS
26 05 43.01 INSTALLATION OF CABLES IN TRENCHES AND IN DUCTS

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
312333

Notes:

This Section 26 05 44 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16051 - Installation Of Cables In Trenches And In Ducts in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the installation of direct buried cables and cables in ducts including protection, markers and testing.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Chemical wood preservatives are used to enhance wood durability. Most chemicals registered with Agriculture Canada as wood preservatives are classed as very toxic and potentially hazardous pesticides. Although the potency of these products varies from product to product all are poisonous to some degree, and if misused can be potentially hazardous to humans and other forms of life.

ENVIRONMENTAL: Pre treated wood products, especially those pressure treated with water based preservatives, pose less environmental threat than do wood preservatives chemicals prior to application.

Use direct buried cables in suburban and open areas only, where cables are kept away from pavements and sidewalks. Indicate trench details including spacing and depth of cables in trench.

For Transport Canada (TC) projects check department's standards for cable installation depths, and standard drawings.


26 05 80 FRACTIONAL HORSEPOWER MOTORS

Date: 2006/09/30

Related sections:

028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

This specification is based on the assumption that Motor and Control Schedule will be indicated on drawings.

This Section 26 05 80 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16221 - Fractional Horsepower Motors in accordance with MasterFormat 1995.


26 05 81 MOTORS: 0.746 TO 149 KW

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
016100 - COMMON PRODUCT REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies high capacity motors 0.746 to 149 kW (1 to 200 hp) 208/600 V, and their component parts, accessories and installation.

This specification is based on assumption that Motor and Control Schedule will be indicated on drawings.


26 06 31 DIESEL ELECTRIC GENERATING UNITS APPENDIX A - TECHNICAL DATA FORM

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
263213

Notes:

This Section 26 06 31 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16234 - Diesel Electric Generating Units Appendix A - Technical Data Form in accordance with MasterFormat 1995.


26092301 METERING AND SWITCHBOARD INSTRUMENTS
26 09 23.01 METERING AND SWITCHBOARD INSTRUMENTS

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 09 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16053 - Metering And Switchboard Instruments in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies metering and switchboard materials, components, cabinets, and instruments including their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Metering in this Section for owners use (non-revenue).

Due to many possible variations in metering systems, only basic metre parameters are described. Compile detailed specification from engineer's design data, schematic diagrams and manufacturer's literature.

Instruments will usually be specified individually and mounted on switchboards. Use multiple applications of basic specification as necessary.


26092302 LIGHTING CONTROL DEVICES - PHOTOELECTRIC
26 09 23.02 LIGHTING CONTROL DEVICES - PHOTOELECTRIC

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies photoelectric lighting control equipment for exterior use only.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26092303 LIGHTING CONTROL DEVICES - INCANDESCENT DIMMING
26 09 23.03 LIGHTING CONTROL DEVICES - INCANDESCENT DIMMING

Date: 2007/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

Dimmers based on CSA C22.2 No.184.1.


26092304 LIGHTING CONTROL DEVICES - FLUORESCENT DIMMING
26 09 23.04 LIGHTING CONTROL DEVICES - FLUORESCENT DIMMING

Date: 2009/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
265000 - LIGHTING
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal choices. Improved lighting energy efficiency can be achieved by: specifying smaller T-5, T-8 or T-10 lamps with a triphosphor coating; specifying high frequency ballasts; and, specifying Low Total Harmonic Distortion ballasts. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This specification is based on the assumption that dimming system block diagram and equipment layout will be indicated on drawings, indicating relative configuration, quantities of system components such as intensity selectors, dimming auxiliaries, dimming ballasts, fluorescent lamps, selector relays, wiring, manner in which groups of lamps are controlled and selected, ambient temperature data.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Electronic equipment based on CSA C22.2 No.184.1.

The following Section contains text required to complete Section 26 50 00 - Lighting.


26 09 24 LIGHTING CONTROL DEVICES - LOW VOLTAGE

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies low voltage control systems for lighting equipment.

ENVIRONMENTAL: Improved lighting energy efficiency can be achieved by specifying smaller T-5 or T-8 lamps; specifying electronic ballasts.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

Control transformers based on CSA C22.2 No .66. Rectifiers based on CSA C22.2 No. 107.

This Section 26 09 24 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13811 - Lighting Control Equipment - Low Voltage in accordance with MasterFormat 1995.


26 09 43 Network Lighting Controls

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 09 43 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16127 - Smart-light Control System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies smart-light control system for multi-control of lighting circuits and/or remote grouping of up to six ballasts. Connections completed with modular wiring systems to power source, luminaires, ambient light sensors, low voltage switches, occupancy sensors, light controls, building automation systems or central computer.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26110001 OUTDOOR SUBSTATION TO 15 KV
26 11 00.01 OUTDOOR SUBSTATION TO 15 KV

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262413 - SWITCHBOARDS
261301 - ISOLATING SWITCHES TO 15 KV
261826 - Medium Voltage Reclosers
261814 - FUSE CUTOUTS AND FUSE LINKS - OUTDOOR
261213 - LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS
260522 - CONNECTORS AND TERMINATIONS
264101
323113 - CHAIN LINK FENCES AND GATES
261841 - INTERLOCK SYSTEMS
260923
344332 - FLOODLIGHTING-EXTERIOR
337116
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies materials, components and structure for outdoor substation to 15 kV. This specification is limited to tower type substation only.

This specification is based on assumption that single line diagram, physical arrangement will be shown on drawings indicating equipment ratings, details, dimensions, configuration, connections. Plot plan to show overall station layout.

The following Sections contain text required to complete this Section: 26 05 22 - Connectors and Terminations, 26 09 23.01 - Metering and Switchboard Instruments, 26 09 23.02 - Lighting Control Devices - Photoelectric, 26 12 13 - Liquid Filled, Medium Voltage Transformers, 26 13 01 - Isolating Switches to 15kV, 26 18 14 - Fuse Cutouts and Fuse Links - Outdoor, 26 18 26 - Medium Voltage Reclosers, Section 26 18 41 - Interlock Systems, 26 24 13 - Switchboards, 26 41 01 - Primary Lightning Arresters, 26 56 19 - Roadway Lighting, 33 71 16.01 - Electrical Pole Lines and Hardware and 34 43 32 - Floodlighting - Exterior.

This specification is limited to tower type substation only.


26111301 UNIT SUBSTATION TO 15 KV
26 11 13.01 UNIT SUBSTATION TO 15 KV

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
261213 - LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS
261216 - Dry Type, Medium Voltage Transformers
262821
262823 - DISCONNECT SWITCHES - FUSED AND NON-FUSED
260923
262219 - Control and Signal Transformers
263316 - BATTERY RACKS
263343 - BATTERY CHARGERS
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 11 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16361 - Unit Substation To 15 Kv in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies indoor and outdoor unit substation with primary switchgear, transformer(s), and secondary switchgear.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

The following Sections contain text required to complete this Section: Section 26 13 17 - Full Load Interrupters Switches to 15 kV, Section 26 24 13 - Switchboards, Section 26 13 01 - Isolating Switches to 15kV, Section 26 41 01 - Primary Lightning Arresters, Section 26 09 23.01 - Metering and Switchboard Instruments, Section 26 22 19 - Control and Signal Transformers, Section 26 12 16 - Dry Type, Medium Voltage Transformers, Section 26 12 13 - Liquid Filled, Medium Voltage Transformers, Section 26 28 21 - Moulded Case Circuit Breakers, Section 26 28 23 - Disconnect Switches - Fused and Non-Fused, Section 26 28 14 - Fuses-Low Voltage, Section 26 33 16 - Battery Racks, Section 26 33 43 - Battery Chargers and Section 26 18 41 - Interlock Systems.


26 12 13 LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

Range up to 1000 kVA single phase and 3000 kVA three phase and up to 34.5 kV primary voltage.

For indoor installations where curbing for retaining insulating liquid is required, ensure one piece monolithic curb and floor is specified, thereby avoiding joints with sealant which could be dissolved by insulating liquid.


26 12 16 Dry Type, Medium Voltage Transformers

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419
260501

Notes:

This Section 26 12 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16275 - Dry Type Transformers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies dry type transformers with ratings up to 5000 kVA single phase and up to 7500 kVA three phase, and voltage class up to 46 kV.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26121601 DRY TYPE TRANSFORMERS UP TO 600 V PRIMARY
26 12 16.01 DRY TYPE TRANSFORMERS UP TO 600 V PRIMARY

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 12 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16271 - Dry Type Transformers Up To 600 V Primary in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and components for dry type transformers up to 600 V primary, equipment identification and transformer installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Buck and boost transformers, isolating transformers and transformers with special enclosures are not covered by this specification.

Dry type transformers based on CAN/CSA-C22.2 No.47 and CSA C9.


26121613 PAD-MOUNTED, TRANSFORMERS FOR AIRFIELD VISUAL AIDS
26 12 16.13 PAD-MOUNTED, TRANSFORMERS FOR AIRFIELD VISUAL AIDS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, equipment, enclosures and installation for pad mounted transformers.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

These small pad-mounted units are as used by DND. For larger units (25 kVA single phase, 75 kVA three phase and up), refer to NMS Section 26 12 19 - Pad Mounted, Liquid Filled, Medium Voltage Transformers.

There is no applicable CSA Standard for these small output pad-mount units. Due to small quantities required, no manufacturer has as yet sought CSA approval for the units. Local inspection authority approval of drawings should therefore be obtained prior to purchase.

Oil immersed transformers are not available in these small sizes.

This is a check list. These items are specified in this Section "as indicated" and must be included on the drawings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26 12 19 PAD MOUNTED, LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
261841 - INTERLOCK SYSTEMS
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies single and three phase pad mounted transformers, including low profile single phase and three phase dead front pad mounted distribution transformers.

Range of kVA ratings: 75 kVA through 2500 kVA, three phase. 25 kVA through 167 kVA, single phase. Maximum nominal primary voltage is 27600 V grounded Y/ 15935 V.

When equipment is intended for operation by other than electric utility, ensure that unit is acceptable to appropriate electrical inspection authority.


26 12 21 TRANSFORMER VAULT EQUIPMENT TO 15 KV

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
260514 - POWER CABLE AND OVERHEAD CONDUCTORS (1001 V)
262413 - SWITCHBOARDS
262219 - Control and Signal Transformers
261213 - LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS
260521 - WIRES AND CABLES (0-1000 V)
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies transformer vault equipment including underground primary service, primary circuit breaker, utility company metering, primary bus and fuse cutouts, transformers, and secondary feeders.

The following Sections contain text required to complete this Section: Section 26 05 14 - Power Cable and Overhead Conductors (1001 V), Section 26 05 21 - Wires and Cables (0-1000 V), Section 26 09 23.01 - Metering and Switchboard Instruments, Section 26 12 13 - Liquid Filled, Medium Voltage Transformers, Section 26 22 19 - Control and Signal Transformers, Section 26 24 13 - Switchboards.

Ensure one-piece monolithic curb and floor is specified for retaining insulating liquid.


26 13 01 ISOLATING SWITCHES TO 15 KV

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 13 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16325 - Isolating Switches To 15 Kv in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies indoor and outdoor isolation switches.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

As isolating switches are always part of a system, installation should be covered in the relevant Section such as Pole Lines and Hardware, Substation Structure or Switchgear Assembly.


26 13 17 FULL LOAD INTERRUPTER SWITCHES TO 15 KV

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 13 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16327 - Full Load Interrupter Switches To 15 Kv in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and fabrication for load interrupter switches.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 13 18 PRIMARY SWITCHGEAR ASSEMBLY TO 15 KV

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419
260501

Notes:

This Section 26 13 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16341 - Primary Switchgear Assembly To 15 Kv in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, ground, identification, components, accessories and installations for the primary switchgear assembly.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

This Section is based on assumption that single line diagram, elevation arrangement, dimensions, equipment rating will be shown on drawings. Each cubicle may be - interrupter cubicle - cable entry or exit cubicle - transition cubicle - line disconnect cubicle - cubicle with transformer throat adaption - bus section cubicle - utility company's metering cubicle.

The following Sections contain text required to complete this Section: Section 26 13 17 - Full Load Interrupters Switches, Section 26 24 13 - Switchboards, Section 26 13 01 - Isolating Switches to 15kV, Section 26 41 00.01 - Primary Lightning Arresters, Section 26 18 41 - Interlock Systems, Section 26 09 23.01 - Metering and Switchboard Instruments, Section 26 22 19 - Control and Signal Transformers.


26 18 14 FUSE CUTOUTS AND FUSE LINKS - OUTDOOR

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 18 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16326 - Fuse Cutouts And Fuse Links - Outdoor in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the fuses, cutouts and links, and installation for outdoor fuses.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 18 26 Medium Voltage Reclosers

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 18 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16322 - Reclosers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies reclosers, accessories, identification and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that type of recloser and options required are indicated on the drawings.


26183901 MOTOR CONTROLLERS - 2000 TO 5000 V (NON-HAZARDOUS)
26 18 39.01 MOTOR CONTROLLERS - 2000 TO 5000 V (NON-HAZARDOUS)

Date: 2007/03/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
262219 - Control and Signal Transformers
261301 - ISOLATING SWITCHES TO 15 KV
261841 - INTERLOCK SYSTEMS
262903 - CONTROL DEVICES
260923
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies basic options, single speed, full voltage, reduced voltage reactor start, reduced voltage auto-transformer start, wound rotor, synchronous motor controllers for non-hazardous motors from 2000 to 5000 volts.

This Section is based on assumption that physical arrangement of motor controller, schematic wiring diagram with relay types, and control logic will be indicated on the drawings.

The following Sections contain text required to complete this Section: Section 26 05 22 - Connectors and Terminations, Section 26 09 23.01 - Metering and Switchboard Instruments, Section 26 13 01 - Isolating Switches to 15 kV, Section 26 18 14  - Fuse Cutouts and Fuse Links - Outdoor, Section 26 18 41 - Interlock Systems, Section 26 22 19 - Control and Signal Transformers, Section 26 29 03 - Control Devices.

Controllers based on CSA C22.2 No.14. Industrial Control Equipment, together with TIL D21 - Interim Certification Requirements for Control Devices rated at more than 1500 V but not more than 7200 V for electric motors. CSA C22.1 No. 193 - High Voltage Full Load Interrupter Switch may apply for such assemblies, whereas CSA C22.2 No. 58 - High Voltage Isolating Switches might apply for other motor controller assemblies.


26 18 41 INTERLOCK SYSTEMS

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 18 41 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16323 - Interlock Systems in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and components for interlock systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Insert required text from this Section into applicable technical Sections. This Section should not be used as a separate Section in a project specification.


26 22 19 Control and Signal Transformers

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 22 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16461 - Instrument Transformers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies potential and current transformers, mounting brackets and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

This Section is based on assumption that nominal voltage class, ratio, type of connections, phases of the instrument transformers will be indicated.


26 23 00 Low Voltage Switchgear

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419
262813
260501

Notes:

This Section 26 23 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16431 - Secondary Switchgear in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies low voltage switchgear for controlling relatively large loads i.e.: mains of 2000 A or larger.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

The following Sections contain text required to complete this Section: Section 26 09 23.01 - Metering and Switchboard Instruments, Section 26 22 19 - Control and Signal Transformers, Section 26 28 16.02 - Moulded Case Circuit Breakers, Section 26 28 23 - Disconnect Switches - Fused and Non-Fused, Section 26 28 13.01 - Fuses, Section 26 28 18 - Ground Fault Equipment Protection, Section 26 28 16.01 - Air Circuit Breakers.


26 24 01 SERVICE EQUIPMENT

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262823 - DISCONNECT SWITCHES - FUSED AND NON-FUSED
262816
262416
260531 - SPLITTERS, JUNCTION, PULL BOXES AND CABINETS
262820 - GROUND FAULT CIRCUIT INTERRUPTERS - CLASS "A"
260528 - GROUNDING - SECONDARY

Notes:

This Section 26 24 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16401 - Service Equipment in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies service equipment and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that single line diagram and/or elevation showing equipment rating, details, dimensions, configuration, connections will be indicated.


26 24 02 SERVICE ENTRANCE BOARD

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262816
262823 - DISCONNECT SWITCHES - FUSED AND NON-FUSED
262818 - GROUND FAULT EQUIPMENT PROTECTION
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 24 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16402 - Service Entrance Board in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, components and installation for service entrance boards.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

The following Sections contain text required to complete this Section: Section 26 28 16.02 - Moulded Case Circuit Breakers, Section 26 28 23 - Disconnect Switches - Fused and Non-Fused, Section 26 28 13.01 - Fuses, Section 26 28 18 - Ground Fault Equipment Protection.


26 24 13 SWITCHBOARDS

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies indoor and outdoor switchboard circuit breakers.

This section is based on assumption that details of breaker type, options, and installation in primary switchgear assembly generator switchboard will be specified in Section 26 24 13.01 - Generator Switchboard to 600 V or Section 26 24 13.02 - Generator Switchboard Over 600 V and indicated on drawings.


26241301 GENERATOR SWITCHBOARD TO 600 V
26 24 13.01 GENERATOR SWITCHBOARD TO 600 V

Date: 2005/03/31

Related sections:

262219 - Control and Signal Transformers
262814
262823 - DISCONNECT SWITCHES - FUSED AND NON-FUSED
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
013529
260500 - COMMON WORK RESULTS FOR ELECTRICAL
260528 - GROUNDING - SECONDARY
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS

Notes:

DESCRIPTION: This section provides information on materials, including panels, accessories, and, installation procedures for generator switchboards up to and including 600 Volts.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

SUSTAINABLE: For sustainable requirements for this section, related to the Concept Design, Construction, Verification and Operation, co-ordinate with Section 26 05 00 - Common Work Results - Electrical.

This Section specifies low voltage switchgear for controlling power from 2 or more generating units.

This Section 26 36 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16443 - Generator Switchboard To 600 V in accordance with MasterFormat 1995.


26241302 GENERATOR SWITCHBOARD OVER 600 V
26 24 13.02 GENERATOR SWITCHBOARD OVER 600 V

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL
260527 - GROUNDING - PRIMARY

Notes:

This Section 26 36 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16444 - Generator Switchboard Over 600 V in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies switchgear for controlling power from 2 or more generating units, normally for voltages from 2.4 kV to 13.8 kV.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

The following Sections contain text required to complete this Section: Section 26 24 13 - Switchboards, Section 26 13 01 - Isolating Switches to 15 kV, Section 26 09 23.01 - Metering and Switchboard Instruments and Section 26 22 19 - Control and Signal Transformers.


26241601 PANELBOARDS BREAKER TYPE
26 24 16.01 PANELBOARDS BREAKER TYPE

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262821
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 24 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16441 - Panelboards Breaker Type in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies standard and custom panelboards and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that panel details are indicated and contain following information: (1) voltage (2) phase (3) ampacity of mains (4) ampacity of main breaker and number of poles (5) quantity, ampacity and number of poles for branch circuits (6) surface or flush mounting. For large panelboards in awkward location and/or requiring frequent service consider use of door in door construction available as factory option.


26241602 PANELBOARDS SWITCH AND FUSE TYPE
26 24 16.02 PANELBOARDS SWITCH AND FUSE TYPE

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
013529
262814
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

DESCRIPTION: This Section provides information on materials and installation procedures for fuse and switch type panelboards.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

This specification is based on assumption that panel details are indicated and contain the following information: (1) voltage; (2) phase; (3) ampacity of mains; (4) available fault levels and withstand capacity of mains and branches in amperes (symmetrical) rms; (5) ampacity of the main section and number of poles; (6) quantity, ampacity and number of poles for branch circuits; (7) surface or flush mounting.

Plug fuse panels have not been included in this specification.

SUSTAINABLE: For sustainable requirements for this section, related to the Concept Design, Construction, Verification and Operation, co-ordinate with Section 26 05 00 - Common Work Results - Electrical.

This Section 26 24 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16442 - Panelboards Switch and Fuse Type in accordance with MasterFormat 1995.


26 24 19 MOTOR CONTROL CENTRES

Date: 2006/09/30

Related sections:

013529
017800 - CLOSEOUT SUBMITTALS
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

DESCRIPTION: This Section specifies the components for a motor control centre, the supply characteristics, construction, busbars and installation.

ENVIRONMENTAL: When this Section is being used to specify a new motor control centre as a replacement for an existing one there is an opportunity to recycle or reuse a large percentage of the waste generated by this work. Recalling and reuse of these materials would reduce environmental impacts by diverting materials from landfill.

This Section is based on assumption that single line diagram, physical arrangement of motor control centre, schematic diagrams will be indicated on drawings.

Following Section contains text required to complete this Section: Section 26 29 10 - Motor Starters to 600 V.

This Section 26 24 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16225 - Motor Control Centre in accordance with MasterFormat 1995.


26 25 00 Enclosed Bus Assemblies

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262823 - DISCONNECT SWITCHES - FUSED AND NON-FUSED
262816
262910 - MOTOR STARTERS TO 600 V

Notes:

This Section 26 25 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16451 - Busways in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies unventilated, ventilated and weatherproof busways, fittings, and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 27 10 MODULAR WIRING SYSTEM

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This Section contains flexible manufactured wiring system for distribution of lighting and equipment branch circuits above suspended ceilings, in return air spaces above hung ceiling, in walls and within raised floor areas. Comprising: starter cables, joiner cables, cross-over cables, switch drop cables, interceptors, switch adaptors, multi-tap adaptors, phase-tap adaptors, wall assemblies, branch feeders, distribution boxes and blanking plugs.


26 27 16 ELECTRICAL CABINETS AND ENCLOSURES

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE

Notes:

This Section 26 27 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16161 - Outdoor Equipment Enclosures in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the equipment and installation for metal outdoor equipment enclosures.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Specification is based on assumption that enclosure size, layout of equipment and mounting details will be indicated on drawings.

For text required to complete this Section refer to Section 26 18 41 - Interlock Systems.


26 27 19 MULTI-OUTLET ASSEMBLIES

Date: 2009/06/30

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

This specification is based on the assumption that the raceway type including wiring devices will be indicated on the drawings.

Where a raceway has no outlets in the channel refer to Section 26 05 33.01 - Surface and Lighting Fixture Raceways.

Multi-outlet assemblies are based on CSA C22.2 No. 42.


26 27 23 INDOOR SERVICE POLES

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 27 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16138 - Indoor Service Poles in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies indoor aluminum service poles and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 27 26 WIRING DEVICES

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260532 - OUTLET BOXES, CONDUIT BOXES AND FITTINGS
262820 - GROUND FAULT CIRCUIT INTERRUPTERS - CLASS "A"
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 27 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16141 - Wiring Devices in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies switches, receptacles, wiring devices, cover plates and their installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that wiring devices will be indicated including legend covering CSA identification numbers for receptacles i.e. CSA type L5-15R corresponds to a locking type 125 V, 15 A, 2 pole, 3 wire grounding receptacle. Switches to be indicated and identified by legend, i.e. 15 A, single pole, 125 V. This specification is set up to include 15 A, 120 V, single and duplex receptacles, and 120 V switches.

Manually operated general purpose ac switches are based on CSA C22.2 No.111. Snap switches are based on CSA C22.2 No.55. Receptacles, plugs and similar wiring devices are based on CSA C22.2 No.42.


26 27 73 DOOR CHIMES

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies administrative procedures, materials and some installation procedures for door bells and chime systems.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26281301 FUSES - LOW VOLTAGE
26 28 13.01 FUSES - LOW VOLTAGE

Date: 2008/06/30

Related sections:

260500 - COMMON WORK RESULTS FOR ELECTRICAL
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS

Notes:

This section can be used to specify sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This specification is based on assumption that fuse types, voltage and ampacities will be indicated.


26281302 OUTDOOR LOAD BREAK SWITCHES AND FUSES
26 28 13.02 OUTDOOR LOAD BREAK SWITCHES AND FUSES

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS

Notes:

This Section 26 28 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16324 - Outdoor Load Break Switches And Fuses in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and installation for outdoor load break switches and fuses.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26281601 AIR CIRCUIT BREAKERS
26 28 16.01 AIR CIRCUIT BREAKERS

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 28 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16411 - Air Circuit Breakers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, components, operational features and installation for air circuit breakers.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that voltage, phase, ampacity, interrupting capacity (symmetrical rms amperes), breaker type, options and setting of trips are indicated on drawings.


26281602 MOULDED CASE CIRCUIT BREAKERS
26 28 16.02 MOULDED CASE CIRCUIT BREAKERS

Date: 2005/03/31

Related sections:

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This specification is based on assumption that voltage, phase, ampacity, breaker type, options and setting of trips will be indicated on drawings.

Do not use breakers with less than 10,000 A symmetrical rms interrupting capacity.

This Section 26 28 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16412 - Moulded Case Circuit Breakers in accordance with MasterFormat 1995.


26 28 18 GROUND FAULT EQUIPMENT PROTECTION

Date: 2004/03/31

Related sections:

017419
262822 - LOAD BREAK SWITCHES
014500 - QUALITY CONTROL

Notes:

This Section 26 28 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16492 - Ground Fault Equipment Protection in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the equipment, fabrication and installation for ground fault protection.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Following Sections contain text required to complete this Section: Section 26 28 16.01 - Air Circuit Breakers, Section 26 28 16.02 -  Moulded Case Circuit Breakers, Section 26 28 22 - Load Break Switches.

For single unit application only, if a system is required, develop a specification to suit.

Valuable resource material can be obtained from Federal Pioneer (Schneider Electric) "Ground Protective Devices" catalogue.

Where class "A" protection is required refer to Section 26 28 20 - Ground Fault Circuit Interrupters - Class "A".


26 28 20 GROUND FAULT CIRCUIT INTERRUPTERS - CLASS "A"

Date: 2004/03/31

Related sections:

017419
014500 - QUALITY CONTROL

Notes:

This Section 26 28 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16493 - Ground Fault Circuit Interrupters - Class "a" in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the equipment and components for ground fault circuit interrupters (GFCIs).

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 28 22 LOAD BREAK SWITCHES

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262813
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 28 22 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16413 - Load Break Switches in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies switches, enclosures and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This equipment available in the 800-5000 A, 240 and 600 V range.

This  Section is based on assumption that switch size, number of poles, rating, interrupting capacity (symmetrical rms amperes), and options will be indicated on drawings.


26 28 23 DISCONNECT SWITCHES - FUSED AND NON-FUSED

Date: 2005/03/31

Related sections:

013529
262813
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section includes text to complete the following Sections: Section 26 11 13.01 - Unit Substation to 15 kV, Section 26 23 00 - Low Voltage Switchgear and Section 26 24 02 - Service Entrance Board.

SUSTAINABLE: For sustainable requirements for this section,  related to the Concept Design, Construction, Verification and Operation, co-ordinate with Section 26 11 13.01 - Unit Substation to 15 kV, Section 26 23 00 - Low Voltage Switchgear and Section 26 24 02 - Service Entrance Board or other appropriate Section in project manual.

This Specification is based on assumption that voltage, ampacity, number of poles, and neutral requirements will be indicated for each switch.

Enclosed manual air break switches based on CAN/CSA C22.2 No. 4. Fuseholder assemblies based on CSA C22.2 No. 39.

This Section 26 28 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16414 - Disconnect Switches - Fused and Non-Fused in accordance with MasterFormat 1995.


26 29 01 CONTACTORS

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262903 - CONTROL DEVICES
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 29 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16421 - Contactors in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies contactors for system voltages up to 600 V and normally used to control heating or lighting loads. This specification is based on assumption that voltage, ampere rating, number of poles, auxiliary contacts will be indicated.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 29 02 FIRE PUMP CONTROL

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230553
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26 29 03 CONTROL DEVICES

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 29 03 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16423 - Control Devices in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies control equipment such as (a) pushbutton stations, indicating lights, control and relay panels to form complete control system in conjunction with (b) such items as motor control centre, starters, and (c) items provided under Division 15 for example, pressure flow, float, solenoid valves, panels, pneumatic electric switches, transducers, duct and space thermostats except heating systems. Some or all of preceding items are interconnected under Part 3 of this Section. Specify control components and assemblies, relative work and interface between Divisions 15 and 16.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.

Ensure work required to be performed is indicated on layout drawings, diagrams and motor starter and control list.


26 29 10 MOTOR STARTERS TO 600 V

Date: 2008/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

This specification is based on assumption that single line schematic wiring and interconnection diagrams, size, type and electrical rating for starters, mounting and type of enclosure, coil voltage and control accessories are shown on drawings and Motor and Control Schedule.

Starters based on CAN/CSA-C22.2 No. 14.


26321301 POWER GENERATION DIESEL
26 32 13.01 POWER GENERATION DIESEL

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262413 - SWITCHBOARDS
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies diesel engine driven generator sets above 30kW rating, normally 3 phase, 120/208V to 250kV.A, 600V from 250 to 750kV.A and 2400V delta or 2400/4160V star above 750kV.A. For diesel engine sets 30kW and smaller, use Section 26 32 13.02 - Power Generation to 30kW.

Following Sections contain text required to complete this Section: Section 26 24 13.01 - Generator Switchboard to 600 V, Section 26 24 13. 02 - Generator Switchboard Over 600 V, Section 26 36 23 - Automatic Transfer Switches.


26321302 POWER GENERATION TO 30 KW
26 32 13.02 POWER GENERATION TO 30 KW

Date: 2009/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

Following Sections contain text required to complete this Section: Section 26 36 23 - Automatic Transfer Switches, Section 26 24 13.01 - Generator Switchboard to 600 V.


26321303 INSTALLATION OF ELECTRIC POWER GENERATING EQUIPMENT
26 32 13.03 INSTALLATION OF ELECTRIC POWER GENERATING EQUIPMENT

Date: 2003/12/31

Related sections:

012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 32 03 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16235 - Installation Of Electric Power Generating Equipment in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, components and installation for electric power generating equipment.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is intended only for the installation of power generation equipment. To provide a comprehensive specification for the supply and installation of power generation equipment use NMS Secretariat Section 26 32 10 - Diesel Electric Generating Units - Liquid Cooled, utilizing appropriate sections of this Section 26 01 31 as Part 3 - EXECUTION.


26321304 DIESEL ELECTRIC GENERATING UNITS (LIQUID COOLED)
26 32 13.04 DIESEL ELECTRIC GENERATING UNITS (LIQUID COOLED)

Date: 2009/12/31

Related sections:

260631 - DIESEL ELECTRIC GENERATING UNITS APPENDIX A - TECHNICAL DATA FORM
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
263213
014500 - QUALITY CONTROL
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the materials, components, assembly and accessories for a liquid cooled electric diesel generating unit.

Text from Sections 26 32 13.07 - Diesel Electric Generating Units Appendix B Factory Test, and 26 06 31 - Diesel Electric Generating Units Appendix A - Technical Data Form, will be required to complete operation test and check for acceptance and for submittals.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26321305 DIESEL ELECTRIC GENERATING UNITS (AIR COOLED)
26 32 13.05 DIESEL ELECTRIC GENERATING UNITS (AIR COOLED)

Date: 2009/12/31

Related sections:

260631 - DIESEL ELECTRIC GENERATING UNITS APPENDIX A - TECHNICAL DATA FORM
017800 - CLOSEOUT SUBMITTALS
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
263213
014500 - QUALITY CONTROL
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

Text from Sections 26 32 13.07 - Diesel Electric Generating Units Appendix B Factory Test, and 26 06 31 - Diesel Electric Generating Units Appendix A - Technical Data Form, will be required to complete operation test and check for acceptance and for submittals.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26321307 DIESEL ELECTRIC GENERATING UNITS APPENDIX B FACTORY TEST
26 32 13.07 DIESEL ELECTRIC GENERATING UNITS APPENDIX B FACTORY TEST

Date: 2009/12/31

Related sections:

263213

Notes:

DESCRIPTION: This Section includes operation tests and checks required for acceptance in both Section 26 32 13.04 - Diesel Electric Generating Units (Liquid Cooled) and Section 26 32 13.05 - Diesel Electric Generating Units (Air Cooled).


26 33 16 BATTERY RACKS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
135290

Notes:

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Availability of adequate and environmentally responsible disposal options should be considered when selecting batteries.

SUSTAINABLE: For sustainable requirements for this Section, related to the Construction and Verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.

When an uninterruptible power system is to be used, battery requirements may be included in Section 26 33 53 - Static Uninterruptible Power System if a single supplier of the system is to be specified.

This Section 26 33 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16241 - Storage Batteries and Racks in accordance with MasterFormat 1995.


26 33 43 BATTERY CHARGERS

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 33 43 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16262 - Battery Chargers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies battery charger performance, accessories, installation and tests.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 33 53 UNINTERRUPTIBLE POWER SYSTEMS STATIC

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017419
263353 - UNINTERRUPTIBLE POWER SYSTEMS STATIC
017800 - CLOSEOUT SUBMITTALS
260501
263316 - BATTERY RACKS

Notes:

This Section 26 33 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16261 - Uninterruptible Power Systems Static in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies both single and three phase Uninterruptible Power Systems (UPS). Normal practice would usually restrict single phase units to range of 1 kVA to 25 kVA, three phase units from 30 kVA and above.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 33 54 HOSPITAL OPERATING ROOMS ISOLATED POWER SUPPLY

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419

Notes:

This Section 26 33 54 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16302 - Hospital Operating Rooms Isolated Power Supply in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the power supply unit and conductors, and installation for te isolated power supply required for hospital operating rooms.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Do not select PCB containing transformers.  If transformers have been previously used, ensure that they are non PCB transformers, or have been decontaminated as per provincial criteria.


26 35 33 POWER FACTOR CORRECTION EQUIPMENT

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
262813
017411 - CLEANING

Notes:

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.

This Section is based on assumption that single line and connection diagrams, dimensioned arrangement of equipment, will be indicated on drawings.


26 36 23 AUTOMATIC TRANSFER SWITCHES

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260500 - COMMON WORK RESULTS FOR ELECTRICAL

Notes:

This Section 26 36 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16301 - Automatic Load Transfer Equipment in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies automatic load transfer equipment which can monitor voltage on all phases of normal power supply, initiate cranking of standby generator unit, transfer loads and shut down standby unit.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26410001 PRIMARY LIGHTNING ARRESTERS
26 41 00.01 PRIMARY LIGHTNING ARRESTERS

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 41 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16303 - Primary Lightning Arresters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, characteristics and installation of primary lighting arrestors.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26410002 SECONDARY LIGHTNING ARRESTERS
26 41 00.02 SECONDARY LIGHTNING ARRESTERS

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 26 41 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16494 - Secondary Lightning Arresters in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the components, characteristics and installation for secondary lightning arresters.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26 41 13 LIGHTNING PROTECTION FOR STRUCTURES

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies lightning protection systems consisting of metallic air terminals, lightning conductors, grounding methods and materials.

To determine whether building qualifies for lightning protection installation, (1) assess for lightning prevalence based on geographical location, and specify only if it falls within these parameters; base extent of protection on isoceraunic chart CAN/CSA-B72 Appendix "E", (2) evaluate building for historical and sentimental value, (3) consider whether contents eg. explosives, necessitate this protection.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26 42 00 CATHODIC PROTECTION

Date: 2009/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the cathodic protection of immersed structures, reinforcements and submerged structures such as, docks, harbours, piles, lock gates and dams. Similar techniques may apply to oil and sewage treatment projects, pipe lines, etc. Secure the services of a corrosion engineer at an early stage of design to advise on the cathodic type and extent of the protection system to be installed.

Where future use of cathodic protection is to be considered, structurally bond applicable parts, specify structures bonding during initial construction.


26420001 TELETHERMICS - CATHODIC PROTECTION
26 42 00.01 TELETHERMICS - CATHODIC PROTECTION

Date: 2006/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
312333
017411 - CLEANING
017900 - DEMONSTRATION AND TRAINING

Notes:

DESCRIPTION: This Section specifies the materials, field inspection and installation for cathodic protection.


26 50 00 LIGHTING

Date: 2008/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

Providing a comfortable lighting balance, limiting the effects of transient adaption and minimizing disability glare can be achieved by using the IES Recommendations as a general guide for maximum luminance ratios. Improved lighting energy efficiency can be achieved by; specifying smaller T-5, T-8 or T-10 lamps with a triphosphor coating; specifying high frequency ballasts; and, specifying Low Total Harmonic Distortion ballasts. Improved day lighting can be achieved by; planning interior for day lighting; organizing internal planning of partitions to maximize day lighting; selecting internal reflectance which maximizes daylight reflection; avoiding adverse impacts of admitting sunlight into the work place; and, providing visual access to the exterior.


26 52 00 EMERGENCY LIGHTING

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS
260521 - WIRES AND CABLES (0-1000 V)

Notes:

This Section 26 52 01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16536 - Unit Equipment For Emergency Lighting in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the equipment, components and installation for emergency lighting systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


26520001 LIGHTING - CENTRAL EMERGENCY SYSTEM
26 52 00.01 LIGHTING - CENTRAL EMERGENCY SYSTEM

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013300 - SUBMITTAL PROCEDURES
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS
265000 - LIGHTING

Notes:

This Section 26 52 02 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16537 - Lighting - Central Emergency System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the system, batteries, charger, racks, auxiliary and mounting equipment and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

The following Sections contain text required to complete this Section: Section 26 33 16 - Battery Racks and Section 26 33 43 - Battery Chargers.

Battery charging equipment based on CSA C22.2 No.107.

Ensure that battery room is ventilated in accordance with CSA C22.1.


26 53 00 EXIT SIGNS

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies standard, self-powered, self-luminous and photo-luminescent exit lights and their installation.

Exit lights based on CSA C22.2 No.141.


26553601 M.I. WHITE FLASHING OBSTRUCTION LIGHT
26 55 36.01 M.I. WHITE FLASHING OBSTRUCTION LIGHT

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies medium intensity obstruction lighting equipment used to increase conspicuity of structures to permit early obstruction recognition by pilots.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26553613 MEDIUM INTENSITY (M.I.) RED FLASHING OBSTRUCTION LIGHT
26 55 36.13

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
344316
261216 - Dry Type, Medium Voltage Transformers
260543
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies Medium Intensity Red Flashing Obstruction Lighting Equipment used to increase conspicuity of structures to permit early obstruction recognition by pilots.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26553619 LOW-INTENSITY (L.I.) RED OBSTRUCTION LIGHTING
26 55 36.19 LOW-INTENSITY (L.I.) RED OBSTRUCTION LIGHTING

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013521 - LEED REQUIREMENTS
261216 - Dry Type, Medium Voltage Transformers
260543
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies Low Intensity Obstruction Lighting Equipment used to increase conspicuity of structures to permit early obstruction recognition by pilots.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


26 56 19 Roadway Lighting

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
265000 - LIGHTING

Notes:

This Section 26 56 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16550 - Street Lighting Poles And Luminaries in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies concrete, steel, aluminum and wood lighting poles, mounting brackets, luminaries and installation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


27 05 13 Communications Services

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 27 05 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16123 - Communications Conductors Outside Plant in accordance with MasterFormat 1995.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Communication wire and cable is not solely responsibility of telephone company. Other telecommunications service providers may also provide. The tariffs of most telephone companies permit customers to attach their own equipment and wiring to their networks. Terminal Attachment Program Procedures are described in Industry Canada's Procedure for Declaration of Conformity and Registration of Terminal Equipment, DC-01 (January 2002) and Procedures for Network Change Notices and Disclosures of New Terminal-to-Network Interfaces, NCN-01 (January 2002).


27 05 26 GROUNDING AND BONDING FOR COMMUNICATIONS SYSTEMS

Date: 2006/03/31

Related sections:

013529

Notes:

DESCRIPTION: This Section describes the following common work results applicable to telecommunications: grounding and bonding systems. For cabling systems refer to new NMS Section 27 10 05 - Structured Cabling for Communication Systems, which,  replaces two former sections: 27 05 14 - Communications Cables Inside Buildings and 27 11 19 - Communications Termination Blocks and Patch Panels.


27 05 28 Pathways for Communications Systems

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS
336576 - DIRECT BURIED UNDERGROUND CABLE DUCTS
260536 - CABLE TRAYS FOR ELECTRICAL SYSTEMS
262723 - INDOOR SERVICE POLES
260539 - Underfloor Raceways for Electrical Systems
260538 - CELLULAR METAL FLOOR RACEWAY FITTINGS
260531 - SPLITTERS, JUNCTION, PULL BOXES AND CABINETS

Notes:

This Section 27 05 28 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16702 - Telecommunications Raceway System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies empty  telecommunications raceways system with either overhead, cabletrough or cellular distribution system.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This specification is based on the assumption that CSA T530, Commercial Building Standard for Telecommunications Pathways and Spaces (Adopted ANSI/TIA/EIA-569A)will be used as a guide. It is further recommended that the latest issue of "Telecommunications Distribution Methods Manual", (TDMM), 9th Edition published by Building Industry Consulting Service International (BICSI) be also used as a guide.

Liaison is required with telecommunications consultant for any additional client-owned telecommunications requirements. If portions of wiring are to be provided by the telephone company, liaison is required with it during design phase so that main box, conduits, pull boxes, closets can be routed, sized and positioned to suit project.

Liaison with building mechanical systems consultant is required during design phase to determine any additional requirements for control systems.


27 10 05 STRUCTURED CABLING FOR COMMUNICATIONS SYSTEMS

Date: 2006/09/30

Related sections:

013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This specification addresses the telecommunications cabling system within a building.  It does not address outside-plant cabling, such as inter-building backbone cabling on a campus. This new NMS Section 27 10 05 - Structured Cabling for Communication Systems, replaces two former sections: 27 05 14 - Communications Cables Inside Buildings and 27 11 19  Communications Termination Blocks and Patch Panels.


27 11 20 TERMINALS AND CONNECTORS FOR COMMUNICATIONS CONDUCTORS - ENTRANCE FACILITY

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 27 11 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16211 - Terminals And Connectors For Communications Conductors - Entrance Facility in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies telephone drop, underground telephone, coaxial, optical-fibre terminals and their installation.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Most exchange and toll cable installations will be done by telephone authority; these are not covered in this Section. This Section is applicable to inter-building cables such as those installed on a campus.


27 31 00 Voice Communications Switching and Routing Equipment

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
336573 - CONCRETE ENCASED DUCT BANKS AND MANHOLES
337116
336576 - DIRECT BURIED UNDERGROUND CABLE DUCTS
270528 - Pathways for Communications Systems
271120 - TERMINALS AND CONNECTORS FOR COMMUNICATIONS CONDUCTORS - ENTRANCE FACILITY
061000 - ROUGH CARPENTRY

Notes:

This Section 27 31 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16720 - Incoming Telephone Service in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies materials and installation procedures for incoming telephone service.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This specification is based on the assumption that CSA T530, Commercial Building Standard for Telecommunications Pathways and Spaces (Adopted ANSI/TIA/AIA-569A) will be used as a guide. It is further recommended that the latest issue of "Telecommunications Distribution Methods Manual" (TDMM), 9th Edition, published by Building Industry Consulting Service International (BICSI) be also used as a guide.

This specification is based on assumption that routing and layout of incoming telephone service entrance facilities, including dimensions, clearances, sizes, type, quantities of ducts, conduit, equipment, will be indicated on drawings.

Ensure installation of duplex receptacle in each telephone room.

Co-ordinate with telephone authority or telecommunication provider to determine requirements for main telephone terminal room, equipment rooms, satellite terminal closets, antenna facilities ducts and conduits.


27 51 16 Public Address and Mass Notification Systems

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS
275320 - MASTER TV ANTENNA

Notes:

This Section 27 51 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16724 - Public Address System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and installation for public address loudspeaker system in various configurations including paging and music operations.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This specification is based on assumption that location of equipment, riser diagram, block diagram indicating components, sequence of operations, will be indicated.


27 51 23 Intercommunications and Program Systems

Date: 2004/03/31

Related sections:

260501
017419
017800 - CLOSEOUT SUBMITTALS

Notes:

This Section 27 51 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16723 - Intercom, Interphone System in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, master and sub-stations, power supply and installation for an intercom, interphone system.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This specification is based on assumption that riser diagram, talk paths are shown on drawings. This specification covers a basic intercom system only. Where more elaborate systems are required, make changes to suit.

Coordinate with DFC 410 for high rise communication systems and other related systems.


27 52 24 Nurses Call Systems

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017419

Notes:

This Section 27 52 24 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16722 - Nurses Call in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies both audio visual and voice two way communication between central nursing location and patient nursing location and patient bedside, emergency, staff, duty stations.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that system block diagram, schematic, wiring, interconnection diagrams, detailed system description, quantity of equipment, dimensioned layout of components, will be indicated on drawings.


27 53 13 CLOCK SYSTEMS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes Master Time Clock, Program Control Unit(s), Electronic Transmitting Unit(s), Electronic Indicating Clocks, Direct Read Clock(s), Signalling Device(s), Fabrication and Installation.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


27 53 20 MASTER TV ANTENNA

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 27 53 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16851 - Master Tv Antenna in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the antenna, guys, equipment and installation required for a complete master TV antenna.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is based on assumption that location and details of antenna, guys, amplifier, conduit and cables will be indicated on drawings.


28 13 00 ACCESS CONTROL

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the components for a complete security access control system, including door locking, control/release and answering to form a complete and operating Door Release System (DRS).

This Section identifies performance criteria for use as a benchmark for construction of a complete security access control system. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 13 19 ACCESS CONTROL SYSTEMS INFRASTRUCTURE

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes monitor and control units, hardware and sequences of operation.

This Specification is based on assumption that location of control unit, monitor unit and tour stations, circuits and wiring requirements will be indicated on drawings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 13 27 SECURITY DOOR SUPERVISION

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260531 - SPLITTERS, JUNCTION, PULL BOXES AND CABINETS
260500 - COMMON WORK RESULTS FOR ELECTRICAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies control panel, door switches, terminal cabinets and blocks, end-of-line resistors, alarm and system operation.

This specification is based on assumption that control panel, door switches, alarms and riser diagram to indicate circuits and wiring requirements will be indicated on drawings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 13 28 BUILDING ENTRANCE CONTROL SYSTEM

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies building entrance control panel(s), door opener(s), suite stations, features and installation for dial up based telephone systems and no telephone line switching systems.

This specification is based on assumption that riser diagram, block diagram will be indicated on drawings.

Co-ordinate this Section with other relevant sections dealing with building Energy Monitoring and Control System (EMCS) found in Division 25.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 16 00 INTRUSION DETECTION

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the intrusion detection system consisting of a control panel, detection accessories, communications and environmental monitoring.

This Section identifies performance criteria for use as a benchmark for construction of a complete intrusion detection system.  Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 23 00 VIDEO SURVEILLANCE

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies video monitoring components configured as a system, which perform functions related to image acquisition, video display and recording images.

This Section identifies performance criteria for use as a benchmark for the supply and installation of a complete video surveillance system. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28 31 00 FIRE DETECTION AND ALARM

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies fire alarm systems. For multiplex systems refer to Section 28 31 00.01 - Multiplex Fire Alarm System.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 28 31 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13851 - Fire Alarm Systems in accordance with MasterFormat 1995.


28310001 MULTIPLEX FIRE ALARM SYSTEM
28 31 00.01 MULTIPLEX FIRE ALARM SYSTEM

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
283100 - FIRE DETECTION AND ALARM
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies materials, installation procedures and accessories for multiplex fire alarm systems.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


28310002 MULTIPLEX FIRE ALARM AND VOICE COMMUNICATION SYSTEMS
28 31 00.02 MULTIPLEX FIRE ALARM AND VOICE COMMUNICATION SYSTEMS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
283100 - FIRE DETECTION AND ALARM
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies a fully supervised, microprocessor-based, fire alarm and voice communication system, utilizing digital techniques for data control and digital, and multiplexing techniques for data transmission.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


31000001 EARTHWORK - SHORT FORM
31 00 00.01 EARTHWORK - SHORT FORM

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
013521 - LEED REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies fill materials, clearing and grubbing, excavation, backfilling, and grading, and is intended for small projects.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


31 00 99 EARTHWORK FOR MINOR WORKS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies fill materials, clearing and grubbing, excavation, backfilling, and grading, and is intended for small projects.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Nursery Landscape Association (CNLA) and the Canadian Society of Landscape Architects (CSLA).

This Section is an abridged version of Sections 31 05 16 - Aggregate Materials, 31 11 00 - Clearing and Grubbing, 31 23 33.01 - Excavating, Trenching and Backfilling and 31 22 13 - Rough Grading and is intended for Government - MINOR WORKS contracts. This Section may not include all the information to adequately describe the complete scope of work for all projects and must be edited by deleting or adding the appropriate information from the complete Sections noted above.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


31 04 31 HISTORIC - SUBGRADE SHORING AND BRACING

Date: 2007/12/31

Related sections:

013521 - LEED REQUIREMENTS
013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
060573 - WOOD TREATMENT

Notes:

SUPPORT: This Section has been developed by the contribution of the Public Works and Government Services Canada Technical and Peer Review Committee, a national committee of conservation specialists.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


31 05 10 CORRECTED MAXIMUM DRY DENSITY FOR FILL

Date: 2006/12/31

Related sections:

Notes:

DESCRIPTION: This Section specifies the definition for the correction to maximum dry density to take into account aggregate particles larger than (19) (4.75) mm.


31 05 16 Aggregate Materials

Date: 2003/12/31

Related sections:

Notes:

This Section 31 05 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02701 - Aggregates: General in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies general requirements for supplying and processing of aggregates to be stockpiled or incorporated into work. Requirements for physical properties of various types of aggregate are given in related work Sections.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Always use this Section in conjunction with those Sections involving aggregates.


31091601 PILE DRIVING TEMPLATES
31 09 16.01 PILE DRIVING TEMPLATES

Date: 2006/12/31

Related sections:

017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and installation, removal or protection of both temporary and permanent pile drive templates.

Pile driving templates are not normally designed by Departmental Representative/Engineer/Consultant. Templates are part of construction procedure and, in this case, no measurement for payment is considered necessary. Where the nature of the structure is such that certain procedures and precautions are considered necessary in pile driving, or template is to remain as part of permanent structure, templates and performance of templates may be designed by Departmental Representative/Engineer/Consultant and specified as part of the Contract. Fabrication, positioning, adaptation, and removal will be considered incidental to the Work. In the case where templates are designed and specified, they should be measured separately for payment either by lump sum or unit price.


31091628 PILE TESTS
31 09 16.28 PILE TESTS

Date: 2006/09/30

Related sections:

017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the test procedures and evaluation for piles.

Departmental Representative/Engineer/Consultant should decide if testing is required. In general, small projects with relatively uniform soil conditions where complex loads are not being applied, cost of pile load tests may not result in significant cost savings.

This Section 31 09 16.28 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02452 - Pile Tests in accordance with MasterFormat 1995.


31 11 00 CLEARING AND GRUBBING

Date: 2006/06/30

Related sections:

013529
015100 - TEMPORARY UTILITIES
015200 - CONSTRUCTION FACILITIES
312316
013543 - ENVIRONMENTAL PROCEDURES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for clearing, close cut clearing, grubbing and clearing isolated trees.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 31 11 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02231 - Clearing and Grubbing in accordance with MasterFormat 1995.


31 14 13 SOIL STRIPPING AND STOCKPILING

Date: 2006/06/30

Related sections:

015100 - TEMPORARY UTILITIES
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the environmentally responsible procedures for the stripping and preservation of topsoil.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Topsoil that has been correctly stockpiled will smell of clean earth. If the stored topsoil smells of decay or is strongly odoriferous the agricultural potential of the soil has been destroyed and soil amendments must be added to restore the agricultural function.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 31 14 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02233 - Preservation of Topsoil in accordance with MasterFormat 1995.


31 22 13 Rough Grading

Date: 2000/12/31

Related sections:

312333

Notes:

This Section 31 22 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02311 - Site Grading in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies stripping of topsoil, grading, testing and the removal of surplus material.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA).

ENVIRONMENTAL: This sections specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31 22 14 AIRFIELD GRADING

Date: 2004/09/30

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
334616 - Subdrainage Piping

Notes:

This Section 31 22 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02312 - Airfield Grading in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for the grading of airfield areas to lines, grades and typical cross-sections shown on plans or established by the Departmental Representative/ Engineer/Consultant and requirements for the compaction of pavement subgrade surfaces.

SUPPORT: This Section has been reviewed and updated with the assistance of A4 Airfield Engineers; 1 Canadian Air Division Headquarters; Winnipeg, Manitoba.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31221613 ROADWAY SUBGRADE RESHAPING
31 22 16.13 ROADWAY SUBGRADE RESHAPING

Date: 2004/09/30

Related sections:

312413 - ROADWAY EMBANKMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 31 26 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02336 - Reshaping Roadway Subgrade in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for recompacting and reshaping of existing subgrade, to lines, grades and typical cross-sections indicated or as established by Departmental Representative/Engineer/Consultant.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31231626 ROCK REMOVAL
31 23 16.26 ROCK REMOVAL

Date: 2009/12/31

Related sections:

012100 - ALLOWANCES
012900 - PAYMENT PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
013521 - LEED REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
31233301 - EXCAVATING, TRENCHING AND BACKFILLING
017411 - CLEANING
015600 - TEMPORARY BARRIERS AND ENCLOSURES

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

If rock removal or blasting may interfere with foundations of adjacent buildings, roads, and other structures, specify in Division 01 that Contractor take photographs to record existing conditions and that they be reviewed with Departmental Representative/DCC Representative/Consultant before construction is started. Provide description of all structures likely to be affected. Describe buildings inside and out.

If rock removal operations may interfere with foundations of adjacent buildings specify in Division 01 that Contractor, Departmental Representative/DCC Representative/Consultant to conduct a site condition survey including photographs of adjacent buildings, before commencing blasting and investigate foundations to determine underpinning/shoring required.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


31233301 EXCAVATING, TRENCHING AND BACKFILLING
31 23 33.01 EXCAVATING, TRENCHING AND BACKFILLING

Date: 2006/09/30

Related sections:

312316
135290
313219
015200 - CONSTRUCTION FACILITIES
024113 - Selective Site Demolition
015600 - TEMPORARY BARRIERS AND ENCLOSURES
013529
024116 - STRUCTURE DEMOLITION
024121 - DECONSTRUCTION OF STRUCTURES
320190
013543 - ENVIRONMENTAL PROCEDURES
310510 - CORRECTED MAXIMUM DRY DENSITY FOR FILL
331116 - Site Water Utility Distribution Piping
333113 - Public Sanitary Utility Sewerage Piping
333400 - Sanitary Utility Sewerage Force Mains
334100 - Storm Utility Drainage Piping

Notes:

DESCRIPTION: This Section specifies requirements for excavating, trenching and backfilling for structures, pipe-lines, sewers, conduits and appurtenances.

When Section 31 23 16.26 - Rock Removal is used, delete all references to rock excavation in this Section.

If proposed excavation interferes with foundations of adjacent buildings specify in Division 1 that contractor, Departmental Representative, Engineer or Consultant to conduct a condition survey, including photographs of adjacent buildings, before beginning excavation and investigate foundations to determine underpinning, and related works required.

For Private Sector add sub-bases including fill and compaction for roadwork, plus bearing piles where piles will be driven first, then excavation done between.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 31 23 33.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02315 - Excavating, Trenching and Backfilling in accordance with MasterFormat 1995.


31 24 13 ROADWAY EMBANKMENTS

Date: 2004/09/30

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
329119

Notes:

This Section 31 24 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02317 - Roadway Excavation Embankment and Compaction in accordance with MasterFormat 1995.

SUPPORT: This Section has been reviewed and updated with the assistance of Ontario Road Builders' Association; Mississauga, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section specifies requirements for roadway excavation, borrow excavation, and embankment construction for small projects. Use equivalent provincial DOT specification for larger projects.


31311913 CHEMICAL VEGETATION CONTROL
31 31 19.13 CHEMICAL VEGETATION CONTROL

Date: 2006/09/30

Related sections:

028101 - HAZARDOUS MATERIALS
013529
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the requirements for the application of herbicides for weed control, brush control, stump control and soil sterilization.

ENVIRONMENTAL: Many types of undesired vegetation (weeds) can be controlled by encouraging the growth of desired vegetation (grass). Desired vegetation can be encouraged through a comprehensive maintenance program which includes the application of fertilizers that will encourage growth.

The Standard for Pesticide Education, Training and Certification in Canada (referred to as the National Standard) consists of a series of documents that outline the structure and criteria for applicator and vendor certification programs in Canada.  Each province has its own certification program for pesticide applicators and vendors. These programs are regulated by the provincial pesticide regulatory agencies but may be delivered via educational institutions. The territories do not have their own certification programs, but recognize certification from other provinces. Please contact the appropriate provincial or territorial pesticide regulatory agency for further information.

This Section 31 31 19.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02361 - Chemical Control of Vegetation in accordance with MasterFormat 1995.


31321319 LIME SOIL STABILIZATION
31 32 13.19 LIME SOIL STABILIZATION

Date: 2006/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
312413 - ROADWAY EMBANKMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for stabilizing soil subgrade by applying hydrated lime, mixing and compacting.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

This Section 31 32 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02341 - Lime Soil Stabilization in accordance with MasterFormat 1995.


31321901 GEOTEXTILES
31 32 19.01 GEOTEXTILES

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
312333

Notes:

This Section 31 32 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02072 - Geotextiles in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supply and installation of geotextile material. Polymeric geotextiles may be used in revetments, breakwaters, retaining wall structures, filtration, drainage structures, roadbeds and railroad beds for separation purposes to prevent mixing of granular materials of different grading; as hydraulic filters permitting passage of water while retaining soil strength of a granular structure.

SUPPORT: This Section has been reviewed and updated with the assistance of PWGSC/RPS/AES/Civil Engineering Directorate staff.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31321902 GEOMEMBRANES
31 32 19.02 GEOMEMBRANES

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This Section 31 32 22 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02073 - Geomembranes in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supply and installation of geomembranes for use in waste water ponds, sewage lagoons, landfill and other containment structures as an impermeable membrane. Section is developed for thermoplastic membranes. Modify to suit if elastomeric or bituminous membranes are to be used.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31321913 GEOGRID SOIL STABILIZATION
31 32 19.13 GEOGRID SOIL STABILIZATION

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
312333

Notes:

This Section 31 32 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02071 - Geogrid Soil Reinforcement in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for polymeric geogrid material. Geogrids may be used in revetments, breakwaters, retaining structures, embankments, roadbeds and railroad beds as reinforcement to provide tensile strength to a soil mass.

SUPPORT: This Section has been reviewed and updated with the assistance of PWGSC/RPS/AES/Civil Engineering Directorate staff.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31 36 00 Gabions

Date: 2002/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
312333

Notes:

This Section 31 36 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02372 - Gabions in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supply and installation of baskets and/or mats fabricated from wire mesh or geogrids filled with stone. A gabion structure consists of a number of baskets or mats connected together so that joints between baskets and/or mats are as strong as mesh, making a monolithic structure.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


31 36 19 GABION MATTRESSES

Date: 2005/03/31

Related sections:

135290

Notes:

DESCRIPTION: This Section specifies requirements for supply, placement, and protection of a layer or layers of graded crushed quarry rock laid and screened to a level surface under water to provide a uniform bearing surface for support of concrete caissons or timber cribs.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the Construction and Verification, co-ordinate with Section 01 35 43 - Environmental Procedures, Section 03 30 00 - Cast-in-Place Concrete and Section 35 20 23 - Dredging.

This Section 31 36 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02373 - Crushed Rock Mattress in accordance with MasterFormat 1995.


31 37 00 Rip-Rap

Date: 2001/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
313219

Notes:

This Section 31 37 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02371 - Rip-Rap in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies stone, cement mortar and geotextiles for armour, heavy, random and hand placed rip-rap.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


31531301 TIMBER CRIBWORK
31 53 13.01 TIMBER CRIBWORK

Date: 2006/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
313619 - GABION MATTRESSES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies timber fastenings, fabrication, placing and ballasting of timber cribwork.

ENVIRONMENTAL: Chemical wood preservatives are used to enhance wood durability. Most chemicals registered with Agriculture Canada as wood preservatives are classed as very toxic and potentially hazardous pesticides. Although, the potency of these products varies from product to product all are poisonous to some degree, and if misused can be potentially hazardous to humans and other forms of life.

This Section 31 53 13.01 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02261 - Timbre Cribwork in accordance with MasterFormat 1995.


31 61 13 PILE FOUNDATIONS, GENERAL REQUIREMENTS

Date: 2006/09/30

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
316324 - COMPACTED EXPANDED-BASE CONCRETE PILES
310916
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, equipment, drive and testing requirements for the driving of piles. This Section also includes text for pile driving analyzer.

This Section 31 61 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02451 - Pile Foundations, General in accordance with MasterFormat 1995.


31621319 PRECAST CONCRETE PILES
31 62 13.19 PRECAST CONCRETE PILES

Date: 2007/03/31

Related sections:

310916
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
033300
017411 - CLEANING

Notes:


31621613 STEEL SHEET PILES
31 62 16.13 STEEL SHEET PILES

Date: 2004/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
312333
316113 - PILE FOUNDATIONS, GENERAL REQUIREMENTS

Notes:

This Section 31 62 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02456 - Steel Sheet Piling in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and installation for sheet, continuous interlocking flat web and continuous interlocking steel sheet piles.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


31621614 STEEL SHEET PILE CELLS
31 62 16.14 STEEL SHEET PILE CELLS

Date: 2006/09/30

Related sections:

316216
310516 - Aggregate Materials
316113 - PILE FOUNDATIONS, GENERAL REQUIREMENTS
310916
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for construction of circular or diaphragm type steel sheet pile cellular structures.

When this Section is used, it must be accompanied by  Section 31 62 16.13 - Steel Sheet Piling.

This Section 31 62 16.14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02467 - Steel Sheet Pile Cells in accordance with MasterFormat 1995.


31621616 STEEL H PILES
31 62 16.16 STEEL H PILES

Date: 2006/12/31

Related sections:

017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, fabrication, protective coatings, welding and installation for steel H  piles.


31621619 UNFILLED TUBULAR STEEL PILES
31 62 16.19 UNFILLED TUBULAR STEEL PILES

Date: 2006/12/31

Related sections:

310916
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE

Notes:

DESCRIPTION: This Section specifies the materials, fabrication, protective coatings, welding and installation for steel pipe piles.


31 62 19 TIMBER PILES

Date: 2006/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
060573 - WOOD TREATMENT
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, preparation and installation of timber piles.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


31 63 19 Bored And Socketed Piles

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
316113 - PILE FOUNDATIONS, GENERAL REQUIREMENTS
316319 - Bored And Socketed Piles
033726 - Underwater Placed Concrete

Notes:

This Section 31 63 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02476 - Fixed End Caisson Piles (Rock Socketed) in accordance with MasterFormat 1995.

DESCRIPTION: This Section includes materials installation and Measurement for Payment requirements for fixed end caisson piles.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.


31631913 ROCK SOCKETS FOR PILES
31 63 19.13 ROCK SOCKETS FOR PILES

Date: 2006/09/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
033726 - Underwater Placed Concrete
017411 - CLEANING

Notes:

This Section 31 63 19.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02466 - Rock Sockets for Piles in accordance with MasterFormat 1995.


31 63 23 BORED CONCRETE PILES

Date: 2006/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
033726 - Underwater Placed Concrete
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, fabrication, protective coatings, welding and installation for bored concrete piles.


31 63 24 COMPACTED EXPANDED-BASE CONCRETE PILES

Date: 2006/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, driving, testing and records for compacted expanded-base concrete piles.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.


31632616 CONCRETE CAISONS FOR MARINE CONSTRUCTION
31 63 26.16 CONCRETE CAISONS FOR MARINE CONSTRUCTION

Date: 2006/12/31

Related sections:

032000 - CONCRETE REINFORCING
313619 - GABION MATTRESSES
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
034100 - PRECAST STRUCTURAL CONCRETE
310000
352023 - DREDGING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for construction and installation of concrete caisson structures where construction is entirely or partially carried out while afloat. Construction of base slab and sufficient wall height to provide positive buoyancy may be carried out in dry dock, on launch way or submersible barge and remaining walls completed while afloat. Alternative methods of construction to be proposed and permitted if approved.


32011101 Pavement Cleaning and Marking Removal
32 01 11.01 Pavement Cleaning and Marking Removal

Date: 2002/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 32 01 12 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02722 - Pavement Surface Cleaning and Removal of Pavement Markings in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials for pavement cleaning as well as the methods for the removal of pavement markings and surface cleaning.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

On badly cracked pavements or those with excessive amounts of rubberized or other crack sealer, removal of sealer and/or filling of cracks may be required prior to overlay or slurry seal. See Section 32 01 11.02 - Pavement Crack (Cleaning and) Filling.


32011102 PAVEMENT CRACK CLEANING AND FILLING
32 01 11.02 PAVEMENT CRACK CLEANING AND FILLING

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
321216 - Asphalt Paving

Notes:

This Section 32 01 28 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02983 - Pavement Crack Cleaning and Filling in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials and installation  intended for use when preparing asphalt concrete or Portland cement concrete pavement surfaces prior to surface treatments, slurry seals or thin overlays.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Removal of existing crack sealer, particularly from wide cracks is frequently required due to tendency to bleed through an overlay. Designer should examine pavement to determine if type or amount of existing sealant necessitates its removal.

This Section requires specifier to select type or types of sealing mix and method of application for each type and specify measurement for payment item or items to suit.


32011301 FLEXIBLE PAVING SURFACE TREATMENT - SINGLE APPLICATION
32 01 13.01 FLEXIBLE PAVING SURFACE TREATMENT - SINGLE APPLICATION

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
310516 - Aggregate Materials
320111
015600 - TEMPORARY BARRIERS AND ENCLOSURES
017411 - CLEANING

Notes:

This Section specifies requirements for a single application of asphalt material followed by a single application of aggregate to an existing paved surface or a granular base.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32011302 FLEXIBLE PAVING SURFACE TREATMENT - MULTIPLE APPLICATION
32 01 13.02 FLEXIBLE PAVING SURFACE TREATMENT - MULTIPLE APPLICATION

Date: 2010/06/30

Related sections:

015600 - TEMPORARY BARRIERS AND ENCLOSURES
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
310516 - Aggregate Materials
015200 - CONSTRUCTION FACILITIES
320111
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for applying double or triple alternate applications of asphalt and aggregate to an existing paved surface or a granular base.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32011601 Flexible Paving Surface Grooving
32 01 16.01 Flexible Paving Surface Grooving

Date: 2002/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 32 01 27 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02981 - Pavement Surface Grooving in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for cutting of grooves in a pavement surface for improvement of vehicle braking performance during wet conditions.

SUPPORT: This Section developed by PWGSC/RPS/AES/Civil Engineering Directorate.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32011613 RESHAPING ASPHALT PAVEMENT
32 01 16.13 RESHAPING ASPHALT PAVEMENT

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials

Notes:

This Section 32 12 53 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02747 - Reshaping Asphalt Pavement in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for scarifying and reshaping existing asphalt pavement with addition of new granular base material where required, to lines, grades and cross-sections indicated, or as established by Engineer/Consultant. If repair of soft areas is anticipated, specify herein as required.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32 01 18 ROUTING AND SEALING PAVEMENT CRACKS

Date: 2003/12/31

Related sections:

Notes:

This Section 32 01 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02982 - Routing And Sealing Pavement Cracks in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies maintenance used primarily for sealing cracks in existing pavements. Use Section 32 01 11.02 - Pavement Crack Cleaning and Filling for crack sealing in preparation for overlay.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Do not use this Section if the pavement is programmed for a hot mix overlay within one year.


32019033 TREE AND SHRUB PRESERVATION
32 01 90.33 TREE AND SHRUB PRESERVATION

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013529
329220
329221
329345

Notes:

DESCRIPTION: This Section specifies fertilizing and preserving root systems of plants affected by changing grades or excavation.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

ENVIRONMENTAL: Location of utility cables and lines should not be planned to run under or near treed areas. Future excavations for repairs and refits will damage the root systems of planned trees and shrubbery.

ENVIRONMENTAL: If chemical fertilizers are to be used the following guidelines will be used to address the toxicity levels.

ENVIRONMENTAL: Nitrogen Fertilizers: ammonium nitrate, monoammonium phosphate and ammonium sulphate have similar toxicity levels and are considered much safer than anhydrous ammonia, aqua ammonia or urea. Diammonium phosphate is more toxic than monoammonium phosphate but less toxic than urea.

ENVIRONMENTAL: Phosphate Fertilizers: phosphate fertilizers are usually low in toxicity as a large percentage of the phosphate is precipitated into the soil before the phosphates reach the roots. Normally there is not a safe limit set for the rate that phosphates can be applied. However it should be noted that phosphates encourage seed germination and an application high in phosphates will encourage the germination of undesired vegetation along with desired vegetation.

ENVIRONMENTAL: Potash Fertilizers: Muriate of potash (KCl ) is the most common source of potassium in fertilizers and is less toxic than most nitrogen fertilizers. Sulphate of potash (K2SO4) is less toxic than Muriate of potash. Sulphate of potash-magnesia has approximately the same toxicity per unit of potassium as Muriate of potash. Potassium nitrate is one of the safer sources of potassium. Fertilizers containing micro-nutrients (boron, copper, iron manganese or zinc) are more toxic than the same grades of product manufactured without micro-nutrients. Boron is particularly toxic and should not be applied.

Alteration of plant root zone conditions will affect health and survival of plants. Consult arborist to ensure most appropriate method is chosen.

Maintenance performed one year prior to construction will contribute to plant health and survival. This could include fertilization, watering, root and branch pruning.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 32 01 90.33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02901 - Tree and Shrub Preservation in accordance with MasterFormat 1995.


32111601 Granular Sub-base
32 11 16.01 Granular Sub-base

Date: 2002/12/31

Related sections:

312214 - AIRFIELD GRADING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
310516 - Aggregate Materials
321123 - Aggregate Base Courses

Notes:

This Section 32 11 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02723 - Granular Sub-base in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies requirements for supplying, producing and placing gravel or quarried stone as a granular sub-base to lines, grades and typical cross sections indicated on plans or as directed by Engineer/Consultant.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32 11 17 RESHAPING GRANULAR ROADBED

Date: 2004/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
310516 - Aggregate Materials

Notes:

This Section 32 11 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02748 - Reshaping Granular Roadbed in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for scarifying and reshaping of existing granular roadbed with addition of new granular base material where required, to lines, grades and typical cross-sections indicated or as established byDepartmental Representative/ Engineer/Consultant.

SUPPORT: This Section has been reviewed and updated with the assistance of the  Ontario Road Builders' Association, Mississauga, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32 11 23 Aggregate Base Courses

Date: 2002/12/31

Related sections:

312214 - AIRFIELD GRADING
321116
310516 - Aggregate Materials
017419

Notes:

This Section 32 11 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02721 - Granular Base in accordance with MasterFormat 1995.

This Section 02721 is presently numbered to meet the MasterFormat 1995 classification system. Beginning with the January 2005 update, this NMS section will be published as Section 32 11 23 in accordance with the recommendations of the MasterFormat 2004 classification system.

DESCRIPTION: This section specifies requirements for supplying, producing and placing crushed gravel or quarried stone as a granular base to lines, grades and typical cross sections indicated, or as directed by Engineer/Consultant.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32 11 33 CEMENT-TREATED BASE COURSES

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for producing, placing and curing centrally mixed or mixed-in-place cement stabilized granular base on prepared granular sub-base or base.

Edit this Section to cover centrally mixed or mixed-in-place operation as applicable to project requirements.


32 12 10 MARSHALL IMMERSION TEST FOR BITUMEN

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES

Notes:

This section is primarily used for airfield pavements in conjunction with Section 32 12 16 - Asphalt Paving.


32121316 ASPHALT TACK COATS
32 12 13.16 ASPHALT TACK COATS

Date: 2003/12/31

Related sections:

Notes:

This Section 32 12 15 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02746 - Asphalt Tack Coat in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for application of an asphalt tack coat to an existing asphalt or concrete surface prior to asphalt paving.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.


32121323 ASPHALT PRIME COATS
32 12 13.23 ASPHALT PRIME COATS

Date: 2003/12/31

Related sections:

012900 - PAYMENT PROCEDURES
013300 - SUBMITTAL PROCEDURES

Notes:

This Section 32 12 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02745 - Asphalt Prime in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for the application of an asphalt prime to a granular base surface prior to asphalt paving.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.


32 12 16 Asphalt Paving

Date: 2003/12/31

Related sections:

011100 - SUMMARY OF WORK
024113 - Selective Site Demolition
310516 - Aggregate Materials
321210 - MARSHALL IMMERSION TEST FOR BITUMEN
321117 - RESHAPING GRANULAR ROADBED
320111
321213

Notes:

This Section 32 12 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02741 - Hot Mix Asphalt Concrete Paving in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies asphalt concrete paving for roads and airport runways. Edit to suit project.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Reclaimed asphalt pavement (RAP) may be incorporated into hot mix asphalt concrete provided all requirements of this section are met. Where RAP is not specified, delete all requirements and unnecessary wording for RAP.


32121601 Asphalt Paving - Short Form
32 12 16.01 Asphalt Paving - Short Form

Date: 2003/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 32 12 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02743 - Asphalt Concrete Paving - Short Form in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies asphalt concrete paving for roads and is intended for small Projects.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Reclaimed asphalt pavement (RAP) may be incorporated into hot mix asphalt concrete provided all requirements of this Section are met.


32121602 Asphalt Paving for Building Sites
32 12 16.02 Asphalt Paving for Building Sites

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials
321210 - MARSHALL IMMERSION TEST FOR BITUMEN
321213

Notes:

DESCRIPTION: This Section specifies asphalt concrete pavement, including granular base and granular sub-base if applicable, for car park areas, driveways to buildings, bikeways and walks or play areas.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32121616 Road-Mix Asphalt Paving Wearing Courses
32 12 16.16 Road-Mix Asphalt Paving Wearing Courses

Date: 2004/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
310516 - Aggregate Materials
321117 - RESHAPING GRANULAR ROADBED

Notes:

This Section 32 12 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02744 - Mixed-in-Place Asphalt Paving in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for asphalt paving by mixed-in-place methods, combining aggregate and asphalt on site using motor graders and other road mixing equipment or travel plant mixing equipment.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32123614 Asphalt Seal Coat
32 12 36.14 Asphalt Seal Coat

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials
320111

Notes:

This Section 32 12 37 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02951 - Asphalt Slurry Seal Coat in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for preparing a mix of asphalt emulsion, fine aggregate and water and applying mix to an existing pavement to restore surface texture and seal surface.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.


32123616 Coal Tar Seal Coats
32 12 36.16 Coal Tar Seal Coats

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials
320111

Notes:

This Section 32 12 38 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02952 - Coal Tar Slurry Seal Coat in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for preparing mix of coal tar pitch, mineral aggregate and water, with or without rubber, and applying mixture to existing pavement surfaces to provide fuel resistant seal.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.


32 13 13 CONCRETE PAVING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
310516 - Aggregate Materials
017419
031000 - CONCRETE FORMING AND ACCESSORIES
032000 - CONCRETE REINFORCING

Notes:

DESCRIPTION: This Section specifies requirements for producing and placing Portland cement concrete for road, highway and airfield pavements.

SUPPORT: This Section has been reviewed and updated with the assistance of Cement Association of Canada, Toronto, Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

This Section 32 13 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02752 - Portland Cement Concrete Paving in accordance with MasterFormat 1995.


32131301 CONCRETE PAVING FOR BUILDING SITE
32 13 13.01 CONCRETE PAVING FOR BUILDING SITE

Date: 2007/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
310516 - Aggregate Materials
032000 - CONCRETE REINFORCING
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies cement concrete pavement including granular base for car park areas, driveways to buildings, access roads and loading dock areas. For concrete typically used for walks and play areas refer to Section 32 16 15 - Concrete Walks, Curbs and Gutters.

Fly ash is a coal combustion by product of electrical power generation.  These by-products rapidly accumulate and can cause disposal problems. Coal fly ash can be used as a component in concrete production.  Each tonne of fly ash cement used to replace one tonne of traditional cement ingredients saves one barrel of oil associated with the costs of mining materials. MTL 2004-16(TR-R) - Use of Fly Ash and Slag in Concrete: A Best Practice Guide by PWGSC and NRCan and ASTM C 618 Standard Specification for Coal Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provide two references.


32131317 ROLLER COMPACTED CONCRETE PAVEMENTS
32 13 13.17 ROLLER COMPACTED CONCRETE PAVEMENTS

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
321216 - Asphalt Paving
321123 - Aggregate Base Courses
321213
312333

Notes:

This Section 32 13 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02757 - Roller Compacted Concrete Pavements in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, mixes, equipment, placing and quality control requirements for producing and placing Roller Compacted Concrete (RCC) used for roads, highways, parking areas, storage facilities, composting areas, industrial sites and other pavements.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


32 14 10 Unit Paving on Sand Bed

Date: 2004/09/30

Related sections:

012900 - PAYMENT PROCEDURES
013300 - SUBMITTAL PROCEDURES
312213 - Rough Grading

Notes:

This Section 32 14 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02785 - Unit Paving in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies sand-set unit paving without mortared joints using clay brick pavers or granite pavers for pedestrian or light vehicular traffic, or precast concrete paving slabs or flagstone for pedestrian traffic only. See Section 32 14 13 - Precast Concrete Unit Paving for specifications on precast/interlocking concrete pavers for use in pedestrian and vehicular traffic.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Insert text from Section 31 32 19.01 - Geotextiles, in PART 2 - PRODUCTS and PART 3 - EXECUTION, if required.


32 14 13 PRECAST CONCRETE UNIT PAVING

Date: 2005/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies installation of precast concrete unit pavers by hand or with mechanical equipment, consult Interlocking Concrete Pavement Institute technical bulletin on Mechanical Installation Specification Guide, on prepared structural surface for pedestrian or vehicular traffic, and includes pavers, bedding and joint sand, edge restraints, cleaners and sealers. An interlocking pavement surface is achieved by use of dentated or rectangular shaped pavers and/or a herringbone laying pattern. See Section 32 14 10 - Unit Paving on Sand Bed for precast concrete paving slab specifications.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Pavement thicknesses should be designed in consultation with a qualified civil engineer in accordance with local pavement design procedures, or in accordance with Tech Spec technical bulletins, construction details, and design software published by the Interlocking Concrete Pavement Institute (ICPI). Design guidelines and specifications for industrial and port applications should be referenced from ICPI manuals "Port and Industrial Pavement Design with Concrete Pavers" and "Airfield Pavement Design with Concrete Pavers (Canadian Edition)" for airport applications.

This Section 32 14 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02751 - Precast Concrete Paving in accordance with MasterFormat 1995.


32 15 40 CRUSHED STONE SURFACING

Date: 2009/12/31

Related sections:

012900 - PAYMENT PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS
312213 - Rough Grading
313219
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies crushed stone paving for light-weight vehicle use areas, driveways and pedestrian walks.  It is not intended to cover roads or running tracks.

The following Section contains text that may be required to complete Section 31 32 19.01 - Geotextiles.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32 15 60 ROADWAY DUST CONTROL

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for supply and application of aqueous calcium chloride, flake calcium chloride and water for alleviation or prevention of dust nuisance caused by traffic. Choose appropriate method required for project and edit to suit.

Other dust palliatives such as ligno sulphurates may be suitable under certain conditions. Refer to TAC (Transportation Association of Canada) Guidelines for Cost Effective Use and Application of Dust Palliatives, 1987, for requirements.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32 16 15 CONCRETE WALKS, CURBS AND GUTTERS

Date: 2006/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014721
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
310516 - Aggregate Materials
312333
017411 - CLEANING

Notes:

When Section 32 13 13.01 - Concrete Paving for Building Site is used, delete references to walks.

This Section specifies requirements for constructing cement concrete walks, curbs and gutters to lines, grades, dimensions and typical cross-sections indicated or directed.


32 17 23 PAVEMENT MARKINGS

Date: 2009/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015600 - TEMPORARY BARRIERS AND ENCLOSURES
320111
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32210001 Well Pumps
32 21 00.01 Well Pumps

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
332100 - Water Supply Wells

Notes:

This Section 33 21 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 11211 - Well Pump Systems in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the well, submersible, shallow and deep well jet pumps, storage and pressure tanks and the installation for a complete well and pump system.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32 31 13 CHAIN LINK FENCES AND GATES

Date: 2004/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013529
014713 - SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
033000 - CAST-IN-PLACE CONCRETE
260527 - GROUNDING - PRIMARY
099113 - EXTERIOR PAINTING

Notes:

This Section 32 31 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02821 - Chain Link Fences and Gates in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, construction and installation for chain link fences and gates.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.

SUSTAINABLE: Fly ash is a coal combustion by product of electrical power generation.  These by-products rapidly accumulate and can cause disposal problems.  Fly ash can be used as a component in cement/concrete production. Each tonne of fly ash cement used to replace one tonne of traditional cement/concrete ingredients saves one barrel of oil associated with the cost of mining materials.  ASTM C 618 Standard Specification for Coal Ash Fly Ash and Raw or Calcined Natural Pozzolan for Use as a Mineral Admixture in Concrete provides a reference.


32 31 26 WIRE FENCES AND GATES

Date: 2004/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017419
033000 - CAST-IN-PLACE CONCRETE
099113 - EXTERIOR PAINTING

Notes:

This Section 32 31 26 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02822 - Wire Fences and Gates in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies wire fencing, gates, wood and steel posts used in the construction of wire fences

SUPPORT: This Section has been reviewed and updated with the assistance of Canadian Fence Industry Association, Montreal, Québec.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32321313 Packaged Sewage Lift, Wet Well Type
32 32 13.13 Packaged Sewage Lift, Wet Well Type

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
075550
034100 - PRECAST STRUCTURAL CONCRETE
033000 - CAST-IN-PLACE CONCRETE
312333

Notes:

This Section 33 32 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 11391 - Packaged Sewage Lift Station - Wet Well Type in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies a fully automatic wet well sewage lift station consisting of duplex submersible pumps mounted on rail system. Controlled by a series of liquid level bulbs. System includes pumps, time delay relays in control circuits, water level controls, location of system control station and the installation for a complete wet well sewage lift station.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Where emergency standby power is required for project, edit to suit.


32 32 26 METAL CRIB RETAINING WALLS

Date: 2010/12/31

Related sections:

312333
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This section specifies requirements for supply and erection or erection only of pre-fabricated steel members, field assembled into a series of connected closed-face cells, for construction of metal crib retaining walls to lines and grades as indicated.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32 32 34 REINFORCE SOIL RETAINING WALLS

Date: 2010/12/31

Related sections:

312333
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
034500 - Precast Architectural Concrete
313219
334616 - Subdrainage Piping
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for reinforced soil type retaining wall systems, consisting of precast facing panels and metal strip, wire mesh or geogrid soil reinforcing elements.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


32 37 00 Exterior Site Furnishings

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS

Notes:

This Section 32 37 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02870 - Site Furnishings in accordance with MasterFormat 1995.

DESCRIPTION: This section specifies standard manufactured catalogue items such as waste containers, benches, planters, tables, bike racks and playground equipment.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


32911913 TOPSOIL PLACEMENT AND GRADING
32 91 19.13 TOPSOIL PLACEMENT AND GRADING

Date: 2006/09/30

Related sections:

012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
013216
015100 - TEMPORARY UTILITIES
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies topsoil, topsoil amendments, the stripping of topsoil, the preparation of existing grades, the placing of topsoil and finish grading.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA) and the Commercial Landscape Association of Eastern Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Restoring natural ecology: the site ecology can be enhanced by: examining existing water courses and drainage patterns across the site; understanding natural behaviour of the ecosystem embracing the site; considering ecological aspects of the site affected by building; creating critical connections to any adjacent habitats; establishing biodiversity; supplementing existing natural vegetation; retaining and filtering storm water on site; clustering plants; and considering plant root systems. Using site rainwater. Specify methods for effective site rainwater use from the following: rainwater can be used more effective by: using materials for walkways and parking areas which slow down run-off by allowing the water to percolate into the soil; focusing the flow of water by grading the site; storing water on the site; and handling rainwater in visible surface channels integrated with the landscaping rather than in buried pipes.

LEED REQUIREMENTS: This Section includes general requirements and procedures for compliance with certain LEED prerequisites and credits in accordance with the Canadian Green Building Council (CaGBC) - LEED Canada-NC Version 1.0: Green Building Rating System For New Construction and Major Renovations.

This Section 32 91 19.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02911 - Topsoil and Finish Grading in accordance with MasterFormat 1995.


32911914 TOPSOIL PLACEMENT FOR VEGETATED ROOFS
32 91 19.14 TOPSOIL PLACEMENT FOR VEGETATED ROOFS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014713 - SUSTAINABLE REQUIREMENTS: CONCEPT DESIGN
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014719 - SUSTAINABLE REQUIREMENTS: OPERATION
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES

Notes:

DESCRIPTION: This Section specifies topsoil, topsoil amendments, stripping of topsoil, and storage for reuse.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. Restoring natural ecology: the site ecology can be enhanced by: examining existing water courses and drainage patterns across the site; understanding natural behaviour of the ecosystem embracing the site; considering ecological aspects of the site affected by building; creating critical connections to any adjacent habitats; establishing biodiversity; supplementing existing natural vegetation; retaining and filtering storm water on site; clustering plants; and considering plant root systems. Using site rainwater. Specify methods for effective site rainwater use from the following: rainwater can be used more effective by: using materials for walkways and parking areas which slow down run-off by allowing the water to percolate into the soil; focussing the flow of water by grading the site; storing water on the site; and handling rainwater in visible surface channels integrated with the landscaping rather than in buried pipes.

SUSTAINABLE: This Section specifies sustainable requirements related to the Concept Design, Construction, Verification and Operation.


32921913 MECHANICAL SEEDING
32 92 19.13 MECHANICAL SEEDING

Date: 2004/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
313119

Notes:

This Section 32 92 20 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02921 - Mechanical Seeding in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies grass seed, seed bed preparation and seed placement for mechanical seeding.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA) and the Commercial Landscape Association of Eastern Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

For PWGSC projects, maintenance for plant material during both establishment and warranty periods must be done by Contractor of this contract. Refer to Public Works Canada Interim Article re: Landscape Maintenance in Construction Contracts.


32921916 HYDRAULIC SEEDING
32 92 19.16 HYDRAULIC SEEDING

Date: 2004/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
329220
313119

Notes:

This Section 32 92 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02922 - Hydraulic Seeding in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies seed, mulch, slurry preparation and application, and maintenance for hydraulic seeding.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA) and the Commercial Landscape Association of Eastern Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

For PWC projects, maintenance for plant material during both establishment and warranty periods must be done by Contractor of this contract. Refer to Public Works Canada Interim Article re: Landscape Maintenance in Construction Contracts.


32 92 23 SODDING

Date: 2004/09/30

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
329119
313119

Notes:

This Section 32 92 23 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02933 - Sodding in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies sod, sod placement, preparation and maintenance.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA) and the Commercial Landscape Association of Eastern Ontario.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices including recycling and reuse options, and generally available disposal options.

For PWGSC projects, maintenance for plant material during both establishment and warranty periods must be done by Contractor of this contract. Refer to Public Works and Government Services Canada Interim Article re: Landscape Maintenance in Construction Contracts.


32 93 10 TREES, SHRUBS AND GROUND COVER PLANTING

Date: 2005/03/31

Related sections:

028101 - HAZARDOUS MATERIALS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013529
312213 - Rough Grading
329119

Notes:

DESCRIPTION: This Section specifies plant material, accessories, mulch, planting, tree support, mulching and maintenance.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

This Section is based on current horticultural research results including use of non-amended excavated soil for planting of individual trees and shrubs. If existing soil conditions are inadequate to sustain growth, consider planting beds, dimensions of which will be related to species selection.

For PWGSC projects, maintenance for plant material during both establishment and warranty periods must be done by Contractor of this contract. To avoid delay in issuing Final Certificate of Completion, a separate Maintenance of Plant Material Certificate of Completion shall be issued on completion of maintenance work. Refer to Public Works and Government Services Canada Interim Article No. C/AD 110/88 for instructions on changes to Tender Documents.

This Section does not address plant material with frozen root ball.

Specify edging material if required.

Ensure that plant list and soil test data are shown on drawings.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section 32 93 10 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02906 - Planting of Trees, Shrubs and Ground Covers in accordance with MasterFormat 1995.


32934301 TREE PRUNING
32 93 43.01 TREE PRUNING

Date: 2006/06/30

Related sections:

013529
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies pruning, root girdling and care of wounds.

SUPPORT: This Section has been produced jointly by the National Master Specification (NMS) Secretariat and the Canadian Nursery Landscape Association (CNLA).

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

A pre-tender meeting is advised for this Work.

ANSI-A300 recommends that specifications for tree work should always be written and administered by an arborist.

This Section 32 93 45 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02232 - Tree Pruning in accordance with MasterFormat 1995.


33 05 13 MANHOLES AND CATCH BASIN STRUCTURES

Date: 2007/03/31

Related sections:

312333
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
032000 - CONCRETE REINFORCING
310516 - Aggregate Materials
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for constructing new outfall structures, precast and cast-in-place manholes and catch basins, plus adjusting and sealing over existing ones.


33051303 TELETHERMICS PRE-FABRICATED STEEL MANHOLES
33 05 13.03 TELETHERMICS PRE-FABRICATED STEEL MANHOLES

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
210501 - COMMON WORK RESULTS FOR MECHANICAL
013216
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
330713 - TELETHERMICS - THERMAL INSULATION
336533 - TELETHERMICS - DRYABLE DRAINABLE, TESTABLE CONDUIT SYSTEMS
264200 - CATHODIC PROTECTION
312333
033000 - CAST-IN-PLACE CONCRETE
055000 - METAL FABRICATIONS
017411 - CLEANING

Notes:


33 07 13 TELETHERMICS - THERMAL INSULATION

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies insulation for telethermics - tunnel systems, conduit systems and Shallow Inverted Trench (SIT) Systems. It emphasizes increased insulation thicknesses for conservation of thermal energy in telethermics distribution piping systems. (Directly buried telethermics systems are normally insulated with loose fill type insulation. Insulated and plastic jacketted telethermics systems are normally insulated with foamed-in-place type insulation).

Use Section 23 07 15 - Thermal Insulation for Piping for insulation of piping systems inside buildings.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


33 07 16 FACTORY PRE-INSULATED PIPING SYSTEMS FOR UTILITY APPLICATIONS

Date: 2007/03/31

Related sections:

312333
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
331116 - Site Water Utility Distribution Piping
033000 - CAST-IN-PLACE CONCRETE
333400 - Sanitary Utility Sewerage Force Mains
333113 - Public Sanitary Utility Sewerage Piping
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies major components of factory applied, pre-insulated utility piping systems as well as optional freeze prevention components. Pre-insulated pipe is usually shallow buried (3 to 5 outside diameters to invert) but has been laid directly on ground surface or supported to grade above ground by various means.

It is preferable and recommended that the purchase of pre-insulated pipe systems be from single source and the specifier ensures that the Instructions to Bidders indicates this. This single source should supply and warrant the total system free from inherent defects including carrier core pipe, insulation, outer jacketing, pipe joints, fitting insulation kits and optional freeze prevention components. In addition, the single source should provide installation service and technical expertise.

Failure of piping systems due to freezing of water or wastewater will occur when fluid temperatures drop below 0.5 degrees C. Freezing does not occur when residence time of liquid in the pipeline is less than time necessary for it to cool to the freezing point.

Thermal design must allow sufficient time to restore flow before the fluid can reach this critical temperature should the system become inoperative for whatever reason. Length of time allowed depends upon ease of restoration and availability of maintenance personnel and equipment. Design freeze-up time may be less than one day for larger centres but several days for small communities.

Experience suggests that provision of active heat tracing is not generally required on gravity sanitary sewers or large diameter water mains and force mains. Also, this provision may not be required on smaller diameter mains within the public right of way provided liquid is kept moving.

Final decision on freeze protection and type of heat tracing used rests with the Departmental Representative/Engineer/Consultant and the owner/operator. Where time-to-freeze is less than 96 hours or deadend service connections are involved, active heat tracing option is recommended.


33 11 16 Site Water Utility Distribution Piping

Date: 2003/12/31

Related sections:

312333
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
032000 - CONCRETE REINFORCING
310516 - Aggregate Materials
033000 - CAST-IN-PLACE CONCRETE

Notes:

This Section 33 11 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02511 - Water Mains in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supply and installation of water mains, hydrants, valves, valve boxes, and valve chambers including service connections.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

The World Health Organization publication "Guidelines for Drinking Water Quality, Volume 1, Recommendations, Item 4.3.7.3 (PAH)" states "... the use of coal-tar-based and similar materials for pipe linings and coatings on storage tanks should be discontinued". If coal-tar-based materials are to be used in contact with potable water the specifier should verify that use of material is appropriate.

All lining available by the iron pipe manufacturers are approved for contact with potable water in accordance with National Sanitation Foundation (NSF) standard 61.

For DND projects only. Coal-tar-based linings are not to be used in pipe for potable water.


33111601 Incoming Site Water Utility Distribution Piping
33 11 16.01 Incoming Site Water Utility Distribution Piping

Date: 2003/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
264200 - CATHODIC PROTECTION
331116 - Site Water Utility Distribution Piping
210501 - COMMON WORK RESULTS FOR MECHANICAL

Notes:

This Section 33 11 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 15141 - Domestic Water Supply Piping Ductile Iron - Incoming Water Service in accordance with MasterFormat 1995.

DESCRIPTION: This Section   specifies ductile iron water piping, NPS 3 and over, from 1 m outside of building to first isolation valve inside building. This Section does not apply to incoming water service of plastic or soft copper in long lengths.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

ENVIRONMENTAL: Building water use can be reduced by: deploying water efficient appliances; specifying water conserving flush toilets; specifying spring loaded lavatory fixtures; specifying low flow fixtures; considering electronic proximity devices; and collecting, retaining and reusing rainwater.


33 21 00 Water Supply Wells

Date: 2003/12/31

Related sections:

Notes:

This Section 33 21 14 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02521 - Water Wells in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the casings, drilling and installation of materials, testing and sampling to provide a complete water well.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options


33 31 13 Public Sanitary Utility Sewerage Piping

Date: 2003/12/31

Related sections:

012900 - PAYMENT PROCEDURES
013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
310516 - Aggregate Materials
033000 - CAST-IN-PLACE CONCRETE
312333

Notes:

This Section 33 31 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02530 - Sanitary Sewage in accordance with MasterFormat 1995.

DESCRIPTION: This Section is for gravity sewers. Use Section 33 34 00 Sanitary Utility Sewerage Force Mains for force mains.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.


33 34 00 Sanitary Utility Sewerage Force Mains

Date: 2003/12/31

Related sections:

312333
310516 - Aggregate Materials

Notes:

This Section 33 34 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02531 - Sewage Force Mains in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the pipe materials and accessories, fill materials, preparation, installation and field testing for sewage force mains.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


33 36 00 Utility Septic Tanks

Date: 2003/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
310516 - Aggregate Materials

Notes:

This Section 33 36 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02541 - Precast Concrete Septic Tank in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the concrete materials, manufacturer, bedding and fill, and installation for precast concrete septic tanks.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section is written to provide for Contractor design and needs to be revised if Engineer/Consultant design is applicable.


33 36 33 Utility Drainage Field

Date: 2003/12/31

Related sections:

310516 - Aggregate Materials
313219
014500 - QUALITY CONTROL
312333

Notes:

This Section 33 36 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02542 - Disposal Fields for Septic Tanks in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the granular materials, piping and installation for both trench and area type septic tank disposal fields.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section contains "Trench" and "Area" Bed types for sewage disposal fields. This is written to provide for Engineer/Consultant design systems. Revise if Contractor design is applicable.


33 41 00 Storm Utility Drainage Piping

Date: 2003/12/31

Related sections:

012900 - PAYMENT PROCEDURES
013300 - SUBMITTAL PROCEDURES
033000 - CAST-IN-PLACE CONCRETE
312333

Notes:

This Section 33 41 00 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02630 - Storm Sewer in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supplying and installing storm sewer with bedding material.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


33 42 13 PIPE CULVERTS

Date: 2003/12/31

Related sections:

312413 - ROADWAY EMBANKMENTS
312333
016100 - COMMON PRODUCT REQUIREMENTS
310516 - Aggregate Materials

Notes:

This Section 33 42 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02641 - Pipe Culverts in accordance with MasterFormat 1995.

DESCRIPTION: This Section may be expanded for Soil-Steel bridge structures. Check with design Engineer/Consultant for requirements.

ENVIRONMENTAL: This Section specifies environmentally responsible materialchoices, including recycling and reuse options, and generally available disposal options.


33461301 FOUNDATION AND UNDERSLAB DRAINAGE
33 46 13.01 FOUNDATION AND UNDERSLAB DRAINAGE

Date: 2003/12/31

Related sections:

312333
310516 - Aggregate Materials
313219

Notes:

This Section 33 46 21 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02622 - Foundation and Underslab Drainage in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the materials, bedding and surround materials for foundation and underslab drainage, including the installation of pipe, tubing and backfill material.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


33 46 16 Subdrainage Piping

Date: 2003/12/31

Related sections:

312333
310516 - Aggregate Materials
313219

Notes:

This Section 33 46 17 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02620 - Sub-Drainage in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for constructing sub-drains with granular filter and/or geotextile filter material to lines and grades indicated or directed.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


33461601 SUB-DRAIN BACKFILL SEALING WITH ASPHALT
33 46 16.01 SUB-DRAIN BACKFILL SEALING WITH ASPHALT

Date: 2003/12/31

Related sections:

016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
334616 - Subdrainage Piping

Notes:

This Section 33 46 18 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02621 - Sub-Drain Backfill Sealing with Asphalt in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for asphalt sealing of surface of granular backfill placed over sub-drains. Sealing can be omitted where sub-drain underlies an asphaltic or concrete pavement.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

Sealing with asphalt can be omitted if clay seal is used to prevent surface water reaching granular backfill and overloading sub-drain. If clay seal is used, provide suitable paragraphs in Section 33 46 16 - Subgrade Drainage Network.


33 47 23 SANITARY SEWAGE LAGOONS

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
313219
313700 - Rip-Rap
311100 - CLEARING AND GRUBBING
329223 - SODDING
330513 - MANHOLES AND CATCH BASIN STRUCTURES
333113 - Public Sanitary Utility Sewerage Piping
313119
017411 - CLEANING

Notes:


33 56 13 Aboveground Fuel Storage Tanks

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
055000 - METAL FABRICATIONS
033000 - CAST-IN-PLACE CONCRETE
231113 - FACILITY FUEL-OIL PIPING
260500 - COMMON WORK RESULTS FOR ELECTRICAL
264200 - CATHODIC PROTECTION
230714 - THERMAL INSULATION FOR EQUIPMENT

Notes:

This Section 33 56 13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13202 - Aboveground Oil Storage Tanks in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the administrative procedures, materials, construction and accessories for the installation of aboveground oil storage tanks.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Not to be used for tank farms.


33 56 16 Underground Fuel Storage Tanks

Date: 2004/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
231113 - FACILITY FUEL-OIL PIPING
264200 - CATHODIC PROTECTION

Notes:

This Section 33 56 16 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 13201 - Underground Oil Storage Tanks in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies the administrative procedures and the materials and accessories for the installation of underground oil storage tanks. It includes mounded tanks as well as buried tanks.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


33 65 13 TELETHERMICS - DISTRIBUTION PIPING - STEEL

Date: 2006/12/31

Related sections:

028101 - HAZARDOUS MATERIALS
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
210501 - COMMON WORK RESULTS FOR MECHANICAL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
230517 - PIPE WELDING
230553
017411 - CLEANING
017900 - DEMONSTRATION AND TRAINING

Notes:

DESCRIPTION: This Section specifies the materials and installation of piping for campus type distribution systems for chilled water, low, medium, and high temperature hot water, low pressure and high pressure steam, and condensate returns.

"Telethermics" covers thermal fluid distribution systems from 150 mm inside the "sending" building to 150 mm inside the "receiving" building.

Do not use Sections 35 65 13 - Telethermics - Distribution Piping - Steel, 35 65 16 - Telethermics - Distribution Piping - PVC - FPR, 33 65 26 - Telethermics - Insulated and Plastic Jacketted Systems, 33 65 33 - Telethermics - Dryable Drainable, Testable Conduit Systems, 26 42 00.01 - Telethermics - Cathodic Protection, 33 65 43 - Telethermics - Steel Tunnel Systems, 33 65 46 - Telethermics - Shallow Inverted Trench (SIT) Systems for DND Projects.

Sections 33 65 13 and 33 65 16 are basic to, and are to be used in conjunction with, all other telethermic Sections.

These telethermic Sections do not attempt to cover all available distribution systems, i.e. solid pour conduit.


33 65 16 TELETHERMICS - DISTRIBUTION PIPING - PVC - FRP

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
210500
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
330713 - TELETHERMICS - THERMAL INSULATION
230529 - HANGERS AND SUPPORTS FOR HVAC PIPING AND EQUIPMENT
312333
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies thermal fluid distribution systems from 150 mm inside the sending building to 150 mm inside the receiving building.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

Use this Section in conjunction with all other Sections relating to Telethermics as applicable.


33 65 26 TELETHERMICS - INSULATED AND PLASTIC JACKETTED SYSTEMS

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
264200 - CATHODIC PROTECTION
312333
31233301 - EXCAVATING, TRENCHING AND BACKFILLING
033000 - CAST-IN-PLACE CONCRETE
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies factory pre-fabricated, pre-assembled, tested and insulated piping distribution systems.

"Telethermics" covers thermal fluid distribution systems from 150 mm inside the "sending" building to 150 mm inside the "receiving" building.

Do not use this Section for DND projects.


33 65 29 TELETHERMICS - DIRECTLY BURIED, LOOSE FILL INSULATED, SYSTEMS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
210501 - COMMON WORK RESULTS FOR MECHANICAL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
264200 - CATHODIC PROTECTION
017100 - EXAMINATION AND PREPARATION
312333
030517
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies direct buried distribution systems where the fluid temperature is between 2 degrees C and 425 degrees C.

"Telethermics" covers thermal fluid distribution systems from 150 mm inside the "sending" building to 150 mm inside the "receiving" building.

Do not use this Section for DND projects.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


33 65 33 TELETHERMICS - DRYABLE DRAINABLE, TESTABLE CONDUIT SYSTEMS

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
210501 - COMMON WORK RESULTS FOR MECHANICAL
016100 - COMMON PRODUCT REQUIREMENTS
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
230517 - PIPE WELDING
330713 - TELETHERMICS - THERMAL INSULATION
264200 - CATHODIC PROTECTION
312333
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials and installation for airtight, water-tight, dryable, drainable, testable system, factory pre-fabricated, pre-assembled, insulated and tested conduit systems.

"Telethermics" covers thermal fluid distribution systems from 150 mm inside the "sending" building to 150 mm inside the "receiving" building.


33 65 43 TELETHERMICS - STEEL TUNNEL SYSTEMS

Date: 2007/03/31

Related sections:

014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
210501 - COMMON WORK RESULTS FOR MECHANICAL
013216
016100 - COMMON PRODUCT REQUIREMENTS
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
264200 - CATHODIC PROTECTION
336526 - TELETHERMICS - INSULATED AND PLASTIC JACKETTED SYSTEMS
336529 - TELETHERMICS - DIRECTLY BURIED, LOOSE FILL INSULATED, SYSTEMS
330513 - MANHOLES AND CATCH BASIN STRUCTURES
330713 - TELETHERMICS - THERMAL INSULATION
230715 - THERMAL INSULATION FOR PIPING
230713 - DUCT INSULATION
312333
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, construction, testing and installation for steel tunnel systems.


33 65 46 TELETHERMICS - SHALLOW INVERTED TRENCH (SIT) SYSTEMS

Date: 2007/03/31

Related sections:

075323 - ETHYLENE PROPYLENE DIENE MONOMER ROOFING
014500 - QUALITY CONTROL
210501 - COMMON WORK RESULTS FOR MECHANICAL
016100 - COMMON PRODUCT REQUIREMENTS
336513 - TELETHERMICS - DISTRIBUTION PIPING - STEEL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
032000 - CONCRETE REINFORCING
033000 - CAST-IN-PLACE CONCRETE
330513 - MANHOLES AND CATCH BASIN STRUCTURES
034100 - PRECAST STRUCTURAL CONCRETE
312333
31233301 - EXCAVATING, TRENCHING AND BACKFILLING
330713 - TELETHERMICS - THERMAL INSULATION
017411 - CLEANING

Notes:

"Telethermics" covers thermal fluid distribution systems from 150 mm inside the "sending" building to 150 mm inside the "receiving" building.

Use this section in conjunction with all sections relating to Telethermics.


33 65 73 CONCRETE ENCASED DUCT BANKS AND MANHOLES

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
042200 - CONCRETE UNIT MASONRY
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies concrete encased duct banks, precast and cast-in-place concrete manholes, their construction, installation, marking requirements and inspection.

Plastic underground power cable ducting based on CSA C22.2 No. 211.1.


33 65 76 DIRECT BURIED UNDERGROUND CABLE DUCTS

Date: 2009/06/30

Related sections:

260500 - COMMON WORK RESULTS FOR ELECTRICAL
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Plastic underground power cable ducting based on CSA C22.2 No. 211.1. Fibreglass reinforced epoxy cable ducting based on CSA C22.2 No. 211.3.


33711601 ELECTRICAL POLE LINES AND HARDWARE
33 71 16.01 ELECTRICAL POLE LINES AND HARDWARE

Date: 2009/06/30

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
060573 - WOOD TREATMENT
260514 - POWER CABLE AND OVERHEAD CONDUCTORS (1001 V)
261213 - LIQUID FILLED, MEDIUM VOLTAGE TRANSFORMERS
261814 - FUSE CUTOUTS AND FUSE LINKS - OUTDOOR
261301 - ISOLATING SWITCHES TO 15 KV
262813
264100
260522 - CONNECTORS AND TERMINATIONS
261826 - Medium Voltage Reclosers
260527 - GROUNDING - PRIMARY
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies standard overhead pole line construction with common primary voltages of 4.16kV, 7.2kV, 12.5kV, 13.8 kV and 16kV single phase and secondary voltages of 120/240V, 120/208V, 600V. It includes transformer installations, both pole mounted and platform mounted, and ancillary equipment.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


33717301 OVERHEAD ELECTRICAL SERVICE
33 71 73.01 OVERHEAD ELECTRICAL SERVICE

Date: 2007/12/31

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
260534 - CONDUITS, CONDUIT FASTENINGS AND CONDUIT FITTINGS
260521 - WIRES AND CABLES (0-1000 V)
260923
260528 - GROUNDING - SECONDARY
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies service masts, insulator racks, weatherhead, conduit, conductors and metre sockets used in overhead service as well as their installation.

Ensure that Work beyond service drops will be specified elsewhere.


33717302 UNDERGROUND ELECTRICAL SERVICE
33 71 73.02 UNDERGROUND ELECTRICAL SERVICE

Date: 2009/06/30

Related sections:

014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260528 - GROUNDING - SECONDARY
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34711301 Vehicle Concrete Barriers
34 71 13.01 Vehicle Concrete Barriers

Date: 2002/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
321123 - Aggregate Base Courses
312333
032000 - CONCRETE REINFORCING
034100 - PRECAST STRUCTURAL CONCRETE

Notes:

This Section 34 71 43 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02845 - Concrete Barriers in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies cast-in-place or precast concrete barriers for medians and roadsides.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


34711321 Vehicle Guide Posts
34 71 13.21 Vehicle Guide Posts

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099113 - EXTERIOR PAINTING

Notes:

This Section 32 17 31 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02841 - Guide Posts in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supplying and installing  painted timber guide posts, or supplying and installing solid plastic guide posts.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal choices.


34711322 Vehicle Post Delineators
34 71 13.22 Vehicle Post Delineators

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 32 17 33 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02842 - Steel Post Delineators in accordance with MasterFormat 1995.

DESCRIPTION: This Section outlines requirements for supply and installation of steel posts and reflective markers used to delineate edge of a roadway.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.


34711325 Vehicle W-Beam Guide Rail
34 71 13.25 Vehicle W-Beam Guide Rail

Date: 2002/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
099113 - EXTERIOR PAINTING

Notes:

This Section 34 17 39 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02844 - Steel W-Beam Guide Rail in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supplying and installing steel W-beam guide rail for medians and road sides.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


34711327 Vehicle Cable Guide Rail
34 71 13.27 Vehicle Cable Guide Rail

Date: 2004/03/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section 34 17 36 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02843 - Cable Guide Rail in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supplying and installing cable guide rail for medians and roadsides.


34711328 Vehicle Box Beam Guide Rail
34 71 13.28 Vehicle Box Beam Guide Rail

Date: 2002/12/31

Related sections:

017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
099719 - PAINTING EXTERIOR METAL SURFACES

Notes:

This Section 34 71 41 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02846 - Steel Box Beam Guide Rail in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for supplying and installing steel box beam guide rail for medians and roadsides.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.


34 72 16 RAILWAY SIDING

Date: 2007/12/31

Related sections:

312413 - ROADWAY EMBANKMENTS
313221
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
310517
31321901 - GEOTEXTILES
313219
017411 - CLEANING

Notes:

Connection of siding track to main line is normally carried out by railway company. Limit of work to be clearly indicated.


34 77 13 PASSENGER LOADING BRIDGES

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
347713 - PASSENGER LOADING BRIDGES
017100 - EXAMINATION AND PREPARATION
017411 - CLEANING

Notes:

This Section specifies complete system design, manufacture and installation of the prefabricated units.

Preparation of building to receive the system including foundations, Terminal Building openings and supply services are specified in relevant Sections, to be executed by other trades in close co-operation with this Section.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34 43 05 COMMON WORK RESULTS FOR AIRFIELD LIGHTING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34 43 10 AIRFIELD ILLUMINATED GUIDANCE SIGNS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
034100 - PRECAST STRUCTURAL CONCRETE
017411 - CLEANING

Notes:

DESCRIPTION: This Section describes internally illuminated signs and associated wiring and fittings for airport taxiways, aprons and runways.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431313 AIRFIELD RUNWAY IDENTIFICATION LIGHTS
34 43 13.13 AIRFIELD RUNWAY IDENTIFICATION LIGHTS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260543
261216 - Dry Type, Medium Voltage Transformers
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies airfield runway identification lights.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431316 AIRFIELD RUNWAY AND TAXIWAY INSET LIGHTING
34 43 13.16 AIRFIELD RUNWAY AND TAXIWAY INSET LIGHTING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
033000 - CAST-IN-PLACE CONCRETE
015200 - CONSTRUCTION FACILITIES
017411 - CLEANING

Notes:

DESCRIPTION: This section covers inset lighting systems for runway and taxiway centre-lines, touchdown zones, displaced thresholds, high speed exits, hold bars, approaches, edges, runway guards, and taxiway intersections.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431319 AIRFIELD ELEVATED EDGE LIGHTING
34 43 13.19 AIRFIELD ELEVATED EDGE LIGHTING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This section includes high intensity elevated light units, series circuit and medium intensity light units, multiple/parallel circuit.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431323 AIRFIELD RUNWAY GUARD LIGHTS
34 43 13.23 AIRFIELD RUNWAY GUARD LIGHTS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260543
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies airfield runway guard lights - configuration A.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Reference Transport Canada advisory circular AC 302-005 Runway Guard Light Installation Criteria.


34431623 AIRFIELD SHORT-APPROACH LIGHTING SYSTEM
34 43 16.23 AIRFIELD SHORT-APPROACH LIGHTING SYSTEM

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
344316
017411 - CLEANING

Notes:

DESCRIPTION: This Section includes power supply requirements, lighting level control, light units, and instructions for layout.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.

Simplified Short Approach Lighting System; Runway Alignment Indicator Lights (SSALR) system design drawings in accordance with Transport Canada Documents TP 312 - Aerodrome Standards and Recommended Practices fourth edition, March 1993(R2005). (See Precision Approach Category 1 Lighting System).


34431626 AIRFIELD OMNI-DIRECTIONAL APPROACH LIGHTING SYSTEM
34 43 16.26 AIRFIELD OMNI-DIRECTIONAL APPROACH LIGHTING SYSTEM

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
260543
017411 - CLEANING

Notes:

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

Omni-Directional Approach Lighting System (ODALS) system design drawings in accordance with Transport Canada Documents TP 312 - Aerodrome Standards and Recommended Practices fourth edition, March 1993 (R2005).

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431629 AIRFIELD LOW INTENSITY APPROACH LIGHTING EQUIPMENT
34 43 16.29 AIRFIELD LOW INTENSITY APPROACH LIGHTING EQUIPMENT

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
261216 - Dry Type, Medium Voltage Transformers
260543
344316
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431634 AIRFIELD HIGH VARIABLE INTENSITY APPROACH LIGHTING EQUIPMENT
34 43 16.34 AIRFIELD HIGH VARIABLE INTENSITY APPROACH LIGHTING EQUIPMENT

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
261216 - Dry Type, Medium Voltage Transformers
260543
344316
015200 - CONSTRUCTION FACILITIES
044310
017411 - CLEANING

Notes:

Use this Section for High Intensity Approach Lighting System (HIAL). A complete HIAL system includes Low Intensity Approach Lighting System (LIAL). Use Section 34 43 16.29 - Airfield Low Intensity Approach Lighting Equipment for standalone LIAL System.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431636 AIRFIELD PRECISION-APPROACH PATH INDICATOR EQUIPMENT
34 43 16.36 AIRFIELD PRECISION-APPROACH PATH INDICATOR EQUIPMENT

Date: 2010/12/31

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the Airfield Precision-Approach Path Indicator Equipment (PAPI) consisting of a wing bar of 4 sharp transition multi-lamp (or paired single lamp) units equally spaced. The system is located on the left side of the runway unless it is physically impracticable to do so.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34431639 AIRFIELD ALUMINUM APPROACH TOWERS
34 43 16.39 AIRFIELD ALUMINUM APPROACH TOWERS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
033000 - CAST-IN-PLACE CONCRETE
312333
017411 - CLEANING

Notes:

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34432316 AIRFIELD WIND CONES
34 43 23.16 AIRFIELD WIND CONES

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34432319 ROTATING BEACONS
34 43 23.19 ROTATING BEACONS

Date: 2006/09/30

Related sections:

013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
033000 - CAST-IN-PLACE CONCRETE
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS

Notes:

DESCRIPTION: This Section specifies materials and installation for rotating beacons.

This Section 34 43 23.19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 16564 - Rotating Beacon in accordance with MasterFormat 1995.


34432343 AIRFIELD APRON FLOODLIGHTING
34 43 23.43 AIRFIELD APRON FLOODLIGHTING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
262901 - CONTACTORS
015200 - CONSTRUCTION FACILITIES
344305 - COMMON WORK RESULTS FOR AIRFIELD LIGHTING
017411 - CLEANING

Notes:

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Airport Electrical Association (C.A.E.A), Transport Canada / Airspace Standards and Procedures, Public Works and Government Services Canada (PWGSC) / Ontario Region / Real Property Services / Professional and Technical Programs / A&E Resources - Electrical.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34432613 AIRFIELD LIGHTING CONTROL EQUIPMENT
34 43 26.13 AIRFIELD LIGHTING CONTROL EQUIPMENT

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies control panels for the management of airport lighting and auxiliary systems.

Use this Section for control panels installed by hard wiring. For programmable logic controller (PLC) apparatus, use section 34 43 26.16 - Airfield Lighting PLC Control Equipment.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34432616 AIRFIELD LIGHTING PLC CONTROL EQUIPMENT
34 43 26.16 AIRFIELD LIGHTING PLC CONTROL EQUIPMENT

Date: 2010/06/30

Related sections:

013119 - PROJECT MEETINGS
013300 - SUBMITTAL PROCEDURES
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the materials, installation, assembly, wiring and testing for Programmable Logic Control (PLC) Equipment.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34432623 AIRFIELD LIGHTING REGULATOR ASSEMBLY
34 43 26.23 AIRFIELD LIGHTING REGULATOR ASSEMBLY

Date: 2010/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
344310 - AIRFIELD ILLUMINATED GUIDANCE SIGNS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


34 43 32 FLOODLIGHTING-EXTERIOR

Date: 2008/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
065000
265000 - LIGHTING

Notes:

This section includes LEED general requirements, co-ordinate with NMS Section 01 35 21 - LEED Requirement.


34731613 AIRCRAFT STATIC GROUNDING
34 73 16.13 AIRCRAFT STATIC GROUNDING

Date: 2006/06/30

Related sections:

013529
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies aircraft static grounding including grounding receptacles, rods and wire and their installation.

Catalogue numbers listed in this specification are not intended for use in ordering equipment. Consult manufacturer's literature for complete ordering information, especially for equipment which has optional features.

This Section 34 73 16.13 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02591 - Aircraft Static Grounding in accordance with MasterFormat 1995.


35 20 23 DREDGING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013543 - ENVIRONMENTAL PROCEDURES
002113 - INSTRUCTIONS TO BIDDERS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the general requirements and execution for dredging, including the removal and disposal of dredged materials.

Ensure that appropriate Federal and Provincial environmental authorities have been contacted in respect to project for any special environmental requirements and ensure this information is incorporated into documents and drawings.


35 31 19 REVETMENTS

Date: 2006/09/30

Related sections:

Notes:

DESCRIPTION: This Section specifies revetments  for shoreline or channel bank protection consisting of successive layers of graded stone filters with or without geotextiles and with slope surface protection consisting of armour units of quarry rock or precast concrete.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. Ensure that appropriate Federal and Provincial environmental authorities have been contacted in respect to Project for any special physical, environmental requirements and ensure this information is incorporated into documents and drawings.

Function of a revetment is to protect shoreline or channel banks from erosion by wave or current action.

This Section 35 31 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02393 - Revetments in accordance with MasterFormat 1995.


35312313 RUBBLE MOUND BREAKWATER
35 31 23.13 RUBBLE MOUND BREAKWATER

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
310516 - Aggregate Materials
032000 - CONCRETE REINFORCING
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies requirements for construction of a rubble mound breakwater consisting of component layers of rock, or rock and concrete, and to dimensions indicated.

Ensure that appropriate Federal and Provincial environmental authorities have been contacted in respect to Project for any special environmental requirements and ensure this information is incorporated into documents and drawings.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


35 42 19 Preservation of Water Courses

Date: 1996/12/31

Related sections:

Notes:

This Section 35 42 19 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02379 - Preservation of Water Courses in accordance with MasterFormat 1995.

This section specifies the precautions that should be considered for a project constructed near or in conjunction with a water course in order to preserve that water course.

ENVIRONMENTAL: This section specifies environmentally responsible procedural choices.

ENVIRONMENTAL: Construction of/or along the edge of watercourse should be scheduled at a time period when water levels have fallen to established low levels. This procedure will minimize erosion potential.


35 42 60 Waterway Channel Maintenance

Date: 2004/12/31

Related sections:

024113 - Selective Site Demolition
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
352023 - DREDGING
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013543 - ENVIRONMENTAL PROCEDURES

Notes:

This Section 35 42 60 has been renumbered to meet the recommendations of the MasterFormat 2004 classification system. Prior to January 2005, this NMS section was numbered Section 02326 - Channel Excavation Cleaning and Deepening in accordance with MasterFormat 1995.

DESCRIPTION: This Section specifies requirements for constructing, cleaning, deepening, widening and relocating channels, other than those ditches which are contiguous with main grading operations, to lines, grades, dimensions and typical cross sections shown on plans or established by Departmental Representative/Engineer/Consultant.

ENVIRONMENTAL: This Section specifies environmentally responsible disposal options.

Ensure that appropriate Federal, Provincial and Territorial environmental authorities have been contacted in respect to project for special environmental requirements and ensure this information is incorporated into documents and drawings.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.


35 51 23 PONTOONS

Date: 2006/12/31

Related sections:

017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for pontoons to dimensions, details and locations indicated. Pontoons specified in this Section are for pontoons of wood frame construction sheathed with plywood and covered with a glass fibre exterior coating. They form components of floats used in construction of floating wharves.


35591319 RUBBER MARINE FENDERS
35 59 13.19 RUBBER MARINE FENDERS

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013521 - LEED REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies engineered energy absorbing fendering systems for marine and bridge pier construction.

These fendering systems are applicable to fenders which are specified in terms of performance rather than preselected product. In Information to Bidders, request tenderers to submit following data with their bids: Description of fender system and performance details including energy absorption, load/deflection and terminal reaction at rated deflection, details of rubbing medium including dimensions, physical and chemical properties and method of attachment, details of anchor bolts, details of supporting system and details of modifications required in structure to accommodate proposed fendering system.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


35 59 29 MOORING DEVICES

Date: 2006/12/31

Related sections:

017800 - CLOSEOUT SUBMITTALS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies requirements for supply and installation of bollards and quick-release mooring hooks, complete with fair leads and capstans. Simple bollards, cleats, bitts and hooks are normally covered by Section 05 50 00 - Metal Fabrications.


42 20 00 PROCESS COOLING EQUIPMENT

Date: 2010/06/30

Related sections:

013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
210501 - COMMON WORK RESULTS FOR MECHANICAL
230553
061000 - ROUGH CARPENTRY
221317 - DRAINAGE WASTE AND VENT PIPING - CAST IRON AND COPPER
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the equipment for process refrigeration including compressors, condensers, receivers, condensing units, evaporators along with defrost control, connection and accessories, and their installation.

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


44 41 13 COMMERCIAL WATER TREATMENT PLANTS

Date: 2008/12/31

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies the components and installation for a complete, packaged, commercial water treatment plant.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


A1010 STANDARD FOUNDATIONS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
135290

Notes:

DESCRIPTION: This section describes, in general terms, foundation types for buildings, certain performance requirements, categories of commonly used foundation products, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


A1030 SLABS ON GRADE (PERFORMANCE)

Date: 2009/12/31

Related sections:

013119 - PROJECT MEETINGS
017800 - CLOSEOUT SUBMITTALS
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


A2010 BASEMENT EXCAVATION

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
015600 - TEMPORARY BARRIERS AND ENCLOSURES
013543 - ENVIRONMENTAL PROCEDURES
G1010 - SITE CLEARING
017411 - CLEANING

Notes:

DESCRIPTION: UniFormat describes the information for this Section as including: excavation for basement, backfill and compaction, excavation support systems and other basement excavation. This Section specifies excavation for basements, backfill and compaction, excavation and support systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


A2020 BASEMENT WALLS

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This section describes in general terms, basement walls for buildings, certain performance requirements, four (4) categories of commonly used foundation wall products, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Bolting also eliminates the dangerous fumes and gases associated with welding.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


B1010 FLOOR CONSTRUCTION

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014500 - QUALITY CONTROL
028101 - HAZARDOUS MATERIALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013543 - ENVIRONMENTAL PROCEDURES

Notes:

DESCRIPTION: UniFormat describes the information for this Section as including: floor structural frame, structural interior walls supporting floors, floor decks, slabs and toppings, balcony floor construction, mezzanine construction, ramps, exterior stairs, floor construction vapour retarders, air barriers and insulation, floor construction firestopping, and other floor construction. This Section specifies the performance requirements for floor construction materials including structural steel framing, steel deck, cast-in-place concrete, firestopping and smoke seals, concrete block for structural load bearing interior partitions, fireproofing of steel structure and firestopping.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

This Section identifies performance criteria for contractors to use as a benchmark for construction of the required floor construction. Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this Section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This Section includes a performance specification; do not add manufacturers names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL, QUALITY ASSURANCE, SUBMITTALS; in PART 2 - PRODUCTS, SOURCE QUALITY CONTROL; and in PART 3 - EXECUTION, FIELD QUALITY CONTROL.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


B1020 ROOF CONSTRUCTION

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
135290

Notes:

DESCRIPTION: This section describes, in general terms, roof types for buildings, certain performance requirements, categories of commonly used roof materials, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


B2010 EXTERIOR WALLS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013543 - ENVIRONMENTAL PROCEDURES
079200 - Joint Sealants

Notes:

DESCRIPTION: UniFormat describes the information for this Section as including: exterior wall exterior skin, exterior wall construction, exterior wall vapour retarders, air barriers and insulation, exterior wall interior skin, parapets, exterior louvers, grilles and screens, exterior protection devices for openings, exterior balcony walls and railings, exterior soffits and other exterior walls. This Section specifies Exterior Wall Systems in place.  This Section includes, as components of the exterior wall system, the exterior skin or veneer, complete with flashings, the supporting core sub structure, movement joints, assemblies, and insulation, the interior skin or finish, parapets, louvers, grilles, and screens, balcony walls and railings, canopies, and exterior soffits complete with framing, anchorages, fastenings, adhesives, and other ancillary accessories necessary to complete the Work. Windows and exterior doors are not included in this Section. This section is not intended to include interior finishes such as wood, fabric, ceramic tile, glass, plastics or metals, paints or coatings, or any combination of them.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete exterior wall system. Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL, QUALITY ASSURANCE, SUBMITTALS; in PART 2 - PRODUCTS, SOURCE QUALITY CONTROL; and in PART 3 - EXECUTION, FIELD QUALITY CONTROL.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


B2020 EXTERIOR WINDOWS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017800 - CLOSEOUT SUBMITTALS

Notes:

DESCRIPTION: This Section is a performance based document for windows. Ensure drawings indicate window elevations, dimensions, opening vents and other pertinent details. This Section is based on CAN/CSA-A440.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


B2030 EXTERIOR DOORS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
013543 - ENVIRONMENTAL PROCEDURES
088050 - GLAZING

Notes:

DESCRIPTION: UniFormat describes the information for this Section as including: exterior entrance doors, large exterior special doors, exterior gates, and other exterior doors. This Section specifies exterior entrance doors, exterior utility doors and large exterior special doors.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete exterior door system. Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in this Section. This section includes a performance specification; do not add manufacturer's names or prescriptive specifications.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


B3010 ROOF COVERINGS

Date: 2008/06/30

Related sections:

001330
013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


B3020 ROOF OPENINGS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
135290

Notes:

DESCRIPTION: This Section describes, in general terms, roof opening products for buildings, certain performance requirements, categories of commonly used roof opening products, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


C1010 INTERIOR PARTITIONS (PERFORMANCE)

Date: 2006/06/30

Related sections:

017800 - CLOSEOUT SUBMITTALS
013216
135290
013543 - ENVIRONMENTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
088050 - GLAZING
014500 - QUALITY CONTROL

Notes:

DESCRIPTION: This Section specifies Interior Partitions. This Section identifies performance criteria to use as a benchmark for construction of a complete Interior Partitions system. Materials used to accomplish these performance objectives may be left to the prerogative of the contractors. Individual specification sections will reference this Section for required performance criteria. Testing and verification of specified criteria should be described in this Section.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

Including verification in the project specification is essential to ensuring that product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL QUALITY ASSURANCE SUBMITTALS; in PART 2 - PRODUCTS SOURCE QUALITY CONTROL; and in PART 3 - EXECUTION FIELD QUALITY CONTROL.


C2012 INTERIOR STAIRWAYS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014500 - QUALITY CONTROL
017800 - CLOSEOUT SUBMITTALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
013543 - ENVIRONMENTAL PROCEDURES

Notes:

DESCRIPTION: This Section is a performance based specification for industrial, service, commercial and architectural stairways.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

ENVIRONMENTAL: Designing for future disassembly ensures that it will be possible to remove materials for re-use, refurbishing or recycling. Where possible, ensure that mechanical connections are reversible, such as screwed and bolted rather than welded connections, to facilitate disassembly and encourage the practice of re-using materials. Reversible connections also eliminate the dangerous fumes and gases associated with welding.

For design requirements and for sizes, mounting heights and clearances see CAN/CSA-B651 Barrier-Free Design.

This specification is based on The National Association of Metal Manufacturers (NAAMM) Standard AMP 510.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


C3012 EPOXY WALL COATINGS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies materials and installation requirements for epoxy wall coatings applied to new concrete and plywood substrates. This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete epoxy wall coating system.  Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in a specially written Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


C3015 INTERIOR CEILING FINISHES

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
014100 - REGULATORY REQUIREMENTS
028101 - HAZARDOUS MATERIALS
016100 - COMMON PRODUCT REQUIREMENTS
013300 - SUBMITTAL PROCEDURES
012983 - PAYMENT PROCEDURES FOR TESTING LABORATORY SERVICES
017800 - CLOSEOUT SUBMITTALS
135290
014500 - QUALITY CONTROL
015200 - CONSTRUCTION FACILITIES
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies Interior, Ceiling Finish Systems, including the use of gypsum board, and boards of glass and mineral fibre. This section is not intended to include special ceiling finishes such as wood, fabric, ceramic tile, glass, plastics or metals, or any combination of them.

ENVIRONMENTAL: This Section includes environmentally responsible material choices, including options for recycling and reusing the materials, and/or for generally available, environmentally responsible means of disposal. The inclusion of minimum recycled content, in ceiling systems, provides for efficient use of natural resources and diverts materials from the waste stream.

A performance approach is used to describe that which is required in its installed and finished form. The ceiling systems, specified, may be applied to a substrate which has been installed by other trades, or may be suspended from the building structure with a space above it for various purposes, including the formation of a plenum and/or enclosure of building systems for air, electrical, or other service distribution systems, or to cover the basic floor or roof structure to provide a finished appearance and/or fire rated barrier.

The performance approach to formulating a specification indicates the end result required, based on appropriate criteria which, it is indicated, will be applied to the installed element of the Project, as the subject of this Specification Section.

The means to allow the Departmental Representative/Engineer/Consultant to review, evaluate and accept the specified element, system, or assembly, as well as the means to monitor and review its installation and completion, must be included in the Specification.

Refer to and coordinate the requirements of this Section to Division 1 - including, especially, Sections 01 23 10 - Alternatives and 01 61 00 - Common Product Requirements.

SUSTAINABLE: For sustainable requirements for this Section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


C3025 INTERIOR SOFT FLOOR FINISHES

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This section identifies performance criteria for specifiers and contractors to use as a benchmark for construction of Interior Soft Floor Finishes. Materials and methods used to accomplish these performance objectives may be left to the contractor. This section includes a performance specification; do not add manufacturers names or prescriptive specifications; these methods are addressed later in design development.

This performance specification is a statement of required results, verifiable as meeting stipulated criteria and free of unnecessary process limitations. Performance specifying is a method of eliciting improved material and methods for the construction process by stating the desired result leaving the rest to the Contractor.


C3026 INTERIOR HARD FLOOR FINISHES

Date: 2009/06/30

Related sections:

013119 - PROJECT MEETINGS
013529
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section identifies performance criteria for specifiers and contractors to use as a benchmark for construction of Interior Hard Floor Finishes. This performance specification is a statement of required results, verifiable as meeting stipulated criteria and free of unnecessary process limitations. Materials and methods used to accomplish these performance objectives may be left to the Contractor.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


C3027 EPOXY FLOOR COATINGS

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
135290
016100 - COMMON PRODUCT REQUIREMENTS

Notes:

DESCRIPTION: This Performance based Section specifies materials and installation requirements for epoxy floor coatings applied to new concrete and plywood substrates. This Section identifies performance criteria for contractors to use as a benchmark for construction of a complete epoxy floor coating system. Materials used to accomplish these performance objectives are left to the prerogative of the contractors. Individual specification sections will reference this section for required performance criteria. Testing and verification of specified criteria should be described in a specially written Section. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section  01 47 17 - Sustainable Requirements: Contractor's Verification.


C3040 PAINTING

Date: 2009/06/30

Related sections:

013119 - PROJECT MEETINGS
090500
013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
C3040 - PAINTING
321723 - PAVEMENT MARKINGS
033500 - CONCRETE FINISHING
042119 - CLAY TILE MASONRY
042200 - CONCRETE UNIT MASONRY
230553
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies the application of site applied paint finishes to new exterior and interior surfaces, including site painting of shop primed surfaces.  The system designations and finish formulae are as specified by the Master Painters Institute (MPI).  Products included in the Approved Product Listing are performance tested for resistance to weathering and abrasion, scrub, stain and chemical resistance, cleanability, and application and hiding qualities.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D1012 FREIGHT ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for electric and hydraulic freight elevators to use as a benchmark for construction of a complete electric or hydraulic freight elevator system. Materials used to accomplish these performance objectives are subject to CSA standards and building code for elevators. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


D1013 PASSENGER ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This performance based Section specifies the criteria for electric and hydraulic passenger elevators. This Section identifies performance criteria as a benchmark for electric or hydraulic passenger elevator system. Materials, operators and systems used to accomplish these performance objectives are left to the prerogative of the contractors. This Section includes a performance specification; do not add manufacturers names or prescriptive specifications.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


D2010 PLUMBING FIXTURES

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for plumbing fixtures. Coordinate this section with piping connection accessories on the domestic water and sanitary waste piping systems.  UniFormat Section D2010 includes: Water Closets, Urinals, Lavatories, Sinks, Showers, Bathtubs, Basins, Drinking Fountains/Coolers and Other Plumbing Fixtures.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for provision of plumbing fixtures.  Final fixture selection and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


E2010 FIXED FURNISHINGS

Date: 2009/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies window treatment, fixed floor grilles and mats and fixed interior landscaping.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


E2020 MOVABLE FURNISHINGS

Date: 2009/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
016100 - COMMON PRODUCT REQUIREMENTS
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies free-standing component system furniture, specifically furniture for workstations including acoustical panels, desk and table components, lateral and vertical file systems, steel stationary storage cabinets and seating systems.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G1010 SITE CLEARING

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section identifies performance criteria for contractors to use as a benchmark for site clearing. This performance specification is a statement of required results, verifiable as meeting stipulated criteria and free of unnecessary process limitations.  Materials and methods used to accomplish these performance objectives may be left to the Contractor.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

Including verification in the project specification is essential to ensuring that the product, material or system meets the stipulated specified criteria.  Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


G1020 SITE DEMOLITION AND RELOCATIONS

Date: 2009/06/30

Related sections:

013119 - PROJECT MEETINGS
013521 - LEED REQUIREMENTS
013543 - ENVIRONMENTAL PROCEDURES
015200 - CONSTRUCTION FACILITIES
013573 - PROCEDURES FOR DECONSTRUCTION OF STRUCTURES
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: Abandonment and removal of septic tanks and tanks containing petroleum products.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G1030 SITE EARTHWORK

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section describes, in general terms, site clearing, site excavation, and backfilling and contouring, certain performance requirements, common site preparation techniques, applicable criteria, without detailed requirements. This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including reuse and recycling options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


G2010 ROADWAYS

Date: 2009/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
321723 - PAVEMENT MARKINGS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section   includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G2020 PARKING LOT

Date: 2009/06/30

Related sections:

028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
032000 - CONCRETE REINFORCING
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G2030 PEDESTRIAN PAVING

Date: 2009/06/30

Related sections:

013119 - PROJECT MEETINGS
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G2040 SITE DEVELOPMENT

Date: 2009/06/30

Related sections:

013119 - PROJECT MEETINGS
028101 - HAZARDOUS MATERIALS
013521 - LEED REQUIREMENTS
017411 - CLEANING
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Section specifies in general terms, site development surrounding buildings, certain performance requirements, categories of commonly used site products, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


G2050 LANDSCAPING

Date: 2010/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
107500 - FLAGPOLES
323113 - CHAIN LINK FENCES AND GATES
017411 - CLEANING

Notes:

DESCRIPTION: This Section describes landscaping and site accessories, certain performance requirements, categories of commonly used products, and applicable installation criteria, without detailed requirements.  This section can be used for design-build and project management delivery methods as well as providing base requirements in an outline form for traditional contract methods.

SUPPORT: The National Master Specification (NMS) Secretariat wishes to thank the following organizations for their revision input and technical update on this Section: the Canadian Nursery Landscape Association (CNLA) and the Canadian Society of Landscape Architects (CSLA) and specific to Topsoil Specification, the Compost Council of Canada (CCC).

SUSTAINABILITY: This Section specifies environmentally responsible material choices, utilizing the three R's (reduce, reuse and recycle) whenever possible, and providing generally available disposal options. For construction and demolition waste management practices in Federal Government projects refer to PWGSC's Sustainable Development Strategy (SDS - 2007-2009), where these requirements have been specifically targeted.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D1000 ENVIRONMENTAL DESIGN REQUIREMENTS

Date: 2009/06/30

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
230553
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D1012 FREIGHT ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for electric and hydraulic freight elevators to use as a benchmark for construction of a complete electric or hydraulic freight elevator system. Materials used to accomplish these performance objectives are subject to CSA standards and building code for elevators. This section includes a performance specification; do not add manufacturers names or prescriptive specifications.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


D1013 PASSENGER ELEVATORS

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This performance based Section specifies the criteria for electric and hydraulic passenger elevators. This Section identifies performance criteria as a benchmark for electric or hydraulic passenger elevator system. Materials, operators and systems used to accomplish these performance objectives are left to the prerogative of the contractors. This Section includes a performance specification; do not add manufacturers names or prescriptive specifications.

ENVIRONMENTAL: This Section specifies environmentally responsible choices for generally available waste disposal options.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


D2010 PLUMBING FIXTURES

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for plumbing fixtures. Coordinate this section with piping connection accessories on the domestic water and sanitary waste piping systems.  UniFormat Section D2010 includes: Water Closets, Urinals, Lavatories, Sinks, Showers, Bathtubs, Basins, Drinking Fountains/Coolers and Other Plumbing Fixtures.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for provision of plumbing fixtures.  Final fixture selection and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D2020 DOMESTIC WATER DISTRIBUTION

Date: 2005/03/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
028101 - HAZARDOUS MATERIALS
013300 - SUBMITTAL PROCEDURES
135290
014500 - QUALITY CONTROL
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This section specifies domestic water distribution piping and accessories, domestic water equipment.  UniFormat Section D2020 includes: water supply piping systems, water supply equipment and water supply insulation.

ENVIRONMENTAL: This section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

This section identifies performance criteria for contractors to use as a benchmark for provision of a complete domestic water system, including hot and cold water pipe and equipment. Final equipment selection and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.

SUSTAINABLE: For sustainable requirements for this section, related to the construction and verification, co-ordinate with Section 01 47 15 - Sustainable Requirements: Construction or Section 01 47 17 - Sustainable Requirements: Contractor's Verification.


D2030 SANITARY WASTE

Date: 2005/06/30

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for sanitary waste and includes performance specification information for waste and vent piping, waste piping specialties, waste piping equipment and waste piping insulation. UniFormat describes the information for this Section as including: waste and vent piping, waste piping specialties, waste piping equipment and waste piping insulation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for Design-Build contractors to use as a benchmark for the design and construction of a complete Sanitary Waste Plumbing system. Whenever possible, materials used to accomplish these performance objectives should be left to the prerogative of the Design-Builder. Related specification sections will reference this section for required performance criteria. Testing and Performance Verification of the performance criteria specified in this Section should be clearly identified and described.

It is essential that the Specifier include the requirements for Performance Verification in the project specification to ensure that all products, materials or systems proposed by the Design-Builder meet the specified performance criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Performance Verification of proposed products, materials and systems should occur at several phases during the Design and Construction phases of the project. Opportunities to specify Performance Verification are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.


D2040 RAIN WATER DRAINAGE

Date: 2005/06/30

Related sections:

014500 - QUALITY CONTROL
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
017800 - CLOSEOUT SUBMITTALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for rain water drainage and includes performance specification information for rain water drainage piping systems, rain water drainage specialties, rain water drainage insulation. UniFormat describes the information for this Section as including: rain water drainage piping systems, rain water drainage specialties, rain water drainage insulation

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for Design-Build contractors to use as a benchmark for the design and construction of a complete Rain Water Drainage Plumbing system. Whenever possible, materials used to accomplish these performance objectives should be left to the prerogative of the Design-Builder. Related specification sections will reference this section for required performance criteria. Testing and Performance Verification of the performance criteria specified in this Section should be clearly identified and described.

It is essential that the Specifier include the requirements for Performance Verification in the project specification to ensure that all products, materials or systems proposed by the Design-Builder meet the specified performance criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Performance Verification of proposed products, materials and systems should occur at several phases during the Design and Construction phases of the project. Opportunities to specify Performance Verification are provided in PART 1 - GENERAL Quality Assurance Submittals; in PART 2 - PRODUCTS Source Quality Control; and in PART 3 - EXECUTION Field Quality Control.


D2050 OTHER PLUMBING SYSTEMS

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for any piping or other related equipment which are not included in the plumbing systems in other D2000 series documents.  UniFormat Section D2050 includes: Compressed Air Systems, Deionized Water Systems, Distilled Water Systems, Fuel Oil Systems, Gasoline Dispensing Systems, Helium Gas Systems, Liquified Petroleum Gas Systems, Lubricating Oil Systems, Natural Gas Systems, Nitrous Gas Systems, Oxygen Gas Systems, Reverse Osmosis Systems, Vacuum Systems, Acid Waste Systems and Pools and Fountain Equipment and Piping.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for the provision of other plumbing systems.  Equipment selection and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, VERIFICATION.


D3000 DESIGN REQUIREMENTS - HVAC

Date: 2005/12/31

Related sections:

135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies ambient design parameters which are used as general HVAC target requirements for the entire project. Individual specification sections will reference this section for desired ambient conditions, and overall performance criteria.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.


D3010 ENERGY SUPPLY

Date: 2005/12/31

Related sections:

014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies energy sources which are provided outside the scope of the project, and which are available for use on the project.  Examples include hot or chilled water from a source outside the building, or within the building but outside the scope of the project. UniFormat Section D3010 includes: Oil Supply Systems, Gas Supply Systems, Coal Supply Systems, Steam, Hot and Chilled Water Supply Systems and Other Fuel Supply Systems.


D3020 HEAT GENERATION

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
013216
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for facility heat generating equipment for HVAC purposes.  Uniformat Section D3020 includes: Steam Boilers, Hot Water Boilers, Furnaces, Fuel-Fired Heaters, Auxiliary Equipment and Other Heat Generation Systems. Sections specifying related heat distribution equipment interfacing with heat generators will reference this section.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a heat generation system, including boilers and ancillary equipment.  Boiler construction and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D3030 REFRIGERATION

Date: 2005/09/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
013216
135290
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for refrigeration sources for project HVAC cooling requirements. UniFormat Section D3030 includes: Absorption Water Chillers, Centrifugal Water Chillers, Reciprocating Water Chillers, Rotary-Screw Water Chillers, Cooling Towers, Liquid Coolers and Refrigerant Compressors and Condensers.

This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a refrigeration system, including chillers and ancillary equipment.  Chiller construction and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D3040 HVAC DISTRIBUTION

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
019113 - GENERAL COMMISSIONING (CX) REQUIREMENTS

Notes:

DESCRIPTION: This Performance Based Section specifies the criteria for heating, ventilation and air conditioning distribution piping and ductwork.  Include related air and water moving equipment, and terminal devices which are connected to the distribution network.  This Section D3040 includes: Air Distribution Systems, Steam Distribution Systems, Hydronic Distribution Systems and Other HVAC Distribution Systems.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies performance criteria for contractors to use as a benchmark for construction of an HVAC distribution system, including sizing of ductwork and piping, selection of related movement equipment and terminal devices. Actual selection and equipment manufacturers used to accomplish these performance objectives are left to the prerogative of the contractor.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D3050 TERMINAL AND PACKAGED UNITS

Date: 2005/06/30

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
D3050 - TERMINAL AND PACKAGED UNITS

Notes:

DESCRIPTION: This Performance Based Section specifies the criteria for self-contained (packaged) heating, cooling or ventilation units. Uniformat Section D3050 includes: Package Terminal Air Conditioning Systems (PTAC), Air Coils, Humidifiers, Dehumidifiers, Terminal Heat Transfer Units, Energy Recovery Units, Heat Pumps and Other Heat Transfer Units.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies performance criteria for contractors to use as a benchmark for the provision of packaged HVAC equipment and accessories.  Actual manufacturers and model selections used to accomplish these performance objectives are left to the prerogative of the contractor.

Testing and verification of specified criteria should be described in this Section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D3060 CONTROLS AND INSTRUMENTATION

Date: 2005/06/30

Related sections:

D3000 - DESIGN REQUIREMENTS - HVAC
013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
028101 - HAZARDOUS MATERIALS
017800 - CLOSEOUT SUBMITTALS
135290
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
D3060 - CONTROLS AND INSTRUMENTATION
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL

Notes:

DESCRIPTION: This Performance Based Section specifies the criteria for the control system and related instrumentation equipment required to control or monitor equipment specified in the Uniformat D-series sections.  It may also contain overall system sequences of operation. This Section D3060 includes: Energy Monitoring and Control Systems, HVAC Control Systems, HVAC Sequence of Operation, Gas Purging Systems and Other HVAC Controls and Instrumentation.

ENVIRONMENTAL: This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies performance criteria for contractors to use as a benchmark for provision of an HVAC digital control system, including equipment and software.  Final system design and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractor.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D3070 OTHER HVAC SYSTEMS AND EQUIPMENT

Date: 2009/06/30

Related sections:

013529
013521 - LEED REQUIREMENTS
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
D3040 - HVAC DISTRIBUTION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies systems related to special environmental conditioning of spaces not specifically covered in other Uniformat D-series sections.  Uniformat Section D3070 includes: Special Cooling Systems and Devices, Humidity Control, Dust and Fume Collectors, Air Curtains and Paint Spray Booth Ventilation Systems.

This Section specifies environmentally responsible material choices, including recycling and reuse options, and generally available disposal options. The inclusion of recycled content provides efficient use of natural resources and diverts materials from the waste stream.

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D3080 TESTING, ADJUSTING AND BALANCING

Date: 2005/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014500 - QUALITY CONTROL
135290

Notes:

DESCRIPTION: This Performance based Section specifies the criteria for testing, adjusting and balancing requirements for HVAC equipment covered in the UniFormat D-series sections.  This Section D3080 includes: Mechanical Systems Testing, Adjusting, and Balancing, Piping Systems Testing, Adjusting, and Balancing and Air Systems Testing, Adjusting, and Balancing.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification.

This Section identifies balancing procedures and adjustment methods for contractors to use as a benchmark. Testing agency selection is left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D4010 SPRINKLERS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies facility sprinkler systems and related equipment. Other supplementary fire protection equipment interfacing with sprinklers will reference this section.  Uniformat Section D4010 includes: Wet Pipe Fire Sprinkler Systems, Dry Pipe Fire Sprinkler Systems, Pre-Action Fire Sprinkler Systems, Combination Dry Pipe and Pre-Action Fire Sprinkler Systems and Deluge Fire Sprinkler Systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a sprinkler fire protection system, including associated equipment.  Manufactured products used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this Section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D4020 STANDPIPE AND HOSE NETWORKS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
017800 - CLOSEOUT SUBMITTALS
014500 - QUALITY CONTROL
135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
D4030 - FIRE PROTECTION SPECIALTIES
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies standpipe and hose fire protection equipment. Uniformat Section D4020 includes: Fire Protection Standpipe and Fire Protection Valves, Hoses, and Cabinets.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a standpipe system, including piping and equipment. Manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D4030 FIRE PROTECTION SPECIALTIES

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
028101 - HAZARDOUS MATERIALS
135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies miscellaneous fire protection specialties, typically fire extinguishers. Uniformat Section D4030 includes: Fire Extinguishers, Fire Blankets and Wheeled Fire Extinguisher Units.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for fire protection equipment.  Manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D4040 OTHER FIRE SUPPRESSION SYSTEMS

Date: 2005/12/31

Related sections:

013300 - SUBMITTAL PROCEDURES
014500 - QUALITY CONTROL
135290
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION

Notes:

DESCRIPTION: This Section specifies fire suppression equipment that uses mediums other than water.  Uniformat Section D4040 includes: Carbon Dioxide Extinguishing Systems, Wet Chemical Fire Protection, Dry Chemical Fire Protection, Clean Extinguishing Agent Systems and Foam Extinguishing Systems.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

This Section identifies performance criteria for contractors to use as a benchmark for construction of a fire suppression system.  Actual construction and manufacturers used to accomplish these performance objectives are left to the prerogative of the contractors.

Testing and verification of specified criteria should be described in this section. Including verification procedures is essential to ensuring that product, assembly, or system meets the stipulated specified criteria. Verifiable performance criteria are those capable of being proven by measurement, test evaluation or other acceptable means. Verification can occur prior to product purchase and specification opportunities are provided in PART 3 - EXECUTION, Verification.


D5000 COMMON REQUIREMENTS - ELECTRICAL

Date: 2006/03/31

Related sections:

013300 - SUBMITTAL PROCEDURES
135290
016100 - COMMON PRODUCT REQUIREMENTS
014715 - SUSTAINABLE REQUIREMENTS: CONSTRUCTION
014717 - SUSTAINABLE REQUIREMENTS: CONTRACTOR'S VERIFICATION
017411 - CLEANING

Notes:

DESCRIPTION: This Section specifies electrical requirements, procedures and components that are common to all electrical performance sections. This section identifies performance criteria for designer or specifier selection which is applicable to a contractor's required delivery and installation of products. This section is used as a benchmark for the construction of a completed facility. Whenever practical and possible, materials used to accomplish these performance objectives are left to the discretion of the designer or contractor. Individual electrical specification sections will reference this section for required performance criteria. Co-ordinate the requirements of individual sections with those specified in this section. Testing and verification of specified criteria should be described in this section. This section specifies performance criteria whenever possible.  Products or manufacturers should only be named in specific circumstances when no other practical design solution can be considered.

SUSTAINABLE: This Section specifies sustainable requirements related to the Construction and Verification of this project for attaining environmental performance goals.

Including verification of the design in the project specification is essential to ensuring that a product, material or system meets the stipulated specified criteria. Verifying compliance means that the specified criteria are capable of measurement, test evaluation or other acceptable assurances. Verification can occur prior to product purchase and specification opportunities are provided in PART 1 - GENERAL Quality Assurance; Submittals in PART 2 - PRODUCTS, Source Quality Control; and in PART 3 - EXECUTION, Field Quality Control.


D5010 ELECTRICAL SERVICE AND DISTRIBUTION

Date: 2009/06/30

Related sections:

013529
013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D5020 LIGHTING, POWER, AND BRANCH WIRING

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D5030 COMMUNICATIONS AND SECURITY

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.


D5050 ELECTRICAL CONTROLS AND INSTRUMENTATION

Date: 2009/06/30

Related sections:

013521 - LEED REQUIREMENTS
016100 - COMMON PRODUCT REQUIREMENTS
017421 - CONSTRUCTION/DEMOLITION WASTE MANAGEMENT AND DISPOSAL
017411 - CLEANING

Notes:

This Section includes general requirements and procedures for compliance with the Canada Green Building Council's (CaGBC) - LEED Canada-NC and LEED Canada-CI prerequisites or credits required for LEED Project certification. Co-ordinate with Section 01 35 21 - LEED Requirements.